ATBECHDE....FRGB..ITLILUNLSE......................
C
0147193
EUROPEAN PATENT APPLICATION
A2
19850703
EP
84308974.9
19841220
en
en
en
243675/84
19831226
JP
19850703
198527
19850703
198527
4
4C 07K 7/10 A
4A 61K 37/02 B
de
Herstellung von Peptiden und deren Verwendung
en
Peptide production and use thereof
fr
Production de peptides et leur emploi
90201387.9
0398451
19841220
SUNTORY LIMITED
00423902
MFF STY.HM-468
1-40, Dojimahama 2-chome
Kita-ku, Osaka-shi, Osaka-fu 530
JP
Matsuo, Hisayuki
00653480
MFF STY.HM-468
5-15-141 Onoharahigashi 5-chome
Minoo-shi Osaka
JP
Matsuo, Hisayuki
6653 Ooaza-Kihara Kiyotake-cho
Miyazaki-gun Miyazaki-ken
JP
Kangawa, Kenji
5618Ooaza-Kihara Kiyotake-cho
Miyazaki-gun Miyazaki-ken
JP
Ford, Michael Frederick
et al
00030701
MEWBURN ELLIS York House 23 Kingsway
London WC2B 6HP
GB
AT
BE
CH
DE
FR
GB
IT
LI
LU
NL
SE
There are disclosed a new peptide α-hANP of the following structure: and acid addition salt thereof; a diuretic composition and a hypotensor composition containing the α-hANP or an acid addition salt thereof; and processes for the production thereof.

BACKGROUND OF THE INVENTION

1. Field of the Invention
The present invention relates to a novel peptide, a process for the production thereof, and a pharmaceutical composition containing the novel peptide as a diuretic or hypotensor.

2. Description of the Related Art
A normal regulation of the blood pressure in a human body is important for the maintenance of personal health, and various physical and humoral factors contribute to this regulation of the blood pressure. The physical factors include, for example, output, and the elasticity of the walls of blood vessels, etc. The humoral factors include, for example, the renin-angiotensin-aldosterone system, catecholamines, prostaglandins, kinin-kallikrein system, and natriuretic hormones including ouabain-like substances. Herein the term "natriuretic" will denote selective excretion of sodium cation relating to potassium cation.
Granules morphologycally similar to granules present in peptide hormone-producing cells are found in human atrium (J.D. Jamieson and G.E. Palade, J. Cell Biol., 23, 151, 1964). A homogenate of rat atrium and granules contained therein are known to show natriuretic action in rats (A.J. DeBold et. al., Life Science, 28, 89, 1981; R. Keeller, Can. J. Physiol. Phatmacol., 60, 1078, 1982). Recently, Mark G., Currie S. et. al. suggested peptide-like substances with;a molecular weight of 20,000 to 30,000, or not more than 10,000, present in atrium of humans, rabbits, swine, and rats, and having natriuretic action (Science, 221, 71-73, 1983).

SUMMARY OF THE INVENTION
The present invention provides a new peptide having natriuretic action and hypotensive or antihypertensive action. The peptide according to the present invention is hereinafter referred to as "a-human atrial natriuretic polypeptide" and abbreviated as "a-hANP".
There are also provided a process for the production of the peptide by chemical synthesis and a process for production of the peptide by the extraction of human artrium.
Another object of the present invention is to provide a pharmaceutical composition containing the peptide as a diuretic or hypotensor.
Other objects and advantages of the present invention will be apparent from the description set forth hereinbelow.

BRIEF DESCRIPTION OF THE DRAWINGS
- Figure 1 contains graphs comparing the diuretic action of the a-hANP and furosemide.
- Figure 2 is a chart showing the hypotensive action of the a-hANP.
- Figure 3 is a chromatogram showing an elution profile wherein the a-component is separated from the 6-component by gel filtration with Sephadex G-50 during isolation of the a-hANP from human atrium.
- Figure 4 is a chart showing a separation profile wherein a-hANP (S-S compound) is separated from a by-product Cys (Acm) compound and Met (O) compound at the last stage of chemical synthesis.

DESCRIPTION OF THE PREFERRED EMBODIMENT.
At present, furosemide as a natriuretic agent is used for the treatment of epsential hypertension. However, the structure of the frosemide is different to that of the new peptide according to the present invention.
The present inventors isolated a peptide, in substantially pure form, consisting of 28 amino acid residues and having a molecular weight of about 3,100, determined the structure of the peptide and found that the peptide showed a notable natriuretic and hypotensive actions.

Structure and Physico-chemical Properties of the a-hANP
- 1) Structure
The a-hANP has the structure: wherein ① and ② are directly bonded, Asp represents L-aspartic acid, Asn represents L-asparagine, Ala represents L-alanine, Arg represents L-arginine, Ile represents L-isoleucine, Gly represents glycine, Glu represents L-glutamic acid, Gln represents L-glutamine, Cys represents together with -S- 1/2 L-cystine, Ser represents L-serine, Tyr represents L-tyrosine, Phe represents L-phenylalanine, Met represents L-methionine, and Leu represents L-leucine, and wherein the amino acid chain has an amino-terminal at the left end and carboxy- terminal at the right end.
- 2) Molecular weight: about 3,100 as determined by gel-filtration (3080.39 as calculated).
- 3) Specific rotation: [α] 25D= -80.0° (c = 0.16, in 0.1 N acetic acid)
- 4) UV. spectrum: Max = 275 mm.
- 5) Color reactions: Ehrlich's reaction, negative; Sakaguchi's reaction, positive; Pauly's reaction, positive.
- 6) Distinction of basic, acidic, or neutral property: basic.
- 7) Solubility in solvents: soluble in water, partially in methanol, and acetic acid; insoluble in ethyl acetate, butyl acetate, ethyl ether, hexane, petroleum ether, benzene, and chloroform.
- 8) Thin layer chromatography on silica gel: Rf = 0.41 (n-butanol : acetic acid : pyridine : water = 4 : 1 : 1 : 2); Rf = 0.34 (n-butanol : acetic acid : pyridine : water = 30 : 6 : 20 : 24); Rf = 0.08 (n-butanol : acetic acid : ethyl acetate : water = 1 : 1 : 1 : 1).
- 9) Amino acid composition by amino acid analysis:
The amino acid content was determined after a sample was hydrolized with 6 N hydrochloric acid, except that the value marked (*) was determined after a sample was oxidized with performic acid, and hydrolized with 6 N hydrochloric acid, and cysteine was recovered as Cys-S0_3^{H.}
10) Elementary analysis:
1 The analysis was carried out after a sample was treated with Dowex I (in acetate form), and recovered as acetate.
11) Formation of salts: the a-hANP is a basic compound as described in item 6), and can form acid addition salts with an inorganic acid such as hydrochloric acid, sulfuric acid, phosphoric acid, or an organic acid such as formic acid, acetic acid, propionic acid, succinic acid, and citric acid.

Physiological Properties of a-hANP
The a-hANP according to the present invention has notable diuretic, natriuretic, and hypotensive or antihypertensive actions.
Test method:
- Male rats weighing 300 to 400 grams were anesthetized by intraperitoneal administration of pentobarbital at a dosage of 60 mg/kg, and used for tests of the a-hANP according to the method described in Life Sciences, Vol. 28, pp89-94.
To keep the respiratory tract open, a tracheal cannula (PE-240 Clay-Adams) was inserted into the trachea. An arterial cannula (PE-50) was inserted into a femonal artery for measurement of the blood pressure, and a venous cannula was inserted into a femonal vein for the administration of Ringer's solution. 1.2 ml of Ringer's solution was injected for ten minutes, and subsequently, was constantly infused at a flow rate of 1.2 ml/hour.
A bladder cannula made of silastic tube with an inner diameter of 0.02 inches and an outer diameter of 0.037 inches was inserted into the bladder, and via the cannula, a urine sample was collected into a test tube. The collection of urine was carried out for 30 minutes before administration of the test compound, and every five minutes after the administration.
A predetermined amount of the test compound a-hANP was dissolved in 50 µl of sterilized physiological saline with 5 µg of bacitracin, and the solution was injected into the jugular vein.
The amount of a-hANP administered was 0.1 n mole (group II), 0.2 n mole (group III), or 0.4 n mole (group IV). The control group (group I) was administered 50 pl of physiological saline containing only bacitracin. For comparison, group V received 50 µl of physiological saline containing bacitracin and 1.21 p mole of furosemide, which is a known natriuretic agent.
Groups I to IV each consisted of three animals, and group V consisted of four animals.
Test results:
- The results of the test are set forth in the following table.
As shown in the table, a-hANP shows notable diuretic and natriuretic actions. Namely, 0.4 n mole of a-hANP injected into the jugular vein of a rat provides diuretic and natriuretic action comparable to those provided by 1.21 p mole of furosemide, which is a known diuretic agent. 0.4 n mole of a-hANP gives about a 20-fold increase in the urination volume, and about a 27-fold increase in the sodium excretion. When a-hANP is not administrated, the Na/K ratio in urine is about 0.3, but when 0.4 n mole of a-hANP is administrated, this ratio rises to about 2.0, revealing that a-hANP is useful as a natriuretic agent.
Figure 1 shows comparisons between a-hANP and furosemide regarding changes in the urination volume, and the excretions of sodium cation, potassium cation, and chlorine anion after the administration of a-hANP or furosemide. As shown in the Figure, a-hANP causes diuretic and natriuretic actions more rapidly than furosemide. As shown in Figure 2, after 1.2 pg (0.4 n mole) of a-hANP is administered to a rat, the blood pressure is lowered by about 15 to 20 mmHg for about 45 minutes, revealing that a-hANP has a hypotensive action or antihypertensive action, and may be useful as a hypotensor.

Use of a-hANP as a pharmaceutical product
Repeated administration of a-hANP does not stimulate production of antibodies, and does not cause anaphylaxis shock. a-hANP consisting of L-amino acids is gradually hydrolized in a body providing the L-amino acids, and therefore shows little toxicity.
Due to the higher diuretic, natriuretic, and blood pressure-lowering or antihypertensive actions, and the lower toxicity, a-hANP is useful as an active ingredient for pharmaceutical compositions such as a diuretic and a hypotensor. a-hANP is administered at 1 ng/kg to 10 mg/kg, preferably 10 ng/kg to 1 mg/kg.
a-hANP can be administered in the same manner as conventional peptide type pharmaceuticals. Namely, a-hANP is preferably administered parenterally, for example, intravenously, intramuscularly, intraperitoneally, or subcutaneously. a-hANP, when administered orally, may be proteolytically hydrolyzed. Therefore, oral application is not usually effective. However, a-hANP can be administered orally as a formulation wherein a-hANP is not easily hydrolyzed in a digestive tract, such as liposome-microcapsules. a-hANP may be also administered in suppositorys, sublingual tablets, or intranasal spray.
The parenterally administered pharmaceutical composition is an aqueous solution containing about 0.000005 to 5%, preferably 0.00005 to 0.5% of a-hANP, which may contain, in addition to a-hANP as an active ingredient, for example, buffers such as phosphate, acetate, etc., osmotic pressure-adjusting agents such as sodium chloride, sucrose, and sorbitol, etc., antioxidative or antioxygenic agents, such as ascorbic acid or tochopherol and preservatives, such as antibiotics. The parenterally administered composition also may be a solution readily usable or in a lyophilized form which is dissolved in sterile water before administration.

Production of a-hANP
a-hANP can be produced by either the extraction of the a-hANP from human atrium or by chemical synthesis.
In the former process, human atrium is homogenized in an acidic aqueous solution such as a phosphate buffer solution, or an acetic acid solution containing hydrochloric acid. Subsequently, a-hANP is purified according to a conventional method suitable for the purification of peptide, such as centrifugation, isoelectric point precipitation, solvent extraction, ultrafiltration, gel filtration, adsorption chromatography or high performance liquid chromatography (HPLC), or a combination of such methods. In the above-mentioned methods, chicken rectum relaxation activity is conveniently used to select fractions containing a-hANP, because a-hANP has this activity. In the chromatography methods, the a-hANP containing fractions can be also selected by molecular weight (about 31000). Chemical synthesis is preferable for the industrial production of a-hANP, in which chemical synthesis, a liquid phase method or solid phase method, or a combination thereof can be used. The solid phase method such as Merrifield's method [R.B. Merrifield, J. Am. Chem. Soc. 85, 2148 (1963)1 is most convenient.
In Merrifield's method, each amino acid is protected preferably with tert-butyloxycarbonyl (Boc) at the a-amino group; a hydroxyl group in tyrosine is protected preferably with 2,6-dichlorobenzyl group (Cl_2Bz1); a guanidino group in arginine is protected preferably with a tosyl group (Tos); a hydroxyl group in serine is protected preferably with a benzyl group (Bzl); a a-carboxyl group in aspartic acid is protected preferably with an O-benzyl group (O-Bzl); and a thiol group in cysteine is protected preferably with an acetoamidomethyl group (Acm). In the Merrifield method, first a protected derivative of C-terminal amino acid L-tyrosin, i.e., Boc-Tyr (Cl_2Bz1) is introduced onto a solid phase resin carrier, such as chloromethyl-resin, and subsequently, each suitably protected amino acid is coupled to a terminal amino acid of an intermediate amino acid chain bonded to the resin, in the order of the amino acid sequence of a-hNNP. After all the amino acids are coupled in the predetermined order, the protected a-hANP thus obtained is removed from the resin by treatment with hydrogen fluoride, and simultaneously, protecting groups other than Acm are also removed. The product is then reduced to obtain Cys ^{7,23} (Acm) -α-hANP) which is then oxidized with iodine to remove the thiol-protecting group Acm, and simultaneously, to form a disulfide bond. The crude a-hANP thus obtained is then purified by conventional methods such as gel filtration, reverse phase HPLC, etc., to obtain purified a-hANP.

Examples
The present invention will now be further illustrated by, but is by no means limited to, the following examples.

Example 1 Preparation of a-hANP from human atrium cordis
Ten hours after death, 40 g of human atrium cordis was removed and boiled in seven volumes of 1 M acetic acid aqueous solution containing 20 mM hydrochloric acid for five minutes, to inactivate protease present in the atrium cordis. The boiled atrium cordis in the acetic acid solution was then cooled to 4°C, and homogenized with a Polytron homogenizer to extract the a-hANP. The homogenate thus obtained was centrifuged at 12000 XG for 30 minutes to obtain a supernatant. To the supernatant, acetone was dropwise added in an amount of 66% of the final concentration to precipitate impurities. The mixture thus obtained was centrifuged to obtain 424 ml of supernatant containing a-hANP, which was then evaporated to dryness. The residue thus obtained was dissolved in 1 N acetic acid, and the solution was extracted two times with 50 ml of ethyl ether-to defat the solution. The aqueous phase thus obtained was lyophilyzed, and the lyophilyzate was redissolved in 100 ml of 1 N acetic acid. The solution was then ultrafiltrated with a UM-2 filter (Amicon) to desalt the solution. The desalted solution was concentrated to 50 ml.
The concentrated solution was applied on SP-Sephadex C-25 column (Pharmacia, 8.0 x 22 cm). The elution was carried out with 1 N acetic acid, 2 N pyridine solution, and 2 N pyridine-1 N acetic acid solution (pH 5.0), in that order, to obtain fractions SP-I, SP-II, and SP-III. The fraction SP-III was lyophylized to obtain 26.6 mg of lyophylizate, which was then dissolved in 1 N acetic acid.
The solution thus obtained was gel-filtrated with Sephadex G-50 column (1.2 x 103 cm) at a flow rate of 5.4 ml/hour, collecting 2 ml of fractions. Thereby, g fractions (fractions No. 42 to 45) and a fractions (fractions No. 46 to 51) which have chicken rectum relaxation activity were obtained. The elution profile is shown in Figure 3. The a fractions were combined for further purification.
The combined fraction was then subjected to cation exchange HPLC in a TSK-CM3SW column (Toyo Soda). Elution was carried out by linear gradient with (A) 10 mM ammonium formate (pH 6.6)/acetonitrile (90:10) and (B) 1.0 M ammonium formate (pH 6.6)/acetonitrile (90:10), changing the concentration of formate from 10 mM to 0.5 M for 80 minutes. A set of fractions (No. 57 to 59) with chicken rectum relaxation activity was obtained. The active fractions were combined and subjected to reverse phase HPLC in a Chemcosorb 5 ODS H column (04.6 x 250 mm, Chemco). Elution was carried out with (A) water/acetonitrile/10% trifluoroacetic acid (90:10:1) and (B) water/acetonitrile/10% trifluoroacetic acid (40:60:1) as eluents wherein the eluent (A) was used for 8 minutes and then linear gradient from (A) to (B) was used for 80 minutes, at a flow rate of 1.0 ml/min., and pressure of 110 to 130 kg/cm^2. A main peak was collected and 30 µg of substantially pure a-hANP was obtained.

Example 2 Chemical synthesis of a-hANP

(1) Synthesis of aminoacyl resin (Boc-Tyr(Cl_2-Bzl)
To 3 g of chloromethyl resin with 0.92 m mole/g resin of chloro radical in 15 ml of dimethylformamide, 10 ml of solution of Boc-Tyr(Cl_2Bzl)-OH cesium salt in dimethylformamide was added with stirring. The cesium salt was prepared from 1.22 g (2.76 m mole) of Boc-Tyr(Cl_2Bzl)-OH and 0.90 g (2.76 m mole) of cesium carbonate. The mixture thus obtained was gently stirred at 50°C for 12 hours. The resin was filtered off, and washed with dimethylformamide, ethanol, water, ethanol, and methylen chloride in that order, and dried. The washed resin was then stirred with an excess amount of cesium acetate in dimethylformamide at 50°C for 24 hours to acetylate residual chloro radical which had not reacted with Boc-Tyr(Cl,Bzl)-OH, and then washed as described above. 3 g of Boc-Tyr . Resin containing 0.7 m mole/g resin of Boc-Tyr(Cl_2Bz1)-OH was obtained. The introduction rate was determined by the HF method and the HC1-propionic acid hydrolysis method.

(2) Synthesis of protected a-hANP-Resin
Each amino acid was protected with a Boc group at an a-amino group. A hydroxyl group in tyrosine was protected with a C1_2Bz1 group; a guanidino group in arginine was protected with a Tos group; a hydroxyl group in serine was protected with a Bzl group; a a-carboxyl group in aspartic acid was protected with an OBzl group; and a thiol group in cysteine was protected with an Acm group. Among these protecting groups, the Boc group is easily removed with 50% trifluoroacetic acid. Protecting groups other than the Boc group and Acm group are not removed with 50% trifluoroacetic acid, but removed with hydrogen fluoride. The Acm group is not removed with 50% fluoroacetic acid and hydrogen fluoride, but removed by oxidation with iodine, and simultaneously, a disulfide bond is formed.
Prior to coupling of an amino acid, a protecting group for the a-amino group of the terminal amino acid of the protected intermediate peptide bonded to the resin, i.e., the Boc group, has been removed to free the terminal a-amino group. The progression and completion of the Boc removing reaction were monitered with Kaiser's reagent (ninhydrin reagent).
After the protecting group was removed from the terminal a-amino group of the protected peptide bonded to the resin, the resulting free amino group was coupled with a free carboxyl group of a Boc-protected derivative of an amino acid positioned at the next position in the amino acid sequence of the a-hANP.
In the coupling reaction of the protected amino acid, the coupling reaction of the Boc-Asn-OH was carried out using 10 equivalents of Boc-Asn-OH for 40 hours according to the p-nitrophenol ester method. The coupling reaction of other protected amino acids was carried out using 6 equivalents of the protected amino acid and 6 equivalents of dicyclohexylcarbodiimide as a condensation reagent. If the coupling reaction was not complete after one operation of the above-mentioned procedure, the same procedure was repeated. If the coupling reaction was not complete after the procedure was repeated three times, the resin was treated with a solution of 10% acetic anhydride/pyridine (9:1) in methylene chloride to acethylate any unreacted amino group. Subsequently, the next coupling reaction was carried out. The progression and completion of the coupling reaction was monitored with Kaiser's reagent (ninhydrin reagent) as described above for the Boc group removing reaction.
By repeating the above-described procedure, starting with 3 g of Boc-Tyr(
Resin (0.70 m mole/q resin), b.b q of Boc-(1 to 28 of protected peptide) Resin was obtained. (3) Cut off from resin, deprotection and purification of peptide, and formation of disulfide bond
3 g of the protected peptide-Resin was wetted with 5 ml of anisole, treated with hydrogen fluoride at 0°C for 60 minutes, and an excess amount of the hydrogen fluoride was evaporated off. By the above-mentioned treatment, the protected peptide was cut off from the resin, and protecting groups other than the thiol protecting Acm group were removed. 200 ml of 1 N acetic acid was added to the mixture, and the mixture was stirred for 30 minutes and filtrated to remove the resin.
The filtrate was then washed with ethyl ether, adjusted to pH 8.0 with 5% ammonium hydroxyde, and reduced by incubation with 2.3 g of dithiothreitol at 37°C for 24 hours. The reduction reduced most of the Met (O) derivative, as confirmed with reverse HPLC. Moreover, O-peptide, which could be formed when a peptide containing Ser or Thr is treated with hydrogen fluoride, was reduced to a normal peptide.
The reaction mixture (about 300 ml) thus treated was then adsorbed to an Octa-Deca-Silica (ODS) column (<44 cm x 5 cm, Waters), the column was washed with water, and peptide was eluted with 60% acetonitrile to obtain 850 mg of inorganic-salts-free peptide. 650 mg of the peptide was purified by ion exchange chromatography with CM-Sepharose, wherein the peptide sample was applied to a CM-Sepharose column (∅1.5 cm x 45 cm) equilibrated with 50 mM ammonium acetate (pH 4.0), and eluted by linear gradient from 500 ml of 50 mM ammonium acetate (pH 4.0) to 500 ml of 0.5 M ammonium acetate (pH 7.0), to obtain a main peak. The eluate was passed through an ODS column (04 cm x 5 cm), to desalt the eluate, and lyophilized to obtain 127 mg (dry weight) of roughly pure peptide ^{7,23}Cys(Acm)-α-hANP.
50 mg (dry weight) of the ^{7'23}Cys(Acm)-α-hANP in 60 ml of acetic acid and 1.6 ml of water was then added all at once to a solution of 170 mg of iodine in 40 ml of acetic acid, 18 ml of water and 80 ul of 1 N hydrochloric acid, and the mixture was vigorously stirred. After ten minutes, L-ascorbic acid buffer solution was added to the mixture until the reaction mixture became clear. The mixture was then diluted with water to ten volumes, passed through an ODS column (∅4 cm x 5 cm) to desalt the mixture, and lyophylized to obtain 30.2 mg (dry weight) of a lyophylizate comprising a-hANP, ^{7,23}Cys(Acm)-α-hANP, and Met(O)-^{7,23}Cys(Acm)-α-hANP at a ratio of 3:1:1.
17.3 mg of the lyophilizate was separated into the above-mentioned three components by cation exchange HPLC using a TSK-CM2SW column (Toyo Soda), and 4.5 mg of a-hANP was obtained having a purity of about 95%. A profile of the HPLC is shown in Figure 4.

Example 3 Preparation of parenteral composition

A) Injection solution

Composition
a-hANP and sodium chloride were dissolved in sterile water, an ampule was filled with 5 ml of the solution, and the ampule was then sealed.

B) Lyophilizate
a-hANP and sorbitol were dissolved in 200 ml of sterile water, a vial was filled with 1 ml of the solution, and lyophilized, and the vial was then sealed.
The composition is dissolved in 5 ml of sterile water before parenteral administration.
1. A peptide a-hANP having the following formula: wherein ① and ② are directly bonded, Asp represents L-aspartic acid, Asn represents L-asparagine, Ala represents L-alanine, Arg represents L-arginine, Ile represents L-isoleucine, Gly represents glycine, Glu represents L-glutamic acid, Gln represents L-glutamine, Cys represents together with -S- 1/2 L-cystine, Ser represents L-serine, Tyr represents L-Tyrosine, Phe represents L-phenylalanine, Met represents L-methionine, and Leu represents L-leucine, and the amino acid chain has an amino-termical at the left end, and carboxy- terminal at the right end, and acid addition salt thereof.
2. A diuretic composition containing a peptide a-hANP having the following formula: or an acid addition salt thereof with a conventional pharmaceutical additive.
3. A diuretic composition according to claim 2, wherein the composition is a solution for parenteral administration and the conventional pharmaceutical additive is a buffer, an osmotic pressure adjusting agent or a preservative, or a combination thereof.
4. A diuretic composition according to claim 2, wherein the composition is a solution for parenteral administration and contains about 0.000005 to 5% of the a-hANP.
5. A diuretic composition according to claim 2, wherein the composition is in a lyophylized form.
6. A hypotensor composition containing a peptide a-hANP having the following formula: or an acid addition salt thereof with a conventional pharmaceutical additive.
7. A hypotensor composition according to claim 6, wherein the composition is a solution for parenteral administration and the additive is a buffer, an osmotic pressure adjusting agent or a preservative, or a combination thereof.
8. A hypotensor composition according to claim 6, wherein the composition is a solution for parenteral administration and contains about 0.000005 to 5% of the a-hANP.
9. A hypotensor composition according to claim 6, wherein the composition is in a lyophilized form.
10. A process for production of a peptide a-hANP having the following formula: and an acid addition salt thereof which comprises the following steps:
1) human atruim is homogenized in a acidic solution;
2) the homogenate is centrifugated to obtain a supernatant containing the a-hANP;
3) the a-hANP is separated from impurities to obtain the a-hANP in a substantially purified form, and optionally, the a-hANP is converted into acid addition salt thereof or acid addition salt into free a-hANP.
11. A process for production of a peptide a-hANP having the following formula: which comprises (a) the following steps:
(1) a protected peptide bonded to a solid resin carrier is prepared wherein the peptide has an amino acid sequence of a-hANP but without a disulfide bond;
(2) the solid resin carrier is removed from the peptide and the peptide is deprotected;
(3) the peptide is oxidized to form a disulfide bond between two cysteine residues to form a-hANP; and
(4) the a-hANP is isolated from a reaction mixture, and optionally, the a-hANP is converted into acid addition salt thereof or acid addition salt into free α-hANP, or (b) converting α-hANP as defined in claim 1 to an acid addition salt thereof; or (c) converting an acid addition salt of α-hANP as defined in claim 1 to the free base form.
12. A process for production of the peptide a-hANP according to claim 11, wherein the protected peptide bonded to the solid resin carrier is prepared by the following steps:
(a) L-tyrosine protected at its a-amino and hydroxyl groups is coupled with the solid resin carrier;
(b) the a-amino protecting group is removed to form a free a-amino group.
(c) an a-amino protected amino acid occurring at the next position in the peptide is coupled with the free a-amino group of the preceding step;
(d) the amino protected group is removed;
(e) steps (c) and (d) are repeated in order of amino acid sequence of the peptide a-hANP until a protected a-hANP without disulfide bond bonded to the solid resin is formed, wherein, in addition to the protection of a-amino group, the hydroxyl group in serine, guanidino group in arginine, B-carboxyl group in aspartic acid, and thiol group in cysteine are protected.
13. The medical use of α-hANP as defined in claim 1, or an acid addition salt thereof.