ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIROMKCYALTRBGCZEEHUPLSK..HR............
J
DIM360 (Ver 1.5 21 Nov 2005) - 1100000/0
1630511
EUROPEAN PATENT APPLICATION
A1
20060301
EP
04255224.0
20040827
en
en
en
20060301
200609
20060301
200609
F28D 15/02 20060101AFI20050308BHEP
de
Verfahren zur Abdichtung von Wärmerohren
en
Method for sealing heat pipes
fr
Procédé de fermeture étanche des caloducs
5
Luo, Chin-Kuang
04221831
P021120EP WIL
5F, No. 56, Min-Chuan Road,Chung Dist.
Taichung City
TW
Luo, Chin-Kuang
5F, No. 56, Min-Chuan Road,Chung Dist.
Taichung City
TW
Illingworth-Law, William Illingworth
et al
00086037
D Young & Co 120 Holborn
London EC1N 2DY
GB
AT
BE
BG
CH
CY
CZ
DE
DK
EE
ES
FI
FR
GB
GR
HU
IE
IT
LI
LU
MC
NL
PL
PT
RO
SE
SI
SK
TR
AL
HR
LT
LV
MK
A method for sealing an open end of a heat pipe (100) includes the steps of pressing the open end of the heat pipe (100) to form a closed end (22) by using a pressing jig, and projecting a laser beam onto the closed end (22) so as to simultaneously cut and weld the closed end (22), thereby sealing the closed end (22) of the heat pipe (100).
The invention relates to a heat pipe, more particularly to a method for sealing a heat pipe.
Referring to Figures 1 to 4, a conventional method for producing a heat pipe 10 includes the steps of providing a metallic hollow body 11 with an open end portion 111 and an inner chamber, pouring a suitable amount of heat transfer liquid (not shown) into the hollow body 11, and evacuating and sealing the hollow body 11. The conventional method for sealing the heat pipe 10 includes the following steps:
- (A) Pressing the open end portion 111 of the hollow body 11 by using a pressing jig 2 so as to close the open end portion 111 and so as to form a flattened end portion 112;
- (B) Cutting a top end part 1121 of the flattened end portion 112 by means of a cutting machine 3; and
- (C) Sealing the heat pipe 10 by using a spot welding device. A welding spot, represented by numeral 12, is shown in Figure 4.
Although the conventional method for sealing the heat pipe 10 achieves its intendedpurpose using the aforesaid three steps, there is a need to provide a more simplified step in sealing the open end portion 111 of the heat pipe 10 so as to minimize working time and sealing cost.
Therefore, the object of the present invention is to provide a method for sealing an open end of a heat pipe via a simple operating procedure so as to minimize costs.
According to this invention, a method for sealing an open end of a heat pipe 100 comprises the steps of: (A) pressing the open end of the heat pipe 100 to form aclosedend22byusingapressingjig; and (B) projecting a laser beamonto the closed end 22 so as to simultaneously cut and weld the closed end 22, thereby sealing the closed end 22 of the heat pipe 100.
Other features and advantages of the present invention will become apparent in the following detailed description of the preferred embodiments with reference to the accompanying drawings, of which:
- Figure 1 is a fragmentary sectional view of a conventional heat pipe prior to pressing an open end portion thereof by means of a pressing jig;
- Figure 2 is another fragmentary sectional view of the conventional heat pipe, illustrating the pressing of the open end portion of the heat pipe by the pressing jig to form a flattened end portion;
- Figure 3 is yet another fragmentary sectional view of the conventional heat pipe, illustrating a top end part of the flattened end portion which has been cut by a cutting machine;
- Figure 4 is a further fragmentary sectional view of the conventional heat pipe, illustrating that the heat pipe has been sealed by spot welding;
- Figure 5 is a flow chart illustrating a method for seal ing an open end of a heat pipe according to the present invention;
- Figure 6 is a fragmentary perspective view of the heat pipe, with the open end being pressed to form a flattened end part;
- Figure 7 is the same view as Figure 6, showing the flattened end part after being bent; and
- Figure 8 is the same view as Figure 6, showing the flattened end part after being twisted.
Before the present invention is described in greater detail, it should be noted that like elements are denoted by the same reference numerals throughout the disclosure.
Referring to Figures 5 and 6, a method for sealing a heat pipe 100 according to the present invention is adapted to be applied to a hollow body 20 having an open end (not shown) . After the hollow body 20 is filled with a heat transfer fluid (not shown), it is evacuated. Since the filling and evacuating processes of the hollow body 20 of the heat pipe 100 are substantially similar to those of the conventional heat pipe 10, and since these processes are not pertinent to the present invention, a detailed description of the same will be dispensed herewith for the sake of brevity.
The method for sealing the heat pipe 100 comprises the steps 30 and 40 shown in Figure 5.
In step 30, after the hollow body 20 underwent the filling and evacuating processes, the open end of the hollow body 20 is pressed to form a closed end 22 by a pressing jig (not shown) so as to produce a flattened end part 220 (see Figure 6).
In step 40, a laser beam of a laser device (not shown) is projected onto an upper end 21 (see Figure 6) of the flattened end part 220 to simultaneously cut and weld the upper end 21, thereby sealing the closed end 22 of the hollow body 20 of the heat pipe 100.
It is noted that the conventional method for sealing the heat pipe 10 includes three steps that require three different kinds of processing devices, namely: pressing the open end portion 111 of the hollow body 11 by using the pressing jig 2 so as to form the flattened end portion 112; cutting the top end part 1121 of the flattened end portion 112 by using the cutting machine 3; and sealing the heat pipe 10 by using the spot welding device. The conventional method using these different processing devices to carry out the aforesaid steps is not only complicated, but is also time consuming.
Unlike the aforesaid conventional method for sealing the heat pipe 10, the method of the present invention utilizes two steps and two processing devices only, namely: pressing the open end (not shown) of the hollow body 20 to form the closed end 22 by using the pressing jig (not shown) so as to produce the flattened end part 220; and, projecting the laser beam of the laser device (not shown) onto the upper end 21 of the flattened end part 220 so as to simultaneously cut and weld the upper end 21, thereby sealing the closed end 22 of the heat pipe 100. Thus, the method for sealing the heat pipe 100 according to the present invention is simple and easy so that the working time can be saved and the sealing costs can be minimized.
Referring to Figure 7, the method for sealing the heat pipe 100 according to the present invention may further comprise the step of bending the flattened end part 220 of the hollow body 20 prior to cutting and welding the flattened end part 220 so as to form the heat pipe 100 with a bent end 221.
Alternatively, the method for sealing the heat pipe 100 according to the present invention may further comprise the step of twisting the flattened end part 220 of the hollow body 20 by using a self-rotating pressing jig (not shown) prior to cutting and welding the flattened end part 220 so as to form the heat pipe 100 with a twisted end 222, as shown in Figure 8.
1. A method for sealing an open end of a heat pipe (100), said method characterized by:
(A) pressing said open end of said heat pipe (100) to form a closed end (22) by using a pressing jig; and
(B) projecting a laser beam onto said closed end (22) so as to simultaneously cut and weld said closed end (22), thereby sealing said closed end (22) of said heat pipe (100).
2. The method as claimed in Claim 1, characterized in that in step (A), said open end of said heat pipe (100) is pressed to form a flattened end part (220).
3. The method as claimed in Claim 2, further characterized by bending said flattened end part (220) before step (B).
4. The method as claimed in Claim 2, further characterized by twisting said flattened end part (220) before step (B).