ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIROMKCYALTR............................
J
DIM360 (Ver 1.5 21 Nov 2005) - 1100000/0
1130316
EUROPEAN PATENT APPLICATION
A1
20010905
EP
01830111.9
20010219
it
en
en
NA200012
20000222
IT
20010905
200136
20010905
200136
7
7F 23G 7/12 A
7F 23G 5/44 B
7F 23G 5/02 B
de
Versorgungssystem für solide Polymer Brennstoffe für industrielle und/oder zivile Brennkammer
en
System for supplying solid polymeric combustible for industrial and/or civil combustors
fr
Système pour l'alimentation des combustibles polymères solides pour chambre de combustion civile et/ou industrielle
2
Migliaccio, Patrizia
03281310
Via Meucci 30
80028 Grumo Nevano, (NA)
IT
Migliaccio, Patrizia
Via Meucci 30
80028 Grumo Nevano, (NA)
IT
AT
BE
CH
CY
DE
DK
ES
FI
FR
GB
GR
IE
IT
LI
LU
MC
NL
PT
SE
TR
AL
LT
LV
MK
RO
SI
The present invention refers to a system and relative equipments for supplying polymeric solid fuel in combustors used for industrial and civil purposes.
The apparatus can use thermoplastic or thermosetting polymer and specific injectors with materials that can be supplied as continuous elements with a suitable size and shape.
Homogeneous or charged polymeric materials can be used. The charged type materials are doped with specific additives in order to optimise the combustion process enhancing the efficiency and minimizing the emission of polluting elements during combustion.
The main features of the present invention are
- use of plastic materials from recycling and/or from industrial scraps as continuous bars, continuous wire or as discrete element suitably thermoformed immediately before the device with a dedicated apparatus;
- easy interfacing to most industrial and civil combustion systems;
- best feed control of solid fuel relating to actual systems;
- reduction of pollutants produced during combustion.

STATE OF THE ART
In the recent years, industrial countries devoted particular attention to problems concerning the handling of polymeric wastes.
The specific chemical-physical characteristics aimed all the efforts of industrial operators to the recycling of such materials that in some cases can be considered as economical resource. In fact, recycled polymer can be used in energy production in different industrial and/or civil sectors as: cement factories, lime factories, paper factories, power station, incinerators, foundry district heating etc. In all cases, relating to different specific application, it is important to optimise the air/fuel ratio to increase the combustion efficiency and minimize pollutants in flue gas.
The control of the fuel flow rate is particularly difficult in actual systems mainly due to granulometric and morphologic characteristics of polymeric materials.

DESCRIPTION
The present invention refers to the device and related equipments for supplying a solid polymeric material used as fuel in most systems for energy production and/or for thermodestruction.
The device is designed to operate using of polymeric combustible coming from a specific production or from industrial scrap, plastic recycling after suitable pre-treatments.
The combustible, thermoplastic or thermosetting polymeric material, can be used as a continuous element of a suitable size and shape ( circular, square cross-section).
The continuous element, relating to operating regimes of the combustor and to chemico-physical characteristics of the material used, can be used or as discrete bars (of suitable length) or as continuous wire (in roll) or suitably thermoformed with a dedicated apparatus before the supply of the combustible to the device.
The feeding device of the polymeric combustible is made by specific injectors that are generally formed by two sections: the first one to feed the material, the second one to control the temperature and the physical state of the combustible.
The combustible flow rate to the combustion chamber, i.e. the feeding velocity is controlled by mechanical and/or pneumatic system.
The feeding device can utilise two type of combustible material:
- 1. Homogeneous (Fig. 1,a)
- 2. Charged (Fig. 1,b,c)

Homogeneous
The homogeneous material (fig. 1, a) is made by polymers of the same type or by a blend of different type with a chemical and/or a mechanical cohesion of polymer particles. This kind of material can be divided in two categories: thermoplastic or thermosetting.

Charged
The charged material can be produced by a homogeneous polymer adding a suitable amount of solid and/or liquid chemical compounds able to enhance the following combustion limiting the emission and the production of noxious compounds. The additives can be blended homogeneously in the polymer matrix (Fig. 1,b) or located in one or more cavities inside of the continuous element (Fig. 1 c).
The material, homogeneous or charged, of suitable size and shape is feed into combustion chamber by the devices illustrated in fig. 2 and fig. 3 referred as injector 1 (I1), and injector 2 (I2).
The injector I1 can be used with thermoplastic polymers obtaining a supply of the polymeric material to the combustor in plastic, liquid or gaseous state.
As shown in figure 2 the injector I1 is designed with a guide chamber (1) in order to obtain a suitable supply of the material to the nozzle; the feed of solid polymer is obtained by means the device (2). The injector I1 is equipped with the section (3) to control polymer temperature and hence for supplying to combustors the material in solid, or liquid or gaseous state in relation to the relative temperature level and optimising the combustion process. At the end of the section (3) is located a converging zone in which a suitable amount of liquid polymer, due to a higher temperature level, control the pneumatic sealing between the material and the injector. The complete pneumatic sealing and the pneumatic uncoupling between the combustion chamber and the injector is obtained by a security valve. This valve preserves the feeding device by possible over-pressure phenomena that can be produced in the combustion chamber (5).
The injector I2 can work with both solid or liquid polymer.
As shown in figure 3, the injector I2 has a guide chamber (6) with, at the end, a heating/cooling device (7) to control the combustible temperature.
The sealing between the combustible bar and the injection device is obtained by a suitable sealing system (8).
The injector type has to be optimised relating to specific combustor. In the following, explanatory examples are shown.

Example N°1

Bubbling Fluidised Bed Combustor, Circulating Fluidised Bed Combustor
Both injector types can be used with these combustors. Combustible temperature is controlled at a level in order to supply to the fluidised bed polymer droplets, by means the injector I1, or solid polymer, by means the injector 12. The material burns in contact with the powder at high temperature. In this case, in respect to actual feeding devices, a higher control of the polymer flow rates can be obtained, avoiding the undesired under/overfeeding of combustible to the combustor. This control can be obtained controlling the feeding velocity of solid polymer bar and optimising the nozzle size and shape in relation to process conditions.

Example N°2

Boiler Combustor
The injector I1 is used in this case. A gas of polymer is fed to the combustor. The nozzle temperature must be controlled at level so high to obtain the gasification of polymeric combustible. The mixing of this polymeric gas with the air allows to obtain a very controlled and efficient combustion with a very low production of combustion products. The polymeric flame can be activated for example by a driving-flame or by an electric igniter.
1. Device to supply polymeric material to combustor for energy production.
2. Device, claimed at n° 1, to supply plastic material to thermodestruction plants.
3. Supplying system, as described in previous claims, to supply thermoplastic polymer.
4. Supplying system, as described in previous claims, to supply thermosetting polymer.
5. Supplying system, as described in previous claims, to supply polymeric material as a continuous element of suitable size and shape.
6. Supplying system, as described in previous claims, to supply polymeric material as bars of suitable length, size and shape.
7. Supplying system, as described in previous claims, provided with a thermoforming device.
8. Supplying system, as described in previous claims, to supply polymeric material as continuous wire in roll.
9. Supplying system, as described in previous claims, using specific injectors to obtain a controlled supplying of polymeric combustible.
10. Injectors, as described in claims n° 9, with two different sections. First one to feed the continuous combustible elements and control the combustible flow rate; the second one to control the physic characteristics of polymeric combustible by means of the control of the operating temperature of the continuous elements.
11. Supplying system, as described in previous claims, to supply homogeneous and charged polymeric material.
12. Supplying system, as described in previous claims, to supply at combustion chambers homogeneous polymeric materials of similar chemical structure or blends of polymeric materials with a suitable chemical and/or a mechanical cohesion of polymer particles to form a continuous element.
13. Supplying system, as described in previous claims, to supply at combustion chambers charged polymeric material, i.e. homogeneous polymeric materials charged with solid or liquid compounds able to enhance the combustion and to limit the production of noxious compounds during combustion process.
14. Supplying system, as described in previous claims, to supply at combustion chambers charged polymeric material of thermoplastic type or thermosetting type.
15. Supplying system, as described in previous claims, that can be equipped by two different type of injectors: injector I1 and injector I2 respectively shown in figure 2 and figure 3.
16. Supplying system, as described in previous claim n° 15, that can use injector I1 with thermoplastic or thermosetting polymers.
17. Injector, as described in claims n° 15 and n° 16, that allows the supply of polymeric combustible in solid, liquid and gaseous phase.
18. Supplying system, as described in previous claim n° 15, that can use injector I2 with thermosetting polymers.
19. Injector, as described in claims n° 15 and n° 18, that allows the supply of polymeric combustible in liquid and gaseous phase.
20. Supplying system, as described in previous claims, that can be used to supply polymeric material to different type of combustor, i.e.: Bubbling Fluidised Bed Combustors, Circulating Fluidised Bed, Heating Boiler Combustors, Boiler Combustor for energy production.