ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIROMKCYALTRBGCZEEHUPLSK..HRIS..MTNORS..SM..................
*
J
JDIM360 Ver 1.28 (29 Oct 2014) - 2999001/0
2507178
CORRECTED EUROPEAN PATENT SPECIFICATION
B9
B1
20150805
W1
de
Beschreibung
en
Description
fr
Description
EP
10834857.4
20101123
20120613
en
en
en
283234 P
20091201
US
924613
20100930
US
20150805
201532
20121010
201241
20150415
201516
20141105
20150805
201532
C12N 1/21 20060101AFI20130904BHEP
C02F 3/06 20060101ALI20130904BHEP
C02F 3/10 20060101ALI20130904BHEP
C02F 3/34 20060101ALI20130904BHEP
de
VERFAHREN UND VORRICHTUNG ZUM BIOLOGISCHEN ABBAU VON ABWASSERZUSAMMENSETZUNGEN
en
METHOD AND APPARATUS FOR THE BIO-REMEDIATION OF AQUEOUS WASTE COMPOSITIONS
fr
PROCEDE ET APPAREIL DE BIORESTAURATION DE COMPOSITIONS DE DECHETS AQUEUX
WO-A1-93/02971
US-A- 3 433 600
US-A- 4 814 125
US-A- 4 925 552
US-A- 5 217 616
US-A- 6 153 094
US-A- 6 159 365
US-A1- 2005 269 252
US-A1- 2006 163 149
US-A1- 2007 007 201
'What is Fungus, What are Fungi?' MEDICAL NEWS TODAY, [Online] 21 July 2009, Retrieved from the Internet: <URL:http://www.medicalnewstoday.com/articl es/158134.php> [retrieved on 2011-01-12]
20130910
GENCER, Mehmet A.
10988 Tanager Trail
Brecksville, Ohio 44141
US
ZAKRISKI, Paul M.
8329 Wyatt Road
Broadview Heights, Ohio 44147
US
LANGMACK, Clark B.
7060 Gates Road
Gates Mills, Ohio 44040
US
Imet Corporation
101252314
I 1170 WO EP
P.O. Box 470812
Cleveland, Ohio 44147
US
Mehler Achler
101270722
Patentanwälte Bahnhofstraße 67
65185 Wiesbaden
DE
AL
AT
BE
BG
CH
CY
CZ
DE
DK
EE
ES
FI
FR
GB
GR
HR
HU
IE
IS
IT
LI
LT
LU
LV
MC
MK
MT
NL
NO
PL
PT
RO
RS
SE
SI
SK
SM
TR
US2010003025
20101123
en
WO2011068526
20110609
201123
20121010
201241

FIELD OF THE INVENTION
The present invention relates to aerobic bio-remediation of waste compositions desirably in an aqueous environment so that they are converted or reacted into non-harmful and/or desirable end products. The conversion is generally carried out in reactors containing multiple and often numerous different types of packing substrates therein of various sizes, shapes, etc. to maximize dissolving of oxygen as from air into water. The substrates have very high surface areas and varying surface chemistries and physics to incorporate, bind, or attach a highly diverse and multiple microorganisms to effectively treat a maximum amount of different components of the wastewater as possible. An important aspect of the packing substrates is that they are highly porous and have numerous micro-pores therein to help maintain the microorganisms therein. The reactors have multiple stages to effectively treat or react different types of components of the aqueous waste compositions.

BACKGROUND OF THE INVENTION
Heretofore, waste treatment systems were generally specialized with regard to the decontamination, immobilization, etc, of narrow or specific types of compounds, and generally were not efficient.
U.S. Patent 4,810,385 relates to a device suitable for seeding bacterial cultures to waste flowing through or which has accumulated in a collection system which comprises a porous outer covering member which forms an enclosed package with a source of bacterial cultures contained within said package, said cultures suitable for seeding a collection system as a waste stream flows through the porous covering member of said enclosed package causing the bacteria to be released into said waste stream.
U.S. Patent 4,859,594 relates to a novel microorganisms separated from natural environments and purified and genetically modified, process for immobilizing these microorganisms by affixing then to substrates, the biocatalytic compositions formed by these microorganisms affixed to substrates, and the use of the biocatalytic compositions for the detoxification of toxin-polluted streams. The microorganisms are (1) Pseudomonas fluorescens (ATCC SD 904); (2) Pseudomonas fluorescens (ATCC SD 903); (3) Pseudomonas cepacia (ATCC SD 905); (4) Methylobacter rhodinum (ATCC 113-X); and (5) Methylobacter species (ATCC 16 138-X).
U.S. Patent 4,882,066 relates to compositions characterized as porous solids on the surfaces of which thin films of chitinous material are dispersed, and to a process employing chitin per se, and preferably the chitin coated compositions, supra, as contact masses for the removal of metals contaminants, or halogenated organic compounds, from liquid streams contaminated or polluted with these materials.
U.S. Patent 5,021,088 relates to a process for the separation and recovery from an ore of a metal, or metals, particularly strategic and precious metals, notably gold. A carbon-containing, gold-bearing ore, notably a carbonaceous or carbonaceous pyritic ore, is contacted and microbially pretreated and leached with a heterotrophic microorganism, or admixture of microoganisms, at heterotrophic conditions to cultivate and grow and said microorganism, or microorganisms, and reduce the carbon content of the ore by consumption of the carbon. The ore, as a result of the heterotrophic pretreatment is subsequently more advantageously colonized by an autotrophic microorganism, or microorganisms, at autotrophic conditions, or hydrometallurgically treated, or both, to facilitate, enhance and increase the amount of gold recovered vis-a-vis a process wherein the gold is recovered (1) by hydrometallurgical processing alone at otherwise similar conditions, or (2), in treating a pyritic ore, by the combination of the autotrophic/hydrometallurgical processing, at otherwise similar conditions.
U.S. Patent 5,211,848 relates to a continuous flow, immobilized cell reactor, and bioprocess, for the detoxification and degradation of volatile toxic organic compounds. The reactor is closed, and provided with biocatalysts constituted of specific adapted microbial strains immobilized and attached to an inert porous packing, or carrier. A contaminated groundwater, industrial or municipal waste, which is to be treated, is diluted sufficiently to achieve biologically acceptable toxicant concentrations, nutrients are added, and the pH and temperature are adjusted. The contaminated liquid is introduced as an influent to the closed reactor which is partitioned into two sections, or compartments. Air is sparged into the influent to the first compartment to mix with and oxygenate the influent with minimal stripping out of the toxic organic compounds. The second section, or compartment, is packed with the biocatalyst. The oxygenated liquid influent is passed through the second compartment substantially in plug flow, the biocatalyst biodegrading and chemically changing the toxic component, thereby detoxifying the influent. Non toxic gases, and excess air from the first compartment, if any, are removed through a condenser located in the overhead of the reactor. Liquids are recondensed back to the aqueous phase via the condenser.
U.S. Patent 5,240,598 relates to a microbubble generator is disclosed for optimizing the rate and amount of oxygen transfer to microbial inocula or biocatalysts in bioreactor systems. The microbubble generator, and an associated immobilized cell reactor, are useful in the detoxification and cleanup of non-volatile polymeric and volatile organic-contaminated aqueous streams. In particular, they are useful in the continuous mineralization and biodegradation of toxic organic compounds, including volatile organic compounds, associated with industrial and municipal effluents, emissions, and ground water and other aqueous discharges. One embodiment of the invention includes a microbubble chamber packed with small inert particles through which a liquid effluent and oxygen or another gas are admitted under pressure, followed by a venturi chamber to further reduce the size of bubbles.
U.S. Patent 5,403.487 relates to the biochemical oxidation of two wastewater feeds, one containing at least ten times more ammonia nitrogen, and the other at least ten times more chlorinated hydrocarbons, than present in a conventional municipal wastewater stream were treated in an aerated packed bed bioreactor inoculated with microorganisms ("cells") especially cultured and acclimated to the task. Arbitrarily shaped pieces of numerous microporous synthetic resinous materials (familiarly referred to as "porous plastics") supposedly provide not only a packing for the bioreactor, but also a peculiar catalytic function not normally associated with a bio-support.
U.S. Patent 5,534,143 relates to a microbubble generator is disclosed for optimizing the rate and amount of oxygen transfer to microbial inocula or biocatalysts in bioreactor systems. The microbubble generator, and an associated immobilized cell reactor, are useful in the detoxification and cleanup of non-volatile polymeric and volatile organic-contaminated aqueous streams. In particular, they are useful in the continuous mineralization and biodegradation of toxic organic compounds, including volatile organic compounds, associated with industrial and municipal effluents, emissions, and ground water and other aqueous discharges. One embodiment of the invention includes a microbubble chamber packed with small inert particles through which a liquid effluent and oxygen or another gas are admitted under pressure, followed by a venturi chamber to further reduce the size of bubbles.
U.S. Patent 5,569,634 relates to porous bodies produced which are suitable for use as supports for catalysts, including living cells, such as bacteria and which are upset resistant to acids and bases. The bodies have a significantly large average pore diameter of about 0.5 to 100 microns, (i.e. 5,000 to 1,000,000 .ANG.) and a total pore volume of about 0.1 to 1.5 cc/g with the large pores contributing a pore volume of from about 0.1 to 1.0 cc/g. The bodies are made by preparing a mixture of ultimate particles containing a zeolite and one or more optional ingredients such as inorganic binders, extrusion or forming aids, burnout agents, or a forming liquid, such as water.
U.S. Patent 5,747,311 relates to a method for chemically modifying a reactant using microbes. The method includes providing a particulate material which includes a plastic carrier and microbes attached to the carrier. The particulate material is dispersed in a dispersing fluid and has a specific gravity less than that of the dispersing fluid. When the microbe is anaerobic the particulate material has an operating interfacial surface area of from about 2,000 to about 240,000 square meters per cubic meter of reactor volume. When the microbe is aerobic the particulate material has an operating interfacial surface area of from about 1,000 to about 30,000 square meters per cubic meter of reactor volume. The method further includes establishing a flow of the reactant through the particulate material effective to contact the reactant with the microbes for a time sufficient to chemically modify the reactant.
The article Carbon and Nitrogen Removal by Biomass Immobilized in Ceramic Carriers by I. Wojnowski-Baryla, et al., relates to an experiment conducted in a bioreactor with biomass immobilization in ceramic carriers. The influence of hydraulic retention time (HRT), carrier structure and intrinsic circulation rate on carbon and nitrogen removal from municipal wastewater were investigated. Two types of ceramic carriers were used at HRT 70, 60, 40, 30 min for carrier I, and 70, 60, 30, 15 min for carrier II, and at the circulation rate of 60, 40, and 20 dm^3 h^{-1}. The highest nitrogen removal efficiency was achieved in carrier II at 30 min of reaction. The carbon removal efficiency was similar for both carriers. An increase in internal circulation rate from 20 to 60 dm^3 h^{-1} enhanced nitrogen removal efficiency from 33.0 to 47.2% and decreased in the production of surplus sludge in carrier II.
The article The Biodegradation of Brewery Wastes in a Two-Stage Immobilized System by I. Wojnowski-Baryla, et al, relates to the investigation in a loop bioreactor, where biomass was immobilized in the ceramic carrier. The influence of the internal circulation rate on the biodegradation efficiency of brewery wastes by immobilized biomass and on production of surplus sludge was examined. The rates of the internal circulation were 12, 38, 50 dm^3 h^{-1}. The experiments were performed at constant loading rate of the carrier of 17.9 caused enhancement of the removal rate from 0.40 to 0.48 gCOD dm^3 h^{-1} and limitation of surplus sludge productivity from 0.67 to 0.27 g g^{-1} COD removed. The biodegradation rate of brewery wastes in a two-stage immobilized system was determined. The hydraulic retention time in this two-stage immobilized system was 6 h, which was enough to get a COD below 150 mg dm^{-3} in the effluent.
The international publication WO 93/02971 relates to a process for reducing the concentration of an organic pollutant such as phenol in an aqueous stream which comprises passing the stream through a bioreactor containing a plurality of biologically active particles comprising a hydrophobic polyurethane substrate having an effective amount of one or more aerobic microorganisms capable of metabolizing at least one of said organic materials on, in or on and in said substrate in the absence or in the substantial absence of a carbon absorbent.
The patent US 6,153,094 relates to a treatment system for the treatment of polluted water, wherein water is passed over polyurethane foam blocks, arranged in a heap so that air can circulate freely around the blocks. The blocks are so arranged that each block has a respective entry-means through which water can enter the block from above, and a respective drainage-means, whereby water can drain out from this respective block. A relationship between capillary sponge action of the treatment material and the constriction in the drainage-means is such as to cause a substantial residual volume of water to be retained in a lower zone of the interior of the block, without draining away, even when an upper zone of the block is dry. Patent US 6,159,365 relates to a method and apparatus for treating contaminated water, wherein contaminated natural water or industrial wastewater is treated to remove contaminants in a packaged modular treatment unit. The unit comprises an input tube, a separation compartment to separate solids, oil and grease in contaminated water, controlled openings and conduit means for distributing water, a fluidized bed reactor assembly containing at least one each of an aeration zone, an internal recirculation zone with portions of upward and downward flows comprising a fluidized bed zone, a clear effluent zone, a mixing/degassing zone and a filtration bed compartment, wherein the filtration bed compartment is hydraulically connected to the clear effluent zone and therein the fluidized bed contains sups pended viable biomass or a physico-chemical reagent admixture or mixture of said biomass and said physico-chemical reagent admixture.
Patent application US 2005/0269252 A1 relates to a water treatment apparatus comprising a first packed part being arranged in a packed region, a block of first biomembrane-deposited members are packed in the first packed part, a second packed part is arranged under the first packed part and a plurality of second biomembrane-deposited members are packed in the second packed part. The first biomembrane-deposited members press on the second biomembrane-deposited members from above, thereby preventing the second biomembrane-deposited members from moving into the first packed part.
Patent application US 2007/0007201 A1 relates to a packed bed reactor having a series of alternating layers of packing. First packing layer has open body packing elements randomly packed in a layer up to about 10 packing elements deep. A second packing layer has porous support elements of hydrophobic foam. The porous support elements are randomly packed up to about 10 porous support elements deep. Further, the packing elements of the first layer include substantially cylindrical shapes and the porous support elements of the second layer include substantially rectilinear shapes. In some embodiments, the second layer supports microbial organisms in a biological reactor, and the first layer of open body packing provides fluid flow spaces to facilitate fluid flow and distribution, mass transfer and to minimize channeling.
Patent US 4,925,552 relates to an arrangement for decontaminating water including at least one reactor comprising a plurality of treatment chambers oriented in series, each chamber including an upstream downcomer portion and a downstream column portion separated by a wall member. Fluid flow is provided between the downcomer portion and the column portion. The downcomer portion has a passage downwardly to a feed space and a bottom portion of the column portion of the chamber. The water then flows outwardly from the chamber into a next downstream chamber.
Patent US 5,217,616 relates to an apparatus and a process for reducing the concentration of a pollutant in a fluid stream which comprises passing the stream through a bioreactor containing a fixed biologically active biomass comprising an effective number of open or substantially open spaces in a plurality of biologically active bodies comprising a hydrophobic polyurethane substrate having an effective amount of one or more microorganisms capable of metabolizing at least one of the said pollutant on, in or on and in said substrate in the absence or in the substantial absence of an absorbent.
Patent US 3,433,600 relates to an apparatus for carrying out exothermic catalytic reactions, in which the main process fluid stream is passed downwards through a plurality of catalyst beds arranged in vertical series in a container. The hot process fluid stream is quenched to a lower temperature by injection of a cold quenched fluid between beds, by means of apparatus elements and structure including whirl vanes and baffles or curved whirl conduits which provide a circular motion during mixing and also divide the fluid streams into portions during mixing, so as to provide rapid mixing and uniform quench of the hot process fluid stream between catalyst beds.

SUMMARY OF THE INVENTION
Different reactors contain multiple reactor stages having multiple substrates that are microporous and possess high surface areas. Multiple different types of microorganisms are attached by a variety of different surface characteristics to the porous substrates. The substrates are desirably selected upon the basis of being able to maximize air into water to dissolve oxygen therein. Moreover, the reactor contains one or more chimneys that are perforated and further aid in dissolving oxygen (such as laterally) into the various reactor stages. The reactors are utilized to bio-remediate various aqueous waste compositions that contain various undesirable compounds such as nitrogen, sulfur, and the like.
In one embodiment of the invention an apparatus for the bio-remediation of an aqueous waste composition, comprising: a reactor having a plurality of bio-remediation stages therein; said reactor having multiple packing substrates having a high surface area, said substrates being porous and having micro-pores therein; said reactor having multiple types of different microorganisms, said microorganisms being attached to said packing substrates; said reactor having an inlet capable of admitting an aqueous waste composition to said reactor and said reactor having an inlet capable of admitting oxygen to said reactor; said reactor including at least one perforated chimney pipe in at least one of said bio-remediation stages; and said reactor having an outlet.
In another embodiment of the present invention a process for the aerobic bio-remediation of an aqueous waste composition comprising the steps of: supplying a reactor having multiple bio-remediation stages therein, said reactor also having multiple packing substrates having a high surface area, said packing substrates having micropores and a high porosity adding at least one peforated chimney to at least one of said bio-remediation stages; applying multiple microorganisms to said packing substrates; adding an aqueous waste composition to said reactor; adding air to said reactor and dissolving oxygen into said aqueous waste composition; and bio-remediating said aqueous waste composition with said microorganisms and purifying said aqueous waste composition.

BRIEF DESCRIPTION OF THE DRAWINGS
- Figure 1 is a cross-section elevation view of a treatment reactor in accordance with the present invention;
- Figure 2 is a cross-section elevation view of a ballast that can optionally be utilized in association with the reactors of the present invention;
- FIG. 3 is an elevation view of a chimney of the reactor of the present invention;
- FIG. 4 is an elevation view of a chimney of the reactor of the present invention showing packing therein;
- FIG. 5 is a cross-section elevation view of another treatment reactor of the present invention containing additional chimneys therein;
- FIG. 6 is a cross-section elevation view containing reactors within a tank;
- FIG. 7 is a cross-section elevation view of another treatment reactor of the present invention that contain no chimneys but utilizes a sump pump;
- FIGS. 8 and 9 are cross-section elevation views of a tank containing reactors of the present invention therein;
- FIGS. 10, 11, and 12 are cross-section elevation views showing a bio-remediation tank containing an aqueous waste composition where a reactor outside of the tank is utilized;
- FIGS. 13, 14, 15, 16, and 17 are cross-section elevation views of different bio-remediation embodiments of the present invention wherein two reactors are utilized and are located outside a tank containing an aqueous waste composition therein;
- FIGS 18 and 20 are cross-section elevation views showing additional bio-remediation embodiments of the present invention wherein five reactors are located within a tank containing an aqueous waste composition; and
- FIGS. 19 and 21 are a cross-section elevation view of further bio-remediation embodiments of the present invention wherein five reactors are located within an aqueous waste composition containing tank and one reactor is located outside of the tank.

DETAILED DESCRIPTION OF THE INVENTION
The waste compositions comprise numerous compounds, waste sources and materials that are treatable by aerobic remediation with various microorganisms in an aqueous environment with an oxygen source such as air. Anaerobic remediation is not part of the present invention. Waste compositions generally include industrial, residential, commercial, sewage, corrosive compounds, and the like.
The method and apparatus according to the present invention eliminates carbonaceous compounds, odors, noxious compounds, toxic compounds, compounds containing ammonia, ammonium, NO_2, NO_3, H_2S, bio-sludge, natural sources such as algae, and the like. More specifically, examples of industrial waste include hydrocarbons such as hexane, benzene, toluene, xylene, and the like, and alcohols such as ethanol, methanol, phenol, and the like, and nitrogen-containing chemicals such as ammonia, aniline, morphiline, and the like as well as waste from restaurants and food service operations that generally produce large amounts of fats, oils, and grease. Such compounds have and can block sewers, pipelines and the like. Examples of residential waste include dissolved sugar sources, waste food, fats, grease and oil, and the like and dissolved proteins, starches, and of course human excrement. Examples of commercial waste include dissolved sugar sources, waste food, fats, grease and oil and the like and dissolved proteins, starches and the like, as well as excrement from animals, for example, cows, horses, pigs, chickens, and the like. Examples of sewage include waste from any industrial, residential, and commercial sources that are of course piped to a municipal treating plant. Examples of corrosive compounds include sulfur-containing compounds such as H_2S and the like, and carbonate-containing compounds such as lime and soda and the like, nitrate-containing compounds such as vinegar, fertilizer and the like, food sources such as vinegar and the like, and chloride-containing compounds such as table salt and the like.
The microorganisms that are utilized in the bio-remediation of the above wastes generally work through several different mechanisms such as eradication, reaction therewith, formation of complexes, splitting of molecules, formation of new compounds such as carbon dioxide, water, sulfur dioxide, nitrites, nitrates, and nitrogen and the like. As noted above, preferably numerous and different types of microorganisms are utilized in the reactor so that a highly diverse microbial population exists to effectively treat most, and even all of the various types of the waste components found in the aqueous waste composition. Desirably, microorganisms are utilized that are found in nature such as in the soil, trees, ponds, lakes, streams, rivers, grains, plants, mold, spores, fungi, and the like. Microorganisms are generally defined as being cellular and being able to replicate without a host cell. One desired source of microorganisms are the various bacteria that are known to remediate various waste compositions. The different types of bacteria are numerous and known to the art and to the literature and thus include bacteria to biodegrade carbonaceous compounds such as pseudomonas species such as Pseudomonas vesicularis, Pseudomonas putida and Aeromonas hydrophila, Brevibacterium acetylicum, bacteria to biodegrade nitrogen-containing compounds such as Nitrobacter species such as Nitrobacter winogradskyi and Nitrosomonas species such as Nitrosomonas europaea and bacteria to biodegrade sulphur-contining compounds such as Thiobacillus species such as Thiobacillus denitrificans and the like. Other microorganisms include various fungi such as those that naturally exist in mushrooms, yeasts, and molds. Generally they lack chlorophyll, have a cell wall composed of polysaccarides, sometimes polypeptides, and chitin, and reproduce either sexually or asexually. Protozoa are simple microorganisms consisting of unicellular organisms that range in size from sub-microscopic to macroscopic. Types of protozoa include sarcomastigophora, labyrinthomorpha, apicomplexa, microspora, acetospora, myxozoa, and ciliophora. Preferably at least two or three, and even four or more different types of microorganism exist within the same bio-remediation stage of the apparatus of the present invention inasmuch as the same has been found to destroy, eradicate, eliminate, react with, the various carbonaceous compounds, various nitrogen containing compounds, various sulfur containing compounds, various toxic compounds, and the like.
In order to be effective, the various microorganisms have to be attached, contained, captured, bound, etc., by various substrates so that they are not washed away by the flow of the aqueous waste composition as it flows through a treating apparatus such as a reactor. In order to yield effective and efficient results, the packing substrates of the present invention have various desirable attributes. An important attribute is a high average surface area such as from at least about 100 square meters per cubic meter (M^2/M^3) and desirably at least about 500 M^2/M^3to about 1,000 M^2/M^3 and even 200,000 M^2/M^3 where M^2 is the surface area and M^3 is the volume. A more desirable range of the one or more high surface area packing substrates is from about 500 M^2/M^3 or 800 M^2/M^3 to about 10,000 M^2/M^3. At least one, and desirably a plurality of the bio-remediation stages contain two or three, or even four or more different types of packing substrates therein.
Another important attribute is that the substrate be porous and have a large number of pores therein. The average size of the pores are desirably small but sufficiently large enough to house one or more microorganisms including a colony of various microorganisms. The average pore size can vary over a wide range such as from at least about 1 micron to about 150 microns, or up to about 250 microns, and even up to about 500 microns. More desirable pore sizes range from about 4, or about 20, or about 30, or about 50 microns to about 75 microns or about 100 microns. The pores desirably exist not only on the surface of the substrate, but also in the interior thereof and entirely therethrough such that the substrate often has an "open pore structure".
As indicated above, another important attribute is that multiple microorganism, e.g. 2, 3, 4, 5, etc. be applied, attached, fixed, etc., to the packing substrate. Such binding can occur in a number of ways, modes, or surface characteristics such as physically or physico-chemically. Physical attachment can occur by the substrate having a rough surface to help mechanically secure the microorganisms thereto. Physico-chemical attachment can occur through dipolar interaction of the microorganisms to a substrate such as Vanderwalls forces and the like. Physico-chemical attachment can also occur through a cation or an anion microorganism portion respectively with an anionic or a cationic portion of the substrate attachment can also occur through polar or non-polar bonding. Similarly, ionic or non-ionic portions of the microorganism can be attached via ionic or non-ionic bonding. Silica (SiO_2) provides anionic surface characteristics while alumina (Al_2O_3) provides cationic surface characteristic. Ion exchange resins (cation, anion) can also be used to immobilize a variety of microorganisms utilizing anionic and cationic attractions. Similarly, hydrophobic portions of the microorganism can be attached to hydrophobic portion of the substrate or via a hydrophilic-hydrophilic alignment, etc. While polyethylene and Teflon provide hydrophobic surface characteristics acrylic polymer provides hydrophilic surface characteristics. The above attachment of the microorganisms to the porous substrates is such that the microorganisms are maintained in place throughout the bio-remediation process.
An important aspect of the present invention is that multiple and generally numerous different types of porous substrates are utilized within a single reactor. Substrates generally include minerals, carbon substrates, ceramic, metal substrates, polymers or plastics, and the like. Examples of various minerals include clay, diatomaceous earth, fuller's earth, titanium dioxide, zirconium dioxide, chromium oxide, zinc oxide, magnesia, boria, boron nitride, pumice, lava, including crushed lava, celite, slag, and the like. Examples of carbon substrates include charcoal, coal, pyrolized wood or wood chips, activated carbon and the like. Ceramics are generally silicates, alumina, mullite, and include brick, tile, terra cotta, porcelain, glasses of all types such as sodium glass and boron glass, porcelain enamels, refractories such as alumina, silicone carbide, boron carbide, and the like. Metal substrates include iron, nickel, cobalt, zinc, aluminum, and the like.
Polymers or plastics constitute another class of porous packing substrates and include homopolymers, copolymers, graph copolymers, and the like such as polystyrene or copolymers of styrene and/or α-methyl styrene and acrylonitrile, and copolymers of styrene/acrylonitrile (SAN), terpolymers of styrene, acrylonitrile and diene rubber (ABS), copolymers of styrene/acrylonitrile modified with acrylate elastomers (ASA), copolymers of styrene/acrylonitrile modified with ethylene/propylene/diene monomer (EPDM) rubber (ASE), and copolymers of styrene and maleic anhydride (SMA); polyolefins such as polyethylene and polypropylene; chlorinated polyvinyl chlorides (CPVC); polycarbonates (PC); thermoplastic polyesters (TPES) including polybutylene terephthalate (PBT), polyethylene terephthalate (PET), and aromatic polyesters; polyether-ester segmented copolymers, such as Hytrel* by DuPont Corp.; polyurethanes (PUR); miscible blends of polystyrenes and polyphenylene oxides (PPO), commercially available as Norel from General Electric Company; polyacetals (POM); polymers of acrylic acid, methacrylic acid, acrylic esters, and methacrylic esters; polyamide-imides; polyacrylonitriles; polyarylsulfones; polyester-carbonates; polyether-imides; polyether-ketones (PEK); polyether-ether-ketones (PEEK); polyalphaether ketones (PAEK); polyether sulfones; polyphenylene sulfides; polysulfones; polyethylenes; mixtures of polyethylenes and polypropylenes; nylons; anionic and cationic exchange resins, combinations of any of these polymers as well as recycled mixed plastics and the like.
The pH of the packing substrate can be important and can range from about 4 to about 10 and preferably from about 6.0 to about 8.
In order to achieve efficient and thorough bio-remediation of aqueous waste compositions, it is important that the above-noted aspects of the present invention be incorporated within the reactors. Moreover, it is an additional important aspect that the packing substrates be of a size, shape, and type so that it aids in dissolving a high amount of oxygen into the water such as at least an average of about 1 part by weight, desirably at least about 2 parts by weight, preferably from about 3 to about 8 parts by weight per million parts by weight of waste water.
With respect to the overall reactor design, the individual reactors can have various shapes and forms but desirably are elongated as in the form of a column or tower containing the packing substrate therein with the pores thereof containing multiple types of microorganisms. A variety of microorganisms in liquid form or dry form are obtained from commercial sources as well as natural sources are added either before or immediately after inserting into the treatment area. Microorganisms are also added into wastewater periodically when needed. The waste compositions contained in an aqueous environment are generally added near the bottom of the reactor with air generally being pumped in at the bottom of the reactor. The addition of air under slight pressure will naturally rise through the reactor and encounter the aqueous wastewater composition and cause the same to rise. The air-wastewater composition then encounters various stages of the reactor containing multiple types of packing substrate containing multiple types of microorganisms in the pores thereof. As note above, since high oxygen content is necessary for efficient operation of the reactor, packing substrates are chosen that provide good mixing of the air with water and thereby fuse the air into smaller bubbles and dissolve some of the oxygen within the water. Thus, substrates are chosen that form a tight packing with one another and have a high packing fraction, i.e. high volume, e.g. overall or exterior volume, of the substrates to the overall interior volume of at least one and preferably all of the bio-remediation stages of the reactor such as at least about 10%, desirably at least about 50%, and preferably about at least 95% by volume. High packing fraction also generally prevents the formation of channels that permit air to channel through the reactor and avoid good mixing. During the course of treatment of the aqueous waste compositions, the dissolved oxygen will aid or react with the microorganisms to eradicate, attack, react, complex, and otherwise transform the waste compositions into odorless, detoxified, non-harmful or desired end products.
Another aspect of the reactors utilized in the present invention is that due to the above-noted parameters, long resident times are generally obtained that permits the microorganisms to bio-remediate or treat the waste compositions in the water. Thus, resident times of from about 2 hours to about 48 hours and generally from about 6 hours to about 24 hours are desired.
Due to the utilization of one or more air input chambers, the utilization of multiple perforated separators or support trays and hence multiple treatment stages, the utilization of one or more aqueous waste composition feed inputs, multiple different types of porous substrates containing multiple types of microorganisms, numerous different types of reactors can be utilized. Accordingly, it is to be understood that the following description of different reactors only refer to a few of the possible many different types of reactors.
Reference is now made to the drawings wherein like names/numerals refer to like parts throughout. Referring to FIG. 1, reactor R can be of any shape having a cross-section thereof that can be square, rectangular, cylindrical, and the like. The reactor contains solid outer walls 11 that are made of a corrosive-free material such as stainless steel and plastics. The reactor generally has a bottom chamber 18 that receives air or oxygen-containing gas under a slight pressure. Air is admitted to the reactor via an air pump, not shown, that supplies air through air supply pipe or conduit 1 and into the top of the reactor through reactor air inlet pipe 5 that is made of a corrosion-resistant material such as stainless steel or plastic. Air inlet pipe 5 is solid except at the bottom portion thereof that has openings or perforations 24 that admits the pressurized air into air pressure chamber 18. Air inlet pipe 5 is connected to reactor bottom plate 19 through connection 20 that can be a mechanical fitting, a weld, or the like. When the air flows into chamber 18 that generally extends throughout the bottom portion of the reactor, since it is under pressure it is forced through microporous diffuser 16 that has tiny openings so that the air is admitted into aqueous waste composition chamber 17 in the form of tiny bubbles. Microporous diffusers are known to the art and to the literature and are commercially readily available.
Reactor R, that contains lift handle 8, can be inserted into any aqueous waste composition environment such as a pond, a holding tank, a sewage enclosure or other confined area. Reactor R can be free standing, that is, simply placed within the aqueous waste composition enclosure in which situation ballast can be added to the bottom portion of the reactor. FIG. 2 shows one type of ballast containing a corrosion-resistant bottom 34 have side walls or housing 32 that form an enclosure that contains a ballast material 33 such as concrete therein. The optional ballast can be secured to the bottom of reactor R as through bolts 31 or other fastening members. Alternatively, reactor R can optionally be attached to a support such as the wall of wastewater treatment tank through holding lug 7.
The aqueous waste composition is added to the reactor through wastewater inlet 21 that can be in the shape of an elbow having an opening at the other end thereof and optionally can be perforated. When placed in a tank containing an aqueous waste composition therein, the aqueous waste composition will flow into aqueous waste composition chamber 17 wherein it is mixed with air bubbles 10. The aqueous waste composition will be caused to flow upward through the reactor via drag forces due to forced air flow through the perforated air carrier pipe, chimney 9. That is, the concept of the reactor is a bottom input of air as well as the aqueous waste composition that is then caused to flow upward through various perforated separators 15A, 15B, 15C, etc., that have perforations 13 therein and thus through various stages of the reactor. The size of the various perforated openings in the separators is sufficient to allow air and water to flow therethrough but generally and desirably does not permit the packing substrates to pass therethrough. Figure 4 shows various substrates with high surface area are placed in perforated air, chimney pipe 9 to create tortuous paths for air bubbles improve dissolving oxygen into wastewater.
Perforated separator 15A is a diffuser that allows bubbles 10 of air in aqueous waste composition 17 to flow upward therethrough (flow arrows 25) thus providing an additional mixing of the aqueous waste composition and the air bubbles so that some of the oxygen in the air is dissolved into the water.
As noted above, an important aspect of the present invention is that a plurality of multiple perforated separators exist to create a plurality of bio-remediation stages throughout the reactor such as anywhere from 2 to about 10 and desirably from about 3 to about 5 stages. The area formed between perforated separators 15A, 15B, and 15C, are identified as chamber 15AA, 15BB, 15CC, etc. The chambers 15AA, 15BB, 15CC, etc., are filled with packing substrate 30 that although can be only one type of packing but preferably is a plurality of different packings. That is, while each chamber formed between the various separators may contain only one type of packing, it is highly preferred that a plurality of different types of packings exist within reactor R and that a plurality of different packings also exist within each chamber 15AA, 15BB, 15CC, 15DD, etc.
In accordance with the above-noted aspects of the present invention, chamber 15AA contains packing substrates that are efficient in mixing the air bubbles and water to dissolve the oxygen within the water. Packing substrate 30A in accordance with the aspects of the present invention has high surface area and a high amount of pores having sizes as noted above. Located within packing substrate 30A is at least one type of microorganism with the proviso that the entire reactor R contains a plurality of microorganisms, i.e. at least two and generally several types such as from about 2 to about 300. Numerous microorganisms are utilized so that the reactor is efficient with regard to eradicating, detoxifying, complexing, or otherwise treating the various different types of waste contained with the aqueous waste composition and thus produce a very efficient reactor.
Since bubbles 10 are lighter than the water, they flow upward through chamber 15AA and cause the aqueous waste composition to flow upward so that continuous mixing of the air and the waste composition occurs thereby continuously causing dissolving of some of the oxygen into the water. The upward flow of the aqueous waste composition through the packing substrates 30A causes the dissolved molecular components of the waste composition to eventually contact a microorganism contained within the pores of the substrate whereby the waste composition molecule is bio-remediated. The process of mixing the air bubbles with the aqueous waste stream, the dissolving of oxygen into the water, and the contacting of various molecular components of the waste composition with microorganisms is continuous within each chamber 15AA, chamber 15BB, chamber 15CC, etc. Thus overall, oxygen is dissolved into the water within each chamber and the amount of waste composition from one chamber to the next upper chamber is continuously reduced as the aqueous waste composition proceeds upwardly through the reactor. Because of the tortuous path that must be taken by the waste composition through the various packing beds and the inherent long residence time, the waste composition upon reaching the top of the reactor is essentially depleted of waste components. That is, the aqueous waste composition is purified so that only purified water is admitted from the top of the reactor through perforated top plate 6.
The various perforated separators 15B, 15C, 15D, can be the same or different than perforated separator 15A. Generally, the substrates contained within each chamber 15AA, 15BB, 15CC, can be different so that the various stages, i.e. chambers 15AA, 15BB, 15CC, etc., treat different components of the aqueous waste composition. Of course, the various chambers, inasmuch as they preferably contain multiple different types of packings, can still contain a packing that is similar or identical to that found in another chamber. With respect to the microorganisms, the same situation generally exists within each chamber. That is, while the entire reactor contains at least two different types of microorganisms, generally a plurality exists within each chamber and the different chambers can contain a plurality of different microorganisms that are different from the preceding or following chamber or contain some common microorganisms. In summary, the described reactor R shown in FIG. 1 constitutes a very efficient bio-remediation apparatus and process.
An optional but preferable aspect of the reactor of FIG. 1 is that it contains a chimney pipe 9 that has perforations 12 therein. Chimney pipe 9 can be located generally in the center of the reactor such as adjacent to input air pipe 5. In the embodiment of FIG. 1, there are two chimney pipes 9 located on either side of air pipe 5 with the chimney pipes being perforated 36 at the bottom thereof and also being perforated 36 at the top thereof at perforated top plate 6. Accordingly, air bubbles 10 and the aqueous waste composition can enter the bottom of chimney pipe 9 and flow upward through the pipe. That this upward flow that is not impeded by perforated separators 15A, 15B, 15C, etc., is important to producing continued circulation of the air and aqueous waste composition upward through the various chambers. Moreover, air bubbles within chimney pipe 9 exit therefrom into the various chambers and ensure additional mixing of the air with the aqueous waste composition and more importantly aid in diffusion of dissolved oxygen into the packed chambers of the apparatus from chimneys within the water.
FIGS. 3 and 4 relate to side elevation views of chimney 9. The chimney has a plurality of perforations therein generally indicated by reference numeral 12 as being oval shaped. However, the exact shape of perforations 12 can vary so long as it generally is large enough to permit air bubbles and the aqueous waste composition with dissolved oxygen therethrough but to inhibit the passage of packing substrates 30 therethrough, as shown in FIG. 11. The top and bottom of the chimneys contain perforations 36.
Another reactor of the present invention is shown in FIG. 5 that is very similar to FIG. 1 wherein like numbers represent like parts, and hence the various parts, composition, and process description thereof will not be repeated but rather is hereby fully incorporated by reference.
The reactor of FIG. 5 is different from FIG. 1 in that two additional chimney pipes 9 exist that are located laterally of the center chimney pipe 9. The additional chimney pipes are also perforated at their bottom 36 adjacent to separator 15A and at their top 36 adjacent to perforated top plate 6 so that air and aqueous waste composition can flow therethrough. As with the embodiment of FIG. 1, the additional chimneys serve to circulate air and aqueous wastewater throughout the various chambers 15AA, 15BB, 15CC, etc., to ensure further mixing of the air and water within the chambers and also to promote dissolving oxygen within the water, contact of the waste components with microorganisms, and the like.
The embodiment of FIG. 6 relates to use of two reactors each contained within a separate tank to treat aqueous waste compositions therein whereby the aqueous composition of the left tank overflows into the composition of the center tank which then over-flows into the right-hand tank and then out wastewater output line 3. More specifically, air pump 26 via air supply line 1 supplies air into the reactor of the left-hand tank as well as to the reactor of the center tank. The two tanks, independently, can be the same as the tanks described in FIG. 1 and FIG. 5. The operation of each separate tank is as set forth hereinabove with regard to FIGS. 1 and 5 and thus will not described for purposes of brevity but rather the above description thereof is fully incorporated by reference. Accordingly, each tank, independently, treats the aqueous waste composition within the tank and emits purified wastewater out of the top of the tank. Slowly the effluent within the left hand tank is cleaned and through an overflow pipe, is transferred to the center tank. Inasmuch as untreated aqueous waste composition is added through input pipe 2 to the left-hand tank, equilibrium is eventually reached. The effluent from the left tank that flows into the center tank is treated by the reactor in that tank and once again equilibrium is reached wherein the wastewater of the center tank has been bio-remediated such that the influent thereof is relatively pure. The effluent from the center tank is then overflowed into the right-hand tank where it can be discharged.
Another reactor which is not an embodiment of the invention is shown in FIG. 7. Accordingly, a great majority of the parts numbers in FIG. 7 are the same as in FIGS. 1 and 5 and thus the description of the parts as well as operation of the reactor of FIG. 7 are very similar to that of FIGS. 1 and 5 and hence will not be repeated but rather are hereby fully incorporated by reference with regard to the description as set forth in FIGS. 1 and 5. The reactor of FIG. 7 is different than the reactors in FIGS. 1 and 5 in that it does not contain any chimney pipes 9. Rather, sump pumps 29 pump the aqueous waste composition through wastewater inlet pipe 28 and subsequently through reactor inlet pipe 27 into aqueous wastewater composition chamber 17 where it mixes with incoming air bubbles from air pressure chamber 18. The reactor design of FIG. 7 is more efficient than the reactors set forth in FIGS. 1 and 5. Inasmuch as the reactor of FIG. 7 does not contain chimneys, flow of air and aqueous waste composition from chamber 17 will be forced to flow through the packing from chamber 15AA into chamber 15BB and subsequently into chamber 15CC, etc., and thus the residence time is prolonged. Longer residence time allows more air bubbles to be trapped by the packing substrates 30A, 30B, 30C, etc., to further enhance the level of dissolved oxygen, therefore bio-remediation. Thus, the effluent admitted from reactor of FIG. 7 is generally pure water.
FIGS. 8-20 relate to bio-remediation systems that utilize various reactors such as the types set forth in FIGS. 1, 5, and 7. All of the systems in FIGS. 8-20 contain various types of tanks that contain aqueous waste compositions that require remediation. Additional items include air pumps 26, sump pumps 29, optional nutritional and/or chemical feeding pumps 14 or essential nutritional or chemical feeding pump 35, and recirculation pumps 23. As should be apparent to those skilled in the art, the above combination of reactors, tanks, and various pumps result in a large number of systems that can be utilized all according to the present invention. For purposes of brevity, since the description of the various reactors have been described hereinabove, the components, operation and process thereof will not be repeated but rather is hereby fully incorporated by reference. As also should be apparent to those skilled in the art, FIGS. 8-20 relating to different bio-remediation systems can generally be described as flow diagrams that teach various combinations of the above-noted items of the present invention. Hence, a brief description of the various figures will be set forth. Such bio-remediation systems can generally be utilized in a large number of different applications such as industrial, commercial, municipal, and the like as noted hereinabove. Desirably the embodiments of FIGS. 6 and 8-15 can be used for septic tanks, grease interceptors, in lagoons, and ponds. The system set forth in FIG. 16 and 17 can be used to treat industrial wastewaters whereas the embodiments set forth in FIGS. 18-21 are well suited for use in wastewater treatment plant aeration basins, pump stations, lagoons, and ponds.
FIG. 8 relates to a treatment system very similar to FIG. 6 except that the reactors of FIG. 8 are those as set forth in FIG. 7, that is, i.e. no chimneys. Accordingly, air pump 26 pumps air through air line 1 into the left reactor and the center reactor of FIG. 8. Both the left tank and the center tank of FIG. 8 contain sump pumps 29 therein that force the aqueous waste composition fluid through pipeline 28 and through reactor inlet pipe 27 into the bottom of the reactor. Bio-remediation thus occurs as described in FIG. 7 and thus will not be repeated but rather is hereby fully incorporated by reference. As with FIG. 6, the aqueous waste composition such as fats, oils, or greases as from a restaurant is pumped into the left tank wherein it is bio-remediated by the FIG. 7-type reactor. A portion of the treated aqueous waste composition of the left tank then overflows into the center tank of FIG. 8 wherein it is further bio-remediated by the reactor therein. Subsequently, a continuous amount of overflow of the treated aqueous waste composition of the center tank overflows into the right-hand tank wherein it can be further treated or not treated and is subsequently passed through outlet wastewater line 3. An optional aspect of FIG. 8 as well as FIG. 6 is that a nutrient and/or chemical pump 14 can be utilized to pump various nutrients into the left-hand tank such as sodium bicarbonate or calcium carbonate solution to adjust alkalinity for nitrifiers to oxidize ammonia-containing substances to nitrite and nitrate so that nitrification and denitrification can be achieved. Alternatively, pump 14 can be utilized to supply various chemicals to the tank to further treat the waste compositions therein.
Referring to FIG. 9, the system thereof is similar to FIG. 8 except that instead of utilizing sump pumps 29 located within the tank, a portion of the aqueous waste composition in each tank is withdrawn from the tank and recirculated through external recirculation pump 23 and then to the bottom of the FIG. 7-type reactor.
Similar bio-remediation systems are shown in FIGS. 10, 11, and 12. As apparent from the flow diagrams, an aqueous waste composition is withdrawn from the tank by recirculation pump 23 and is fed via inlet pipe 28 to reactor inlet pipe 27 wherein it is bio-remediated. The reactor is of the type set forth in FIGS. 1 or 5 inasmuch as air is pumped into the reactor with the treated or bio-remediated waste composition being recirculated back into the tank via line 4. Optionally, nutrient or chemical compounds can be added to the reactor via pump 14. The system of FIG. 11 is similar to FIG. 10 except that additionally the tank contains a reactor of the type set forth in either FIGS. 1 or 5 and thus has an air pump 26 that feeds air via line 1 into the reactor. The bio-remediation system of FIG. 12 is similar to that of FIG. 11 except that sump pump 29 is utilized to pump the aqueous waste composition in the tank via pipe line 28 into the reactor inlet pipe 27.
The bio-remediation embodiments of FIGS. 13-15 are similar. In FIG. 13, aqueous waste compositions are withdrawn from the tank and via recirculation pump 23 are fed to a first reactor and after bio-remediation therein, the effluent waste composition is fed to the bottom of a second reactor. Both reactors are air fed. Thus, both reactors are of a type set forth in FIGS. 1 and 5. The treated waste composition is then transferred from the second tank via water return line 4 to the tank. The process continues until all the waste composition in the tank has been treated so that the remaining water meets acceptable government regulations, etc. An optional aspect of each FIGS. 13-15 is the utilization of a nutrient and/or chemical pump 14 to pump such compounds into the bottom of the first tank. The system of FIG. 14 is similar to that of FIG. 13 except that additionally, it contains an air pump type reactor as described in FIGS. 1 and 5 wherein through air pump 26 and feed line 1 the air is admitted to the reactor that is located within the tank. The embodiment of system of FIG. 15 is similar to that of FIG. 14 except that sump pump 29 is utilized to pump the waste composition through feed pipe 28 into the reactor inlet pipe 27. The remediation system of FIGS. 16 and 17 are similar to FIGS. 13 and 15, respectively, except that instead of recycling the treated waste composition from the second reactor back to the tank, it is merely transferred out of the upper portion of the second reactor through outlet pipe 3 to any desired location. This system is proposed for industrial wastewater treatment in which industrial wastewater will contain unusual combinations of chemicals, hydrocarbons requiring special microorganisms to biodegrade. In these systems different types of microorganisms and their mutants can be housed in bottom-fed upward-designed packed column reactor.
The bio-remediation system of FIGS. 18-21 is similar. In the system of FIG. 18, five reactors are contained in an elongated tank containing an aqueous waste composition. Air pump 26 feeds air into each of the five reactors that are of a type as set forth in either FIGS. 1 or 5. Input of the waste composition is through tank inlet line 2 and the treated aqueous wastewater exits through outlet line 3. Naturally, each of the five reactors draws the aqueous waste composition into the bottom of the reactor and expels purified wastewater through the top of the reactor. Since the flow of the aqueous wastewater composition is from the left to the right of the elongated tank, each successive reactor will further cleanse the wastewater until it is purified at the right side of the tank and expelled through outlet line 3. The bio-remediation system shown in FIG. 20 as apparent from the flow diagram thereof is similar to that of FIG. 18 except that sump pumps are utilized with respect to each reactor to transfer the waste composition into the bottom of the reactor via pipe 28 and into reactor inlet pipe 27. The bio-remediation system disclosed in FIG. 19 as apparent from the flow diagram thereof is similar to FIG. 18 except that a portion of the aqueous waste composition is transferred via recirculation pump 23 and pipe line 28 to inlet pipe 27 of a reactor. The reactor has air pumped therein via pump 26 and line 1 and thus the reactor is of a type as set forth in either FIGS. 1 or 5. After treatment in the reactor, the treated waste composition is recirculated back into the elongated tank. In this embodiment, once again nutrients or chemicals can be optionally added to the reactor via pump 14. The bio-remediation embodiment shown in FIG. 20 is very similar to that shown in FIG. 19 in that it includes a reactor located outside of the tank. However, in lieu of wastewater flow into the bottom of the reactors located within the tank, sump pumps 29 are utilized to feed the aqueous waste composition via inlet pipe 28 into reactor inlet pipe 27.
As should be apparent from FIGS. 8-21, numerous different types of bio-remediation systems exist according to the concepts of the present invention utilizing reactors having chimneys or reactors not having chimneys therein in association with various items such as sump pump, air pumps, nutrient pumps, additional reactors, and the like.
While in accordance with the patent statutes, the best mode and preferred embodiment have been set forth, the scope of the invention is not limited thereto, but rather by the scope of the attached claims.
1. An apparatus for the bio-remediation of an aqueous waste composition, comprising:
a reactor (R) having a plurality of bio-remediation stages therein;
said reactor (R) having multiple packing substrates (30A, 30B, 30C, 30D, 30E) having a high surface area, said substrates being porous and having micro-pores therein;
said reactor (R) having multiple types of different microorganisms, said microorganisms being attached to said packing substrates;
said reactor (R) having an inlet (21) capable of admitting an aqueous waste composition to said reactor (R) and said reactor having an inlet (5) capable of admitting oxygen to said reactor (R);
said reactor (R) including at least one perforated chimney pipe (9) in at least one of said bio-remediation stages; and
said reactor (R) having an outlet.
2. The apparatus of claim 1, wherein the average surface area of said multiple packing porous substrates (30A, 30B, 30C, 30D, 30E) is at least 100 square meters per cubic meter; and including at least one separator (15A, 15B, 15C, 15D, 15E) located between said bio-remediation stages, said separator having an average perforation size sufficient to allow air to pass therethrough but not said packing substrate.
3. The apparatus of claim 2, wherein said average surface area of said porous substrate (30A, 30B, 30C, 30D, 30E) is from at least 500 to 200,000 square meters per cubic meter; wherein at least one said bio-remediation stage has a packing fraction of said packing substrates of at least 50% by volume; wherein said packing substrates have an average pore size of from 1 micron to 500 microns; and wherein said reactor (R) has a plurality of different packing substrates; and
wherein said multiple different microorganisms are attached by a variety of different surface characteristics comprising mechanically, physico-chemically, polarly and/or non-polarly, ionically and/or non-ionically, hydrophobically and/or hydrophillically, or any combination thereof.
4. The apparatus of claim 3 , wherein the average surface area of said porous packing substrate (30A, 30B, 30C, 30D, 30E) is from 500 to 10,000 square meters per cubic meter; wherein at least one said bio-remediation stage has a packing fraction of said packing substrates of at least 95% by volume; wherein said packing substrates have an average pore size of from 20 micron to 75 microns; and wherein at least one of said bio-remediation stages has at least three different types of packing substrates, wherein at least one of said bio-remediation stages has at least three different types of microorganisms.
5. The apparatus of claim 2, wherein said porous substrate (30A, 30B, 30C, 30D, 30E) comprises a mineral, a carbon substance, a ceramic, a metal, a polymer or a plastic, or any combination thereof; and wherein said microorganism comprises a compound that is cellular and is able to replicate without a host cell.
6. The apparatus of claim 3, wherein said porous packing substrate (30A, 30B, 30C, 30D, 30E) comprises a mineral, a carbon substance, a ceramic, a metal, a polymer or a plastic, or any combination thereof; wherein said mineral substrate comprises diatomaceous earth, fuller's earth, titanium dioxide, zirconium dioxide, chromium oxide, zinc oxide, magnesia, boria, boron nitride, pumice, lava including crushed lava, celite, slag, or any combination thereof; wherein said carbon substrate comprises charcoal, coal, pyrolyze wood or wood chips, activated carbon, or any combination thereof; wherein said ceramic comprises silicate, alumina, mullite, brick, tile, terra cotta, porcelain, a glass such as sodium glass or boron glass, porcelain enamel, a refractory including alumina, silicon carbide, boron carbide, or any combination thereof; wherein said metal substrates comprise iron, nickel, cobalt, zinc, aluminum, or any combination thereof; and wherein said polymers and plastics comprise a homopolymer, a copolymer, or a graph copolymer, including polystyrene or copolymer of styrene and/or α-methyl styrene and acrylonitrile, copolymer of styrene/acrylonitrile (SAN), terpolymer of styrene, copolymer of acrylonitrile and diene rubber (ABS), copolymer of styrene/acrylonitrile modified with acrylate elastomer (ASA), copolymer of styrenelacryionitrile modified with ethylene/propylene/diene monomer (EPDM) rubber, and copolymer of styrene and maleic anhydride (SMA), polyolefin, polyethylene, polypropylene, chlorinated polyvinyl chloride (CPVC), polycarbonate (PC), thermoplastic aromatic polyester (TPES) including polybutylene terephthalate (PBT), polyethylene terephthalate (PET), polyether-ester segmented copolymer, polyurethane (PUR), miscible blends of polystyrene and polyphenylene oxide (PPO), polyacetal (POM), poly acrylic acid, polymethacrylic acid, acrylic ester, methacrylic ester, polyamide-imide, polyacrylonitrile, polyarylsulfone, polyester-carbonate, polyether-imide, polyether-ketone (PEK), polyether-ether-ketone (PEEK), polyalphaether ketone (PAEK), polyether sulfone, polyphenylene sulfide, polysulfone, polyethylene, mixture of polyethylene and polypropylene, nylon, anionic or cationic exchange resin, or any combination thereof; and wherein said microorganism comprises a bacteria, a fungi, or a protozoa, or any combination thereof.
7. The apparatus of claim 4, wherein said porous packing substrate (30A, 30B, 30C, 30D, 30E) comprises diatomaceous earth, lava including crushed lava, ceramic, microporous polystyrene, microporous polyethylene, microporous polypropylene, or any combination thereof; and wherein said microorganism comprises a pseudomonas species including Pseudomonas vesicularis, Pseudomonas putida and Aeromonas hydrophila, Brevibacterium acetylicum; Nitrobacter species including Nitrobacter winogradskyi; Nitrosomonas species including Nitrosomonas europaea; sulfur containing compound including Thiobacillus species or Thiobacillus denitrificans; a fungi that naturally exists in mushrooms, yeasts, and molds; or protozoa including sarcomastigophora, labyrinthomorpha, apicomplexa, microspora, acetospora, myxozoa, and ciliophora; or any combination thereof.
8. The apparatus of any of claims 1 or 2, wherein a mixture of said multiple microorganisms are attached to said multiple porous, high surface area packing substrates (30A, 30B, 30C, 30D, 30E) in a variety of modes comprising mechanically, physico-chemically, polarly and/or non-polarly, ionically and/or non-ionically, hydrophobically and/or hydrophillically, or any combination thereof.
9. A process for the aerobic bio-remediation of an aqueous waste composition comprising the steps of:
supplying a reactor (R) having multiple bio-remediation stages therein, said reactor also having multiple packing substrates (30A, 30B, 30C, 30D, 30E) having a high surface area, said packing substrates having micropores and a high porosity;
adding at least one perforated chimney (9) to at least one of said bio-remediation stages;
applying multiple microorganisms to said packing substrates;
adding an aqueous waste composition to said reactor (R);
adding air to said reactor (R) and dissolving oxygen into said aqueous waste composition; and
bio-remediating said aqueous waste composition with said microorganisms and purifying said aqueous waste composition.
10. A process according to claim 9, wherein said reactor (R) includes at least one separator (15A, 15B, 15C, 15D, 15E) located between said bio-remediation stages, said separator having an average perforation size sufficient to allow air to pass therethrough but not said packing substrate (30A, 30B, 30C, 30D, 30E); wherein at least one said bio-remediation stage has a packing fraction of said porous packing substrates of at least 50% by volume; wherein said reactor (R) has a plurality of different packing substrates.
11. A process according to claim 10, wherein at least one said bio-remediation stage has a packing fraction of said porous packing substrates (30A, 30B, 30C, 30D, 30E) of at least 95% by volume; wherein the average surface area of said multiple packing substrates is at least 100 square meters per cubic meter; wherein said packing substrates have an average pore size of from 1 micron to 500 microns; wherein said packing substrate aids in dissolving oxygen into said waste water and obtaining a dissolved oxygen content of at least one part by weight per million parts by weight of said waste composition; and
wherein said multiple different microorganisms are attached by a variety of different surface characteristics comprising mechanically, physico-chemically, polarly and/or non-polarly, ionically and/or non-ionically, hydrophobically and/or hydrophillically, or any combination thereof.
12. A process of claim 11, wherein said average surface area of said porous substrate (30A, 30B, 30C, 30D, 30E) is from about least 500 to 200,000 square per cubic meter; wherein said packing substrates have an average pore size of from 4 micron to 100 microns; and wherein the amount of dissolved oxygen is from 3 to 8 parts by weight per million parts by weight of said waste composition.
13. A process of claim 9, wherein said porous packing substrate (30A, 30B, 30C, 30D, 30E) comprises a mineral, a carbon substance, a ceramic, a metal, a polymer or a plastic, or any combination thereof; wherein said mineral substrate comprises diatomaceous earth, fuller's earth, titanium dioxide, zirconium dioxide, chromium oxide, zinc oxide, magnesia, boria, boron nitride, pumice, lava including crushed lava, celite, slag, or any combination thereof; wherein said carbon substrate comprises charcoal, coal, pyrolyze wood or wood chips, activated carbon, or any combination thereof; wherein said ceramic comprises silicate, alumina, mullite, brick, tile, terra cotta, porcelain, a glass such as sodium glass or boron glass, porcelain enamei, a refractory including alumina, silicon carbide, boron carbide, or any combination thereof; wherein said metal substrates comprise iron, nickel, cobalt, zinc, aluminum, or any combination thereof; and wherein said polymers and plastics comprise a homopolymer, a copolymer, or a graph copolymer, including polystyrene or copolymer of styrene and/or α-methyl styrene and acrylonitrile, copolymer of styrene/acrylonitrile (SAN), terpolymer of styrene, copolymer of acrylonitrile and diene rubber (ABS), copolymer of styrene/acrylonitrile modified with acrylate elastomer (ASA), copolymer of styrene/acrylonitrile modified with ethylene/propylene/diene monomer (EPDM) rubber, and-copolymer of styrene and maleic anhydride (SMA), polyolefin, polyethylene, polypropylene, chlorinated polyvinyl chloride (CPVC), polycarbonate (PC), thermoplastic aromatic polyester (TPES) including polybutylene terephthalate (PBT), polyethylene terephthalate (PET), polyether-ester segmented copolymer, polyurethane (PUR), miscible blends of polystyrene and polyphenylene oxide (PPO), polyacetal (POM), poly acrylic acid, polymethacrylic acid, acrylic ester, methacrylic ester, polyamide-imide, polyacrylonitrile, polyarylsulfone, polyester-carbonate, polyether-imide, polyether-ketone (PEK), polyether-ether-ketone (PEEK), polyalphaether ketone (PAEK), polyether sulfone, poiyphenyiene sulfide, polysulfone, polyethylene, mixture of polyethylene and polypropylene, nylon, anionic or cationic exchange resin, or any combination thereof; and wherein said microorganism comprises a bacteria, a fungi, or a protozoa, or any combination thereof.
14. A process of claim 11, wherein said porous packing substrate (30A, 30B, 30C, 30D, 30E) comprises diatomaceous earth, lava including crushed lava, a ceramic, microporous polystyrene, microporous polyethylene, microporous polypropylene, or any combination thereof; and wherein said microorganism comprises a pseudomonas species including Pseudomonas vesicularis, Pseudomonas putida and Aeromonas hydrophila, Brevibacterium acetylicum; Nitrobacter species including Nitrobacter winogradskyi; Nitrosomonas species including Nitrosomonas europaea; sulfur containing compound including Thiobacillus species or Thiobacillus denitrificans; a fungi that naturally exists in mushrooms, yeasts, and molds; or protozoa including sarcomastigophora, labyrinthomorpha, apicomplexa, microspora, acetospora, myxozoa, and ciliophora; or any combination thereof.
15. A process of any of claims 9 or 13, wherein a mixture of said multiple microorganisms are attached to said multiple porous, high surface area packing substrates (30A, 30B, 30C, 30D, 30E) in a variety of modes comprising mechanically, physico-chemically, polarly and/or non-polarly, ionically and/or non-ionically, hydrophobically and/or hydrophillically, or any combination thereof.
1. Vorrichtung zur Bioremediation einer wässrigen Abfallzusammensetzung, mit:
einem Reaktor (R) mit mehreren darin angeordneten Bioremediationsstufen,
wobei der Reaktor (R) mehrere Füllsubstrate (30A, 30B, 30C, 30D, 30E) mit einer großen Oberfläche aufweist, wobei die Substrate porös sind und Mikroporen aufweisen,
wobei der Reaktor (R) mehrere Arten verschiedener Mikroorganismen enthält, wobei die Mikroorganismen an den Füllsubstraten befestigt sind,
wobei der Reaktor (R) einen Einlass (21) aufweist, der dazu geeignet ist, dem Reaktor (R) eine wässrige Abfallzusammensetzung zuzuführen, und wobei der Reaktor einen Einlass (5) aufweist, der dazu geeignet ist, dem Reaktor (R) Sauerstoff zuzuführen,
wobei der Reaktor (R) mindestens ein perforiertes Kaminrohr (9) in mindestens einer der Bioremediationsstufen aufweist, und
wobei der Reaktor (R) einen Auslass aufweist.
2. Vorrichtung nach Anspruch 1, wobei die mittlere Oberfläche der mehreren porösen Füllsubstrate (30A, 30B, 30C, 30D, 30E) mindestens 100 Quadratmeter pro Kubikmeter beträgt, und mit mindestens einer zwischen den Bioremediationsstufen angeordneten Trenneinrichtung (15A, 15B, 15C, 15D, 15E), wobei die Trenneinrichtung eine mittlere Perforierungsgröße hat, die ausreicht, um Luft durch die Perforierungen passieren zu lassen, nicht aber das Füllsubstrat.
3. Vorrichtung nach Anspruch 2, wobei die mittlere Oberfläche des porösen Substrats (30A, 30B, 30C, 30D, 30E) im Bereich von mindestens 500 bis 200.000 Quadratmeter pro Kubikmeter liegt, wobei mindestens eine der Bioremediationsstufen einen Füllanteil der Füllsubstrate von mindestens 50 Volumen-% hat, wobei die Füllsubstrate eine mittlere Porengröße von 1 µm bis 500 µm haben, und wobei der Reaktor mehrere verschiedene Füllsubstrate aufweist, und
wobei die mehreren verschiedenen Mikroorganismen basierend auf einer Vielzahl verschiedener Oberflächeneigenschaften befestigt sind, die mechanische, physikalisch-chemische, polare und/oder unpolare, ionische und/oder nichtionische, hydrophobe und/oder hydrophile Eigenschaften oder eine beliebige Kombination davon beinhalten.
4. Vorrichtung nach Anspruch 3, wobei die mittlere Oberfläche des porösen Füllsubstrats (30A, 30B, 30C, 30D, 30E) im Bereich von 500 bis 10.000 Quadratmeter pro Kubikmeter liegt, wobei mindestens eine der Bioremediationsstufen einen Füllanteil der Füllsubstrate von mindestens 95 Volumen-% aufwist, wobei die Füllsubstrate eine mittlere Porengröße von 20 µm bis 75 µm haben, und wobei mindestens eine der Bioremediationsstufen mindestens drei verschiedene Arten von Füllsubstraten aufweist, und wobei mindestens eine der Bioremediationsstufen mindestens drei verschiedene Arten von Mikroorganismen aufweist.
5. Vorrichtung nach Anspruch 2, wobei das poröse Substrat (30A, 30B, 30C, 30D, 30E) ein Mineral, eine Kohlenstoffsubstanz, ein Keramikmaterial, ein Metall, ein Polymer oder einen Kunststoff oder eine beliebige Kombination davon aufweist, und wobei der Mikroorganismus eine Verbindung aufweist, die zellulär und in der Lage ist, sich ohne eine Wirtszelle zu reproduzieren.
6. Vorrichtung nach Anspruch 3, wobei das poröse Füllsubstrat (30A, 30B, 30C, 30D, 30E) ein Mineral, eine Kohlenstoffsubstanz, ein Keramikmaterial, ein Metall, ein Polymer oder einen Kunststoff oder eine beliebige Kombination davon aufweist, wobei das Mineralsubstrat Diatomeenerde, Fullererde, Titandioxid, Zirconiumdioxid, Chromoxid, Zinkoxid, Magnesiumoxid, Boroxid, Bornitrid, Bimsstein, Lava einschließlich Lavagrus, Kieselgur, Schlacke oder eine beliebige Kombination davon aufweist, wobei das Kohlenstoffsubstrat Holzkohle, Steinkohle, pyrolysiertes Holz oder Holzspäne, Aktivkohle oder eine beliebige Kombination davon aufweist, wobei das Keramikmaterial Silikat, Aluminiumoxid, Mullit, Backstein, Ziegel, Terrakotta, Porzellan, ein Glas, wie beispielsweise Natronglas oder Borglas, Emaille, ein Feuerfestmaterial wie Aluminiumoxid, Siliciumcarbid, Borcarbid oder eine beliebige Kombination davon aufweist, wobei die Metallsubstrate Eisen, Nickel, Kobalt, Zink, Aluminium oder eine Kombination davon aufweisen, und wobei die Polymere und Kunststoffe ein Homopolymer, ein Copolymer oder ein Graph-Copolymer, einschließlich Polystyrol oder ein Copolymer von Styrol und/oder α-Methylstyrol und Acrylnitril, ein Copolymer von Styrol/Acrylnitril (SAN), ein Terpolymer von Styrol, ein Copolymer von Acrylnitril und Dien-Kautschuk (ABS), ein Copolymer von Styrol/Acrylnitril, modifiziert mit Acrylatelastomer (ASA), ein Copolymer von Styrol/Acrylnitril, modifiziert mit Ethylen/Propylen/Dien-Monomer- (EPDM) Kautschuk und ein Copolymer von Styrol und Maleinsäureanhydrid (SMA), Polyolefin, Polyethylen, Polypropylen, chloriertes Polyvinylchlorid (CPVC), Polycarbonat (PC), thermoplastisches aromatisches Polyester (TPE), wie beispielsweise Polybutylenterephthalat (PBT), Polyethylenterephthalat (PET), segmentiertes Polyether-Ester-Copolymer, Polyurethan (PUR), mischbare Blends von Polystyrol und Polyphenylenoxid (PPO), Polyacetal (POM), Polyacrylsäure, Polymethacrylsäure, Acrylester, Methacrylester, Polyamidimid, Polyacrylnitril, Polyarylsulfon, Polyestercarbonat, Polyetherimid, Polyetherketon (PEK), Polyetheretherketon (PEEK), Polyalphaetherketon (PAEK), Polyethersulfon, Polyphenylensulfid, Polysulfon, Polyethylen, eine Mischung aus Polyethylen und Polypropylen, Nylon, anionisches oder kationisches Austauschharz oder eine Kombination davon aufweisen, und wobei der Mikroorganismus ein Bakterium, einen Pilz oder ein Protozoon oder eine beliebige Kombination davon aufweist.
7. Vorrichtung nach Anspruch 4, wobei das poröse Füllsubstrat (30A, 30B, 30C, 30D, 30E) Diatomeenerde, Lava einschließlich Lavagrus, ein Keramikmaterial, mikroporöses Polystyrol, mikroporöses Polyethylen, mikroporöses Polypropylen oder eine Kombination davon aufweist, und wobei der Mikroorganismus eine Pseudomonas-Spezies wie Pseudomonas vesicularis, Pseudomonas putida und Aeromonas hydrophila, Brevibacterium acetylicum, eine Nitrobacter-Spezies wie Nitrobacter winogradskyi, eine Nitrosomonas-Spezies wie Nitrosomonas europaea, eine schwefelhaltige Verbindung wie eine Thiobacillus-Spezies oder Thiobacillus denitrificans, einen Fungus, der in Pilzen, Hefen und Schimmelpilzen natürlich vorkommt, oder Protozoen wie Sarcomastigophora, Labyrinthomorpha, Apicomplexa, Microspora, Acetospora, Myxozoa und Ciliophora oder eine Kombination davon aufweist.
8. Vorrichtung nach Anspruch 1 oder 2, wobei eine Mischung aus den mehreren Mikroorganismen an den mehreren porösen Füllsubstraten (30A, 30B, 30C, 30D, 30E) mit großer Oberfläche in vielfältiger Weise befestigt ist, einschließlich mechanisch, physikalisch-chemisch, polar und/oder unpolar, ionisch und/oder nichtionisch, hydrophob und/oder hydrophil oder eine Kombination davon.
9. Verfahren zur aeroben Bioremediation einer wässrigen Abfallzusammensetzung, mit den Schritten:
Bereitstellen eines Reaktors (R) mit mehreren Bioremediationsstufen, wobei der Reaktor außerdem mehrere Füllsubstrate (30A, 30B, 30C, 30D, 30E) mit einer großen Oberfläche aufweist, wobei die Füllsubstrate Mikroporen und eine hohe Porosität aufweisen;
Hinzufügen mindestens eines perforierten Kamins (9) zu mindestens einer der Bioremediationsstufen;
Zuführen mehrerer Mikroorganismen zu den Füllsubstraten;
Zuführen einer wässrigen Abfallzusammensetzung zum Reaktor (R);
Zuführen von Luft zum Reaktor (R) und Lösen von Sauerstoff in der wässrigen Abfallzusammensetzung; und
biologisches Sanieren der wässrigen Abfallzusammensetzung durch die Mikroorganismen und Reinigen der wässrigen Abfallzusammensetzung.
10. Verfahren nach Anspruch 9, wobei der Reaktor (R) mindestens eine zwischen den Bioremediationsstufen angeordnete Trenneinrichtung (15A, 15B, 15C, 15D, 15E) aufweist, wobei die Trenneinrichtung eine mittlere Perforierungsgröße hat, die ausreichend ist, Luft durch die Perforierungen passieren zu lassen, nicht aber die Füllsubstrate (30A, 30B, 30C, 30D, 30E), wobei mindestens eine der Bioremediationsstufen einen Füllanteil der porösen Füllsubstrate von mindestens 50 Volumen-% aufweist, und wobei der Reaktor (R) mehrere verschiedene Füllsubstrate aufweist.
11. Verfahren nach Anspruch 10, wobei mindestens eine der Bioremediationsstufen einen Füllanteil der porösen Füllsubstrate (30A, 30B, 30C, 30D, 30E) von mindestens 95 Volumen-% aufweist, wobei die mittlere Oberfläche der mehreren Füllsubstrate mindestens 100 Quadratmeter pro Kubikmeter beträgt, wobei die Füllsubstrate eine mittlere Porengröße von 1 µm bis 500 µm haben, und wobei das Füllsubstrat dazu beiträgt, Sauerstoff in der wässrigen Abfallzusammensetzung zu lösen und einen gelösten Sauerstoffgehalt von wenigstens einem Gewichtsteil pro einer Million Gewichtsteilen der Abfallzusammensetzung zu erhalten, und
wobei die mehreren verschiedenen Mikroorganismen durch mehrere verschiedene Oberflächeneigenschaften befestigt sind, die mechanische, physikalisch-chemische, polare und/oder unpolare, ionische und/oder nichtionische, hydrophobe und/oder hydrophile Eigenschaften oder eine beliebige Kombination davon beinhalten.
12. Verfahren nach Anspruch 11, wobei die mittlere Oberfläche des porösen Substrats (30A, 30B, 30C, 30D, 30E) im Bereich von mindestens 500 bis 200.000 Quadratmeter pro Kubikmeter liegt, wobei die Füllsubstrate eine mittlere Porengröße von 4 µm bis 100 µm haben, und wobei die Menge des gelösten Sauerstoffs 3 bis 8 Gewichtsteile pro einer Million Gewichtsteilen der Abfallzusammensetzung beträgt.
13. Verfahren nach Anspruch 9, wobei das poröse Füllsubstrat (30A, 30B, 30C, 30D, 30E) ein Mineral, eine Kohlenstoffsubstanz, ein Keramikmaterial, ein Metall, ein Polymer oder einen Kunststoff oder eine beliebige Kombination davon aufweist, wobei das Mineralsubstrat Diatomeenerde, Fullererde, Titandioxid, Zirkondioxid, Chromoxid, Zinkoxid, Magnesiumoxid, Boroxid, Bornitrid, Bimsstein, Lava einschließlich Lavagrus, Celite, Schlacke oder eine beliebige Kombination davon aufweist, wobei das Kohlenstoffsubstrat Holzkohle, Steinkohle, pyrolysiertes Holz oder Holzspäne, Aktivkohle oder eine beliebige Kombination davon aufweist, wobei das Keramikmaterial Silikat, Aluminiumoxid, Mullit, Backstein, Ziegel, Terrakotta, Porzellan, ein Glas, wie beispielsweise Natronglas oder Borglas, Emaille, ein Feuerfestmaterial wie Aluminiumoxid, Siliciumcarbid, Borcarbid oder eine beliebige Kombination davon aufweist, wobei die Metallsubstrate Eisen, Nickel, Kobalt, Zink, Aluminium oder eine Kombination davon aufweisen, und wobei die Polymere und Kunststoffe ein Homopolymer, ein Copolymer oder ein Graft-Copolymer, einschließlich Polystyrol oder ein Copolymer von Styrol und/oder α-Methylstyrol und Acrylnitril, ein Copolymer von Styrol/Acrylnitril (SAN), ein Terpolymer von Styrol, ein Copolymer von Acrylnitril und Dien-Kautschuk (ABS), ein Copolymer von Styrol/Acrylnitril, modifiziert mit Acrylatelastomer (ASA), ein Copolymer von Styrol/Acrylnitril, modifiziert mit Ethylen/Propylen/Dien-Monomer- (EPDM) Kautschuk und ein Copolymer von Styrol und Maleinsäureanhydrid (SMA), Polyolefin, Polyethylen, Polypropylen, chloriertes Polyvinylchlorid (CPVC), Polycarbonat (PC), thermoplastisches aromatisches Polyester (TPES), wie beispielsweise Polybutylenterephthalat (PBT), Polyethylenterephthalat (PET), segmentiertes Polyether-Ester-Copolymer, Polyurethan (PUR), mischbare Blends von Polystyrol und Polyphenylenoxid (PPO), Polyacetal (POM), Polyacrylsäure, Polymethacrylsäure, Acrylester, Methacrylester, Polyamidimid, Polyacrylnitril, Polyarylsulfon, Polyestercarbonat, Polyetherimid, Polyetherketon (PEK), Polyetheretherketon (PEEK), Polyalphaetherketon (PAEK), Polyethersulfon, Polyphenylensulfid, Polysulfon, Polyethylen, eine Mischung aus Polyethylen und Polypropylen, Nylon, anionisches oder kationisches Austauschharz oder eine Kombination davon aufweisen, und wobei der Mikroorganismus ein Bakterium, einen Pilz oder ein Protozoon oder eine beliebige Kombination davon aufweist.
14. Verfahren nach Anspruch 11, wobei das poröse Füllsubstrat (30A, 30B, 30C, 30D, 30E) Diatomeenerde, Lava einschließlich Lavagrus, ein Keramikmaterial, mikroporöses Polystyrol, mikroporöses Polyethylen, mikroporöses Polypropylen oder eine Kombination davon aufweist, und wobei der Mikroorganismus eine Pseudomonas-Spezies wie Pseudomonas vesicularis, Pseudomonas putida und Aeromonas hydrophila, Brevibacterium acetylicum, eine Nitrobacter-Spezies wie Nitrobacter winogradskyi, eine Nitrosomonas-Spezies wie Nitrosomonas europaea, eine schwefelhaltige Verbindung wie Thiobacillus-Spezies oder Thiobacillus denitrificans, einen Fungus, der in Pilzen, Hefen und Schimmelpilzen natürlich vorkommt, oder Protozoen wie Sarcomastigophora, Labyrinthomorpha, Apicomplexa, Microspora, Acetospora, Myxozoa und Ciliophora oder eine Kombination davon aufweist.
15. Verfahren nach Anspruch 9 oder 13, wobei eine Mischung aus den mehreren Mikroorganismen an den mehreren porösen Füllsubstraten (30A, 30B, 30C, 30D, 30E) mit großer Oberfläche in vielfältiger Weise befestigt ist, einschließlich mechanisch, physikalisch-chemisch, polar und/oder unpolar, ionisch und/oder nichtionisch, hydrophob und/oder hydrophil oder eine Kombination davon aufweisen.
1. Appareil de biorestauration d'une composition de déchets aqueux, comprenant :
un réacteur (R) présentant une pluralité d'étages de biorestauration en son sein ;
ledit réacteur (R) présentant de multiples substrats de conditionnement (30A, 30B, 30C, 30D, 30E) ayant une aire de surface élevée, lesdits substrats étant poreux et ayant des micropores en leur sein ;
ledit réacteur (R) présentant de multiples types de micro-organismes différents, les micro-organismes étant fixés sur lesdits substrats de conditionnement ;
ledit réacteur (R) présentant une entrée (21) permettant d'introduire une composition de déchets aqueux dans ledit réacteur (R) et ledit réacteur (R) présentant une entrée (5) permettant d'introduire de l'oxygène dans ledit réacteur (R) ;
ledit réacteur (R) incluant au moins un conduit de cheminée perforé (9) dans au moins un étage parmi lesdits étages de biorestauration ; et
ledit réacteur (R) présentant une sortie.
2. Appareil selon la revendication 1, dans lequel l'aire de surface moyenne desdits multiples substrats poreux de conditionnement (30A, 30B, 30C, 30D, 30E) est d'au moins 100 mètres carrés par mètre cube ; et incluant au moins un séparateur (15A, 15B, 15C, 15D, 15E) positionné entre lesdits étages de biorestauration, ledit séparateur ayant une taille de perforation moyenne suffisante pour permettre à de l'air de le traverser sans pour autant traverser lesdits substrats de conditionnement.
3. Appareil selon la revendication 2, dans lequel ladite aire de surface moyenne dudit substrat poreux (30A, 30B, 30C, 30D, 30E) est comprise entre au moins 500 et 200 000 mètres carrés par mètre cube ; dans lequel au moins un dit étage de biorestauration comporte une fraction de conditionnement desdits substrats de conditionnement d'au moins 50 % en volume ; dans lequel lesdits substrats de conditionnement ont une taille de pores moyenne comprise entre 1 micron et 500 microns ; et où ledit réacteur (R) présente une pluralité de substrats de conditionnement différents ; et
dans lequel lesdits multiples micro-organismes différents sont fixés par une variété de caractéristiques de surface différentes comprenant une caractéristique mécanique, une caractéristique physico-chimique, une caractéristique polaire et/ou apolaire, une caractéristique ionique et/ou anionique, une caractéristique hydrophobe et/ou hydrophile, ou toute combinaison de celles-ci.
4. Appareil selon la revendication 3, dans lequel l'aire de surface moyenne dudit substrat de conditionnement poreux (30A, 30B, 30C, 30D, 30E) est comprise entre 500 et 10 000 mètres carrés par mètre cube; dans lequel au moins un dit étage de biorestauration comporte une fraction de conditionnement desdits substrats de conditionnement d'au moins 95 % en volume ; dans lequel lesdits substrats de conditionnement ont une taille de pores moyenne comprise entre 20 microns et 75 microns ; et dans lequel au moins un étage parmi lesdits étages de biorestauration comporte au moins trois types différents de substrats de conditionnement, où au moins un étage parmi lesdits étages de biorestauration comporte au moins trois types différents de micro-organismes.
5. Appareil selon la revendication 2, dans lequel ledit substrat poreux (30A, 30B, 30C, 30D, 30E) comprend un minéral, une substance carbonée, une céramique, un métal, un polymère ou une matière plastique, ou toute combinaison de ceux-ci ; et dans lequel ledit micro-organisme comprend un composant qui est cellulaire et est en mesure de se répliquer sans cellule hôte.
6. Appareil selon la revendication 3, dans lequel ledit substrat de conditionnement poreux (30A, 30B, 30C, 30D, 30E) comprend un minéral, une substance carbonée, une céramique, un métal, un polymère ou une matière plastique, ou toute combinaison de ceux-ci ; où ledit substrat minéral comprend de la terre de diatomées, de la terre de Fuller, du dioxyde de titane, du dioxyde de zirconium, de l'oxyde de chrome, de l'oxyde de zinc, de la magnésie, du trioxyde de bore, du nitrure de bore, de la pierre ponce, de la lave incluant de la lave broyée, de la célite, une scorie, ou toute combinaison de ceux-ci ; où ledit substrat carboné comprend du charbon de bois, du charbon, du bois ou des copeaux de bois pyrolysés, du charbon actif, ou toute combinaison de ceux-ci ; où ladite céramique comprend du silicate, de l'alumine, de la mullite, de la brique, un carreau, de la terre-cuite, de la porcelaine, un verre tel que le verre de sodium ou le verre de bore, de l'émail de porcelaine, un matériau réfractaire incluant l'alumine, le carbure de silicium, le carbure de bore, ou toute combinaison de ceux-ci ; où lesdits substrats métalliques comprennent du fer, du nickel, du cobalt, du zinc, de l'aluminium, ou toute combinaison de ceux-ci ; et où lesdits polymères et matières plastiques comprennent un homopolymère, un copolymère, ou un copolymère greffé, incluant un polystyrène ou un copolymère de styrène et/ou d'α-méthylstyrène et d'acrylonitrile, un copolymère de styrène/acrylonitrile (SAN), un terpolymère de styrène, un copolymère d'acrylonitrile et de caoutchouc diénique (ABS), un copolymère de styrène/acrylonitrile modifié avec un élastomère d'acrylate (ASA), un copolymère de styrène/acrylonitrile modifié avec un caoutchouc de monomère éthylène/propylène/diène (EPDM), et un copolymère de styrène et d'anhydrure maléique (SMA), une polyoléfine, un polyéthylène, un polypropylène, un polychlorure de vinyle chloré (CPVC), un polycarbonate (PC), un polyester aromatique thermoplastique (TPES) incluant un polytéréphtalate de butylène (PBT), un polytéréphtalate d'éthylène (PET), un copolymère segmenté polyéther-ester, un polyuréthane (PUR), des mélanges miscibles de polystyrène et de polyoxyde de phénylène (PPO), un polyacétal (POM), un polyacide acrylique, un polyacide méthacrylique, un ester acrylique, un ester méthacrylique, un polyamide-imide, un polyacrylonitrile, un polyarylsulfone, un polycarbonate d'ester, un polyéther-imide, un polyéther-cétone (PEK), un polyéther-éther-cétone (PEEK), un polyalphaéther-cétone (PAEK), un polyéther-sulfone, un polysulfure de phénylène, une polysulfone, un polyéthylène, un mélange de polyéthylène et de polypropylène, du nylon, une résine d'échange anionique ou cationique, ou toute combinaison de ceux-ci ; et où ledit micro-organisme comprend une bactérie, un champignon, ou un protozoaire, ou toute combinaison de ceux-ci.
7. Appareil selon la revendication 4, dans lequel ledit substrat de conditionnement poreux (30A, 30B, 30C, 30D, 30E) comprend de la terre de diatomées, de la lave incluant de la lave broyée, une céramique, un polystyrène microporeux, un polyéthylène microporeux, un polypropylène microporeux, ou toute combinaison de ceux-ci ; et où ledit micro-organisme comprend le genre Pseudomonas incluant Pseudomonas vesicularis, Pseudomonas putida et Aeromonas hydrophila, Brevibacterium acetylicum ; le genre Nitrobacter incluant Nitrobacter winogradskyi ; le genre Nitrosomonas incluant Nitrosomonas europaea ; le genre Thiobacillus incluant des composants contenant du soufre ou Thiobacillus denitrificans ; un champignon naturellement présent dans les champignons, les levures, et les moisissures ; ou un protozoaire incluant un sarcomastigophora, un labyrinthomorpha, un apicomplexa, un microspora, un acetospora, un myxozoa, et un ciliophora ; ou toute combinaison de ceux-ci.
8. Appareil selon l'une quelconque des revendications 1 ou 2, dans lequel un mélange desdits multiples micro-organismes est fixé sur lesdits multiples substrats de conditionnement poreux d'aire de surface élevée (30A, 30B, 30C, 30D, 30E) selon une variété de modes comprenant un mode mécanique, un mode physico-chimique, un mode polaire et/ou apolaire, un mode ionique et/ou anionique, un mode hydrophobe et/ou hydrophile, ou toute combinaison de ceux-ci.
9. Procédé de biorestauration aérobie d'une composition de déchets aqueux comprenant les étapes consistant à :
fournir un réacteur (R) présentant de multiples étages de biorestauration en son sein, ledit réacteur comportant également de multiples substrats de conditionnement (30A, 30B, 30C, 30D, 30E) ayant une aire de surface élevée, lesdits substrats de conditionnement ayant des micropores et une porosité élevée ;
ajouter au moins une cheminée perforée (9) à au moins un étage parmi lesdits étages de biorestauration ;
appliquer de multiples micro-organismes sur lesdits substrats de conditionnement ;
ajouter une composition de déchets aqueux dans ledit réacteur (R) ;
ajouter de l'air dans ledit réacteur (R) et dissoudre de l'oxygène dans ladite composition de déchets aqueux ; et
réaliser une biorestauration de ladite composition de déchets aqueux avec lesdits micro-organismes et une purification de ladite composition de déchets aqueux.
10. Procédé selon la revendication 9, dans lequel ledit réacteur (R) inclut au moins un séparateur (15A, 15B, 15C, 15D, 15E) positionné entre lesdits étages de biorestauration, ledit séparateur ayant une taille de perforation moyenne suffisante pour permettre à de l'air de le traverser sans pour autant traverser lesdits substrats de conditionnement (30A, 30B, 30C, 30D, 30E) ; où au moins un dit étage de biorestauration comporte une fraction de conditionnement desdits substrats de conditionnement poreux d'au moins 50 % en volume ; où ledit réacteur (R) comporte une pluralité de substrats de conditionnement différents.
11. Procédé selon la revendication 10, dans lequel au moins un dit étage de biorestauration comporte une fraction de conditionnement desdits substrats de conditionnement poreux (30A, 30B, 30C, 30D, 30E) d'au moins 95 % en volume ; où l'aire de surface moyenne desdits multiples substrats de conditionnement est d'au moins 100 mètres carrés par mètre cube ; où lesdits substrats de conditionnement ont une taille de pores moyenne comprise entre 1 micron et 500 microns ; où ledit substrat de conditionnement facilite la dissolution de l'oxygène dans ladite eau usée et l'obtention d'une teneur en oxygène dissous d'au moins une partie en poids par million par rapport à la masse de ladite composition de déchets ; et
où lesdits multiples micro-organismes différents sont fixés par une variété de caractéristiques de surface différentes comprenant une caractéristique mécanique, une caractéristique physico-chimique, une caractéristique polaire et/ou apolaire, une caractéristique ionique et/ou anionique, une caractéristique hydrophobe et/ou hydrophile, ou toute combinaison de celles-ci.
12. Procédé selon la revendication 11, dans lequel ladite aire de surface moyenne dudit substrat poreux (30A, 30B, 30C, 30D, 30E) est comprise entre au moins 500 et 200 000 mètres carrés par mètre cube ; dans lequel lesdits substrats de conditionnement ont une taille de pores moyenne comprise entre 4 microns et 100 microns ; et où la quantité d'oxygène dissous est comprise entre 3 et 8 parties en poids par million par rapport à la masse de ladite composition de déchets.
13. Procédé selon la revendication 9, dans lequel ledit substrat de conditionnement poreux (30A, 30B, 30C, 30D, 30E) comprend un minéral, une substance carbonée, une céramique, un métal, un polymère ou une matière plastique, ou toute combinaison de ceux-ci ; où ledit substrat minéral comprend de la terre de diatomées, de la terre de Fuller, du dioxyde de titane, du dioxyde de zirconium, de l'oxyde de chrome, de l'oxyde de zinc, de la magnésie, du trioxyde de bore, du nitrure de bore, de la pierre ponce, de la lave incluant de la lave broyée, de la célite, une scorie, ou toute combinaison de ceux-ci ; où ledit substrat carboné comprend du charbon de bois, du charbon, du bois ou des copeaux de bois pyrolysés, du charbon actif, ou toute combinaison de ceux-ci ; où ladite céramique comprend du silicate, de l'alumine, de la mullite, de la brique, un carreau, de la terre-cuite, de la porcelaine, un verre tel que le verre de sodium ou le verre de bore, de l'émail de porcelaine, un matériau réfractaire incluant l'alumine, le carbure de silicium, le carbure de bore, ou toute combinaison de ceux-ci ; où lesdits substrats métalliques comprennent du fer, du nickel, du cobalt, du zinc, de l'aluminium, ou toute combinaison de ceux-ci ; et où lesdits polymères et matières plastiques comprennent un homopolymère, un copolymère, ou un copolymère greffé, incluant un polystyrène ou un copolymère de styrène et/ou d'α-méthylstyrène et d'acrylonitrile, un copolymère de styrène/acrylonitrile (SAN), un terpolymère de styrène, un copolymère d'acrylonitrile et de caoutchouc diénique (ABS), un copolymère de styrène/acrylonitrile modifié avec un élastomère d'acrylate (ASA), un copolymère de styrène/acrylonitrile modifié avec un caoutchouc de monomère éthylène/propylène/diène (EPDM), et un copolymère de styrène et d'anhydrure maléique (SMA), une polyoléfine, un polyéthylène, un polypropylène, un polychlorure de vinyle chloré (CPVC), un polycarbonate (PC), un polyester aromatique thermoplastique (TPES) incluant un polytéréphtalate de butylène (PBT), un polytéréphtalate d'éthylène (PET), un copolymère segmenté polyéther-ester, un polyuréthane (PUR), des mélanges miscibles de polystyrène et de polyoxyde de phénylène (PPO), un polyacétal (POM), un polyacide acrylique, un polyacide méthacrylique, un ester acrylique, un ester méthacrylique, un polyamide-imide, un polyacrylonitrile, un polyarylsulfone, un polycarbonate d'ester, un polyéther-imide, un polyéther-cétone (PEK), un polyéther-éther-cétone (PEEK), un polyalphaéther-cétone (PAEK), un polyéther-sulfone, un polysulfure de phénylène, une polysulfone, un polyéthylène, un mélange de polyéthylène et de polypropylène, du nylon, une résine d'échange anionique ou cationique, ou toute combinaison de ceux-ci ; et où ledit micro-organisme comprend une bactérie, un champignon, ou un protozoaire, ou toute combinaison de ceux-ci.
14. Procédé selon la revendication 11, dans lequel ledit substrat de conditionnement poreux (30A, 30B, 30C, 30D, 30E) comprend de la terre de diatomées, de la lave incluant de la lave broyée, une céramique, un polystyrène microporeux, un polyéthylène microporeux, un polypropylène microporeux, ou toute combinaison de ceux-ci ; et où ledit micro-organisme comprend le genre Pseudomonas incluant Pseudomonas vesicularis, Pseudomonas putida et Aeromonas hydrophila, Brevibacterium acetylicum ; le genre Nitrobacter incluant Nitrobacter winogradskyi ; le genre Nitrosomonas incluant Nitrosomonas europaea ; le genre Thiobacillus incluant des composants contenant du soufre ou Thiobacillus denitrificans ; un champignon naturellement présent dans les champignons, les levures, et les moisissures ; ou un protozoaire incluant un sarcomastigophora, un labyrinthomorpha, un apicomplexa, un microspora, un acetospora, un myxozoa, et un ciliophora ; ou toute combinaison de ceux-ci.
15. Procédé selon l'une quelconque des revendications 9 ou 13, dans lequel un mélange desdits multiples micro-organismes est fixé sur lesdits multiples substrats de conditionnement poreux d'aire de surface élevée (30A, 30B, 30C, 30D, 30E) selon une variété de modes comprenant un mode mécanique, un mode physico-chimique, un mode polaire et/ou apolaire, un mode ionique et/ou anionique, un mode hydrophobe et/ou hydrophile, ou toute combinaison de ceux-ci.

REFERENCES CITED IN THE DESCRIPTION
This list of references cited by the applicant is for the reader's convenience only. It does not form part of the European patent document. Even though great care has been taken in compiling the references, errors or omissions cannot be excluded and the EPO disclaims all liability in this regard.

Patent documents cited in the description
- US
4810385
A
[0003]
- US
4859594
A
[0004]
- US
4882066
A
[0005]
- US
5021088
A
[0006]
- US
5211848
A
[0007]
- US
5240598
A
[0008]
- US
5403487
A
[0009]
- US
5534143
A
[0010]
- US
5569634
A
[0011]
- US
5747311
A
[0012]
- WO
9302971
A
[0015]
- US
6153094
A
[0016]
- US
6159365
A
[0016]
- US
20050269252
A1
[0017]
- US
20070007201
A1
[0018]
- US
4925552
A
[0018]
- US
5217616
A
[0019]
- US
3433600
A
[0020]