ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIRO..CY..TRBGCZEEHUPLSK..HRIS..MTNO........................
J
DIM360 Ver 2.15 (14 Jul 2008) - 1100000/0
This application was filed on 10-08-2012 as a divisional application to the application mentioned under INID code 62.
2549492
EUROPEAN PATENT APPLICATION
A1
20130123
EP
12180116.1
20080609
en
en
en
970578 P
20070907
US
134240
20080606
US
20130123
201304
20130123
201304
H01F 3/10 20060101AFI20121220BHEP
de
Hochleistungsinduktoren mit Magnetbasis
en
High power inductors using a magnetic basis
fr
Bobines d'induction haute puissance utilisant une base magnétique
2
08770489.6
2198435
20080609
Vishay Dale Electronics, Inc.
100997891
EP-21059188
1122 23rd Street
Columbus, NE 68601
US
Hansen, Thomas T.
1122 23rd Street
Columbus, NE 68601
US
Tholén, Johan
101295684
Awapatent AB Järnvägsgatan 10 A Box 1066
251 10 Helsingborg
SE
AT
BE
BG
CH
CY
CZ
DE
DK
EE
ES
FI
FR
GB
GR
HR
HU
IE
IS
IT
LI
LT
LU
LV
MC
MT
NL
NO
PL
PT
RO
SE
SI
SK
TR
A biased gap inductor includes a first ferromagnetic plate, a second ferromagnetic plate, a conductor sandwiched between the first ferromagnetic plate and the second ferromagnetic plate, and an adhesive between the first ferromagnetic plate and the second ferromagnetic plate, the adhesive comprising magnet powder to thereby form at least one magnetic gap. A method of forming an inductor includes providing a first ferromagnetic plate and a second ferromagnetic plate and a conductor, placing the conductor between the first ferromagnetic plate and the second ferromagnetic plate, adhering the first ferromagnetic plate to the second ferromagnetic plate with a composition comprising an adhesive and a magnet powder to form magnetic gaps, and magnetizing the inductor.

CROSS-REFERENCE TO RELATED APPLICATIONS
This application claims priority under 35 U.S.C. § 119 to provisional application Serial No. 60/970,578 filed September 7, 2007, herein incorporated by reference in its entirety.

BACKGROUND OF THE INVENTION
Low profile inductors, commonly defined as inductors having a profile less than about 10 mm are in existence today in the form of ferrites with unique geometries and pressed iron powder around a wound coil. Ferrite based low profile inductors have an inherent limitation of magnetic saturation at relatively low levels of current. When magnetic saturation occurs, inductance value decreases dramatically.
Pressed iron inductors allow for much higher input current than ferrite inductors, but have the limitation of producing high core losses at high frequencies (such as frequencies greater than 200 kHz). What is needed is an efficient means to provide inductance at high frequencies allowing high input currents.
It is therefore a primary, object, feature, or advantage of the present invention to improve upon the state of the art.
It is a further object, feature, or advantage of the present invention to provide an inductor which has lower core losses at high ripple currents (> 5 A) and frequencies (> 200 kHz) in a thin package yet also have the high saturation current performance of powdered iron.
Another object, feature, or advantage of the present invention is to use adhesive film thickness or magnet particle size to adjust inductance characteristics.
A further object, feature, or advantage of the present invention is to increase the capability of an inductor to effectively handle more DC while maintaining inductance.
One or more of these and/or other objects, features, or advantages of the present invention will become apparent from the description of the invention that follows.

BRIEF SUMMARY OF THE INVENTION
According to one aspect of the present invention, a biased gap inductor includes a first ferromagnetic plate, a second ferromagnetic plate, a conductor sandwiched between the first ferromagnetic plate and the second ferromagnetic plate, and an adhesive between the first ferromagnetic plate and the second ferromagnetic plate, the adhesive comprising magnetically hard magnet powder to thereby form at least one magnetic gap. The adhesive has a thickness of less than 500 um and preferably less than 100 um. The magnetic powder size can be used to set the inductance level of the part. Also the amount of magnet powder can modify characteristics of the part to produce a desired performance.
According to another aspect of the present invention, a method of forming an inductor includes providing a first ferromagnetic plate and a second ferromagnetic plate and a conductor, placing the conductor between the first ferromagnetic plate and the second ferromagnetic plate, adhering the first ferromagnetic plate to the second ferromagnetic plate with a composition comprising an adhesive and a magnet powder to form magnetic gaps, and magnetizing the inductor. The composition has a thickness of less than 500 um and preferably less than 100 um.
According to another aspect of the present invention, a biased gap inductor is provided. The inductor includes a first ferromagnetic plate and a second ferromagnetic plate. A conductor is sandwiched between the first ferromagnetic plate and the second ferromagnetic plate. A magnetic material having a thickness of less than 100 um is between the first ferromagnetic plate and the second ferromagnetic plate to from at least one magnetic gap. The thickness may be used to define inductance characteristics of the inductor.

BRIEF DESCRIPTION OF THE DRAWINGS
- FIG. 1 is a cross-section of a prior art inductor without flux channeling.
- FIG. 2 is a cross-section of one embodiment of a flux-channeled inductor of the present invention.
- FIG. 3 illustrates a relationship between DC voltage and a BH-loop and how operation range is increased with the biased gap.
- FIG. 4 illustrates a single conductor inductor with two magnetic gaps.
- FIG. 5 is a perspective view of a multi-poled configuration of an inductor.

DETAILED DESCRIPTION OF THE PREFERRED EMBODIMENT
FIG. 1 illustrates a prior art device where a single strip of copper can be placed between two ferrite parts to create an inductor. While this is effective in creating low value, high frequency inductors, it limits the amount of input current the inductor can handle without saturating. The primary cause of saturation comes from the fact that all magnetic flux induced by the copper flows through narrow cross-sectional areas. FIG. 1 illustrates the flux pattern in a single copper strip inductor. In FIG. 1, an inductor 10 has a first ferromagnetic plate 12 and a second ferromagnetic plate 14. There is a spacing 16 between the first ferromagnetic plate 12 and the second ferromagnetic plate 14. The magnetic flux induced by a current through the single strip copper conductor 18 is split between each plate 12, 14. Input current 20 is shown using notation to indicate that the current is flowing into the page. Arrows 22, 24, 26, 28 indicate the direction of magnetic flux induced by the current 20 through the conductor 18. Note that all the magnetic flux induced by the current in the copper conductor 18 flows through narrow cross-sectional 22, 26 areas thereby becoming the primary cause of saturation.
The present invention provides a low cost method which enables inductors to extend their operating range up to a factor of two. The invention introduces adhesive filled with magnet powder in the gaps between ferromagnetic pieces. FIG. 2 illustrates one embodiment of the present invention. An inductor 30 is shown which is formed from a first ferromagnetic plate 12 and a second ferromagnetic plate 14. The first ferromagnetic plate 12 and the second ferromagnetic plate 14 are mechanically bonded through a composition 32 which includes an adhesive and a magnet powder. Arrows 22, 26, 38, 40 indicate the direction of magnetic flux induced by the current 20 through the conductor 18. Arrows 34, 36, 42, 44 indicate the direction of magnet induced "counter" flux.
The composition 32 may be comprised of epoxy and magnet powder mixed in predetermined ratios. The use of the adhesive with the magnet powder has a dual role in the assembly of an inductive component. Varying the size of the magnet particulate raises or lowers the inductance of the part. Small magnet powder size creates a thin gap inductor with a high inductance level. A large magnet powder increases the gap size resulting in a reduced inductance of a part. Thus, the magnet powder particulate size can be selected to tailor the inductance of a part for a specific application. In other words, the magnet powder size can be used to set the inductance level of the part. Also, the amount of magnet powder used can modify characteristics of the part to produce a desired performance. The second role of the adhesive is to permanently bind the parts together making the assembly robust to mechanical loads. In a preferred embodiment, the thickness of the magnet particulate layer is between about 0 to 100 um. Larger magnetic bias thickness of between about 0 and 500 may also be used.
The magnet powder can consist of a spherical or irregular shaped material. Ceramic magnet powders can be used as the magnet powder. The preferred materials are spherical rare earth magnetic material such as, but not limited to, Neodymium-Iron-Boron or Samarium-Cobalt magnet powder. One reason is that spherical particulate is more consistent at achieving specific distances between plates. The second reason is rare earth magnets have sufficiently high intrinsic coercive forces to resist demagnetization in application.
Ferromagnetic plates can be made from a magnetically soft material such as, without limitation, ferrite, molypermalloy (MPP), Sendust, Hi Flux, or pressed iron. Although other materials may be used, a preferred material is ferrite as it has low core losses at high frequencies and is generally less expensive than alternatives. Ferrite has low magnetic saturation resistance and thus benefits from introducing a magnetic bias.
The present invention provides for adding magnet powder filled adhesive between ferromagnetic plates. Once the adhesive is fully cured, the component is magnetized such that the magnetic material applies a steady state magnetic flux field that opposes the direction induced from a current carrying inductor.
FIG. 2 illustrates the static magnetic flux and the induced magnetic flux from the conductor. FIG. 3 is a hypothetical B-H loop of soft ferromagnetic ferrite plates. At zero input DC into the conductor, the ferromagnetic material is polarized or biased such that its flux field is near the maximum negative saturation point. When DC is applied, this negative flux field gradually decreases until the magnetic flux density in the ferromagnetic material is zero. Upon further increase in DC, the magnetic flux field begins to go positive until magnetic saturation occurs. Introducing magnetic material in the gap thus increases the ferromagnetic material's ability to withstand saturation thereby significantly increasing its range, such as by two times.
FIG. 4 is a perspective view of a single conductor inductor 50 with two magnetic gaps. In FIG. 4, two ferromagnetic plates 52, 53 are combined together by a distance set by the size of the magnetic particulate. A mixture of magnet powder and epoxy forms the composition 56 which may be screen printed onto one of the sides of the ferromagnetic plates, ferromagnetic plate 52 as shown in FIG. 4. A magnetic gap is created in each region where the composition 56 is applied. A second ferromagnetic plate 53 is placed upon the first and the adhesive is heat cured to permanently bond the assembly together. Once the parts are cured, they are then magnetized. FIG. 4 illustrates the polarity of the magnetic material such that the subsequent flux field between the two ferromagnetic plates adds to each others magnetic flux direction. The polarity of the magnet induced flux is set in the opposite direction to any magnetic induced flux caused from direct current input into the conductor.
FIG. 5 is a perspective view of one embodiment where there are three magnetic gaps, each of the magnetic gaps formed for a mixture containing magnet powder and preferably an adhesive such as epoxy. The mixture can be deposited by screen printing and can be considered a magnetic film as it includes a magnet powder is applied in three separate places, 70A, 70B, 70C. The configuration shown in a multi-poled configuration. The outside magnetic films 70A, 70B are polarized in the same direction while the center 70C is polarized in an opposite direction. This is performed in order to form a magnetic field that will be additive for all three magnetic films. The inductor 60 include a first ferromagnetic plate 62 and a second ferromagnetic plate 64. There are grooves 63 cut in ferromagnetic plate 62. The grooves 63 extend from one side of the ferromagnetic plate 62 to an opposite side of the ferromagnetic plate 62. A conductor 65 is shown. The conductor 65, which includes segments 66, 68 on the side of the second ferromagnetic plate 64 is bent around the second ferromagnetic plate 64 to form three surfaces 70A, 70B, 70C upon each of which the magnetic film is adhered. After the ferromagnetic plates 62, 64 are placed together, the adhesive may be heat cured, then device 60 may be magnetized. FIG. 5 provides a multi-poled configuration as the outside magnetic films are polarized in the same direction while the center is polarized in an opposite direction. This is done to form a magnetic field that will be additive for all three magnetic films. The polarity of the magnet induced flux is set in the opposite direction to any magnetic induced flux caused from direct current input into the conductor.
Thus, it should be apparent that the present invention provides for improved inductors and methods of manufacturing the same. The present invention contemplates numerous variations in the types of materials used, manufacturing techniques applied, and other variations which are within the spirit and scope of the invention.

NUMBERED LIST OF EMBODIMENTS
1. 1. A biased gap inductor, comprising:
  - a first ferromagnetic plate;
  - a second ferromagnetic plate;
  - a conductor sandwiched between the first ferromagnetic plate and the second ferromagnetic plate;
  - an adhesive between the first ferromagnetic plate and the second ferromagnetic plate, the adhesive comprising magnet powder to thereby form at least one magnetic gap; and
  - wherein the adhesive having a thickness of less than 500 um.
2. 2. The biased gap inductor of item 1 wherein the adhesive is epoxy.
3. 3. The biased gap inductor of item 1 wherein the magnet powder comprises spherical rare earth magnetic particulate.
4. 4. The bias gaped inductor of item 3 wherein the spherical rare earth magnetic particulate comprises a neodymium-iron-boron alloy.
5. 5. The bias gaped inductor of item 3 wherein the spherical rare earth magnetic particulate comprises a samarium-cobalt alloy.
6. 6. The bias gaped inductor of item 1 wherein each of the first ferromagnetic plate and the second ferromagnetic plate comprises ferrite.
7. 7. The bias gaped inductor of item 1 wherein the conductor comprises copper.
8. 8. The bias gaped inductor of item 1 wherein the conductor is configured in a multiple loop configuration.
9. 9. The bias gaped inductor of item 1 wherein the adhesive comprises an adhesive film between the first ferromagnetic plate and the second ferromagnetic plate, and the thickness is used to define inductance characteristics of the inductor.
10. 10. The bias gaped inductor of item 1 wherein the thickness is less than 100 um.
11. 11. A method of forming an inductor, comprising:
  - providing a first ferromagnetic plate and a second ferromagnetic plate and a conductor;
  - placing the conductor between the first ferromagnetic plate and the second ferromagnetic plate;
  - adhering the first ferromagnetic plate to the second ferromagnetic plate with a composition comprising an adhesive and a magnet powder to form magnetic gaps;
  - magnetizing the inductor; and
  - wherein the composition having a thickness of less than 500 um.
12. 12. The method of item 11 wherein the step of adhering includes curing the adhesive.
13. 13. The method of item 11 wherein the adhesive is epoxy.
14. 14. The method of item 11 wherein the magnet powder comprises spherical rare earth magnetic particulate.
15. 15. The method of item 11 wherein the magnet powder comprises spherical ceramic particulate.
16. 16. The method of item 11 further comprising determining a type of magnet powder based on desired properties for the inductor, wherein the type includes the size of particles of the magnet powder.
17. 17. The method of item 11 wherein the step of adhering includes screen printing the composition.
18. 18. The method of item 11 wherein the thickness is less than 100 um.
19. 19. A biased gap inductor, comprising:
  - a first ferromagnetic plate;
  - a second ferromagnetic plate;
  - a conductor sandwiched between the first ferromagnetic plate and the second ferromagnetic plate;
  - a magnetic material having a thickness of less than 100 um between the first ferromagnetic plate and the second ferromagnetic plate to form at least one magnetic gap, wherein the thickness being used to define inductance characteristics of the inductor.
1. A biased gap inductor, comprising:
a first ferromagnetic plate;
a second ferromagnetic plate;
a conductor sandwiched between the first ferromagnetic plate and the second ferromagnetic plate;
an adhesive between the first ferromagnetic plate and the second ferromagnetic plate, the adhesive comprising magnetic powder to thereby form at least one magnetic gap, the adhesive binding the plates together and providing an induced flux set in the opposite direction from a magnetic induced flux caused from direct current input into the conductor to thereby increase the operating range of the inductor.
2. The biased gap inductor of claim 1 wherein the adhesive is epoxy.
3. The biased gap inductor of claim 1 wherein the magnet powder comprises spherical rare earth magnetic particulate.
4. The biased gaped inductor of claim 3 wherein the spherical rare earth magnetic particulate comprises a neodymium-iron-boron alloy.
5. The biased gaped inductor of claim 3 wherein the spherical rare earth magnetic particulate comprises a samarium-cobalt alloy.
6. The biased gaped inductor of claim 1 wherein each of the first ferromagnetic plate and the second ferromagnetic plate comprises ferrite.
7. The biased gaped inductor of claim 1 wherein the conductor comprises copper.
8. The biased gaped inductor of claim 1 wherein the conductor is configured in a multiple loop configuration.
9. The biased gaped inductor of claim 1 wherein the adhesive comprises an adhesive film between the first ferromagnetic plate and the second ferromagnetic plate, and the thickness of the adhesive film is used to define inductance characteristics of the inductor.
10. The biased gaped inductor of claim 1 wherein the thickness is less than 100 um.
11. A biased gap inductor, comprising:
a first ferromagnetic plate;
a second ferromagnetic plate;
a conductor sandwiched between the first ferromagnetic plate and the second ferromagnetic plate;
a magnetic material having a thickness of less than less than 500 um between the first ferromagnetic plate and the second ferromagnetic plate to form at least one magnetic gap, the magnetic material binding the plates together, the thickness of the magnetic material being used to define inductance characteristics of the inductor.
12. The biased gap inductor of claim 11, wherein the magnetic material has a thickness of less than 100 um.
13. The biased gaped inductor of claim 11 wherein the magnetic material comprises an adhesive film between the first ferromagnetic plate and the second ferromagnetic plate, and the thickness of the adhesive film is used to define inductance characteristics of the inductor.
14. The biased gaped inductor of claim 13, wherein the adhesive is magnetized to thereby apply a steady state magnetic flux.
EP-21059188
EP
12180116.1
Vishay Dale Electronics, Inc.
2
MN
20130104
H01F
JP
7283046
A
NIPPON STEEL CORP
19951027
A
1-14
* abstract *
US
6392525
B1
KATO JUNICHI [JP] ET AL
20020521
A
1-14
* paragraphs [0009], [0052], [0053], [0084]; figure 4 *
EP
1286371
A
OSRAM SYLVANIA INC [US]
20030226
A
1-14
* paragraphs [0027] - [0033] *
EP
1225601
A
TOKIN CORP [JP] NEC TOKIN CORP [JP]
20020724
A
1-14
* paragraphs [0008], [0014], [0028], [0029], [0031]; figure 4c *
JP
2002222707
A
NEC TOKIN CORP
20020809
A
1-14
* abstract *
US
2005212643
A1
KUROIWA KATSUTOSHI [JP] ET AL
20050929
A
1,11
* paragraphs [0016], [0043], [0057], [0059]; figures 1,2 *
WO
9705632
A
NORTHEAST VENTURES INC [US]
19970213
A
1,11
* page 3, lines 1-10 *
Van den Berg, G
Munich
20121219
JP
7283046
A
19951027
NONE
US
6392525
B1
20020521
NONE
EP
1286371
A
20030226
CA
2390771
A1
20030222
CN
1407598
A
20030402
EP
1286371
A2
20030226
JP
2003141990
A
20030516
KR
20030017373
A
20030303
NO
20023939
A
20030224
TW
569267
B
20040101
US
2003062851
A1
20030403
EP
1225601
A
20020724
CN
1371106
A
20020925
DE
60201193
D1
20041021
DE
60201193
T2
20050908
EP
1225601
A2
20020724
JP
2002217043
A
20020802
KR
20020077795
A
20021014
TW
578173
B
20040301
US
2002097131
A1
20020725
US
2004140876
A1
20040722
JP
2002222707
A
20020809
NONE
US
2005212643
A1
20050929
CN
1637964
A
20050713
JP
2005210055
A
20050804
KR
20050063682
A
20050628
TW
I301989
B
20081011
US
2005212643
A1
20050929
US
2007193022
A1
20070823
WO
9705632
A
19970213
AU
6686396
A
19970226
WO
9705632
A1
19970213

REFERENCES CITED IN THE DESCRIPTION
This list of references cited by the applicant is for the reader's convenience only. It does not form part of the European patent document. Even though great care has been taken in compiling the references, errors or omissions cannot be excluded and the EPO disclaims all liability in this regard.

Patent documents cited in the description
- US
60970578
B
20070907
[0001]