ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIROMKCYALTRBGCZEEHUPLSKBAHRIS..MTNORSMESMMA....MD..........
J
BDM Ver 0.1.63 (23 May 2017) - 1100000/0
3279558
EUROPEAN PATENT APPLICATION
A1
20180207
EP
16182513.8
20160803
en
en
en
20180207
201806
20180207
201806
F21V 23/00 20150101AFI20161021BHEP
F21V 29/77 20150101ALI20161021BHEP
F21V 15/01 20060101ALN20161021BHEP
F21W 131/103 20060101ALN20161021BHEP
F21S 9/02 20060101ALN20161021BHEP
F21S 8/04 20060101ALN20161021BHEP
F21Y 115/10 20160101ALN20161021BHEP
F21Y 105/18 20160101ALN20161021BHEP
de
LEUCHTE
en
LUMINAIRE
fr
LUMINAIRE
1
ZG Lighting Benelux
101606984
P49044/EP-Kiw/s
Rijksweg 47 Industriezone Puurs Nr. 442
2870 Puurs
BE
Lambrechts, Jurgen
Prinsstraat 55
2960 Sint-Lenaarts
BE
Usher, Christian
Kostverlorenhof 2 A44
1183 HE Amsteleveen
NL
Kiwit, Benedikt
101344452
Mitscherlich PartmbB Patent- und Rechtsanwälte Sonnenstraße 33
80331 München
DE
AL
AT
BE
BG
CH
CY
CZ
DE
DK
EE
ES
FI
FR
GB
GR
HR
HU
IE
IS
IT
LI
LT
LU
LV
MC
MK
MT
NL
NO
PL
PT
RO
RS
SE
SI
SK
SM
TR
BA
ME
MA
MD
A luminaire (10) having a main beam direction (B) comprising a heatsink (1), a light source (2) mounted to the heatsink (1), and a driver (3) configured to drive the light source (2), wherein the driver (3) is at least partially positioned on a side of the light source (2) being opposite to the heatsink (1).

1. Field of the invention
The present invention relates to luminaires having a high lumen output resulting in an excessive heat generation.

2. Technical background
In the prior art, luminaires having a high lumen output are well known. Those luminaires usually comprise a driver and a light source having a light emitting direction of the light source for constituting a main beam direction of the luminaire. The driver is usually provided somewhere at the rear side of the luminaire with respect to the light emitting direction of the light source. In case of the luminaire directing light downwards, the heat being generated will rise and will pass the driver which is heated up and having an adverse effect on the driver. In such a case, the driver can be placed at a position not being affected by the heat of the luminaire, which, however, results in bigger dimensions of the luminaire.
Therefore, it is an object of the present invention to provide a luminaire that is compact and that allows that the driver is not being affected by the heat of the luminaire.
These and other objects, which become apparent upon reading the following description, are solved by the subject-matter of the independent claim. The dependent claims refer to preferred embodiments of the invention.

3. Summary of the invention
According to the invention, a luminaire having a main beam direction comprises a heatsink, a light source mounted to the heatsink, and a driver configured to drive the light source, wherein the driver is at least partially positioned on a side of the light source being opposite to the heatsink.
In the context of the present invention, the term "main beam direction" is to be understood as the direction of the emitted light of the luminaire. The "main beam direction" may be formed by one light source having a light emission direction or by the sum of a plurality of light emission directions each provided by a light source. Preferably, the "main beam direction" constitutes an axis, in particular a central axis, of a light cone provided by the luminaire.
In the context of the present invention, the term "driver" is to be understood as a means for the light source, in particular for an LED module, performing certain control functions, in particular controlling a current flowing through the light source, the LED module, respectively.
With other words, the present invention proposes to position the driver with respect to the heatsink and the light source such that a heat flow coming from the light source in the direction of the heatsink and of a rear side of the luminaire is pointing away from the driver. E.g., if the luminaire is attached to a ceiling, the driver is partially positioned below the light source and the heatsink, respectively, therefore affecting that the heat flow between the light source and the heatsink is pointing away from the driver. Thus, an excessive influence of the heat on the driver is avoided and the size as well as the material of the luminaire can be minimized, in particular with respect to luminaires having the same lumen output and the same ambient temperature performing with the same lifetime. As such, the driver is only influenced by the ambient air or ambient temperature rather than the heat generated by the light source.
The whole driver may be positioned on the side of the light source being opposite to the heatsink. By entirely positioning the driver on the side of the light source being opposite to the heatsink, the influence of heat generated by the light source acting on the driver is further reduced. This additionally provides an easy assembly of the luminaire, since both the light source and the driver can be assembled from the same side and in the same direction.
The luminaire may further comprise further electric and/or electronic components like an energy source, preferably a battery for emergency requirements, for operating the light source, wherein the further components are at least partially positioned on a side of the light source being opposite to the heatsink and more preferably also positioned on a side of the driver being opposite to the heatsink and the light source. Thus, the further components are not affected by the heat generated by the light source, either. This provides a more compact layout of the luminaire comprising the aforementioned components as well as an improved, i.e. longer, lifetime of the respective components and the luminaire as a whole. Moreover, positioning the further components on a side of the driver being opposite to the heatsink and the light source ensures that the temperature of the respective further component, e.g. the battery, is only influenced by the ambient temperature.
Preferably, the driver extends longitudinally with a longitudinal axis - i.e. has a longitudinal axis -, wherein the longitudinal axis is orientated substantially in parallel with respect to the main beam direction of the luminaire, and wherein the longitudinal axis of the driver is particularly preferably flush with the main beam direction of the luminaire. This arrangement is particularly advantageous for avoiding that heat from the light source is flowing to the driver. Moreover, due to the parallel and the preferred flush arrangement of the elongated driver with respect to the main beam direction, the influence of the driver on the light emission is improved, i.e. reduced, and the luminaire may be designed in a more compact manner.
Alternatively, the longitudinal axis of the driver may be angled and preferably orientated substantially perpendicular with respect to the main beam direction of the luminaire. Due to this arrangement, the luminaire may be decreased in size in an extending direction of the luminaire in the main beam direction.
Preferably, the driver is positioned at least partially within or outside the periphery of the heatsink, when viewed in the main beam direction of the luminaire. In other words, the driver is positioned at a position outside of an area defined by the light emission of the light source, so that the position does not affect the light emission of the light source. This is particularly advantageous for further reducing the influence of the driver on the light emission, wherein the size of the luminaire is further decreased in the extending direction of the luminaire in the direction of the main beam direction.
The heatsink may comprise a hole at least being open towards the light source, i.e. having an opening on the side of the light source, wherein the hole of the heatsink preferably tapers, e.g. in a stepwise manner, in a direction away from the light source.
Preferably, the luminaire further comprises a housing for enclosing and preferably holding the driver. Further preferably, the housing also encloses and particular preferably holds the further components. This is particularly advantageous for easily mounting the respective components to the luminaire and for further avoiding that heat generated by the light source affects the components enclosed by the housing.
The housing may be mounted to the heatsink by means of a corresponding connection between the hole and the housing, wherein the corresponding connection is preferably a transition or press fit or provided by engagement of corresponding connection means of both the housing and the heatsink. The corresponding connection provides an easy way to mount the housing to the heatsink. In this context, a corresponding connection is to be understood as a connection between two elements, wherein the elements respectively comprise a connection element, e.g. the corresponding connection means, and wherein the connection element of the one element is formed correspondingly to the connection element of the other element, such that the elements can be securely connected with one another.
Furthermore, the housing may comprise an opening facing towards the heatsink, preferably the hole of the heatsink.
The housing may have a substantially cylindrical shape and/or tapers in a direction away from the heatsink, such that the widened end of the housing is preferably held within or by the hole of the heatsink, e.g. via the connection means. Further preferably, a rim of the housing is engaged with a connection groove of the heatsink preferably extending circumferentially in a step of the hole that tapers in a stepwise manner. The reception of the rim in the groove particularly improves the attachment of the housing on the heatsink.
Preferably, the outer surface of the housing comprises a plurality of cooling fins, particularly preferably evenly distributed over the circumference of the housing. The plurality of cooling fins increases the whole surface of the housing, thus increasing convection. Therefore, heat transfer from the components enclosed by the housing is increased.
Furthermore, the plurality of cooling fins may engage with the hole of the heatsink, e.g. by the connection means, and preferably abut a step of the hole that tapers in a stepwise manner on the face side of the cooling fins. Further means for mounting the housing on the heatsink are thus reduced, since the cooling fins are simultaneously used as mounting elements.
The heatsink may comprise cooling fins, which are preferably evenly distributed over the circumference of the heatsink, wherein the cooling fins of the housing and the cooling fins of the heatsink preferably thermally cooperate with each other, e.g. by extending longitudinally from one another, to form a combined cooling body. Therefore, the surface of the heatsink and the housing is effectively increased, which is particularly advantageous for the cooling ability of the heatsink and the housing as well as the material used for said components.
Preferably, the heatsink comprises a receiving groove, e.g. a circumferentially extending receiving groove (e.g. extending around a symmetry axis of the luminaire), for receiving the light source. This is particularly advantageous for mounting the light source, thus reducing time and cost of assembly.
The light source may be an LED module, e.g. composed of at least one LED and/or printed circuit board. Preferably, the LED module is in plane contact with the heatsink. Said plane contact is particularly advantageous for effectively conducting heat from the LED module to the heatsink.
The luminaire may further comprise an optical system provided on the side of the light source being opposite to the heatsink for (optically) interacting with the light emitted by the light source, wherein the optical system is preferably connected to the heatsink, e.g. to cover or within the receiving groove. In particular, connecting the optical system to the heatsink further allows that heat of the optical system, that may come from the light source, is flowing to the heatsink.
The heatsink may comprise attaching elements for attaching the luminaire, e.g., at a ceiling or the like. Thus, the number of parts of the luminaire is reduced.

4. Description of a preferred embodiment
In the following, the invention is described exemplarily with reference to the enclosed figures, in which
- Figure 1 is a schematic cross-sectional view of a preferred embodiment of the luminaire; and
- Figure 2 the schematic cross-sectional of Figure 1 showing the temperature on air while the luminaire is operated.
Figure 1 is a cross-sectional view of the luminaire 10 according to a preferred embodiment of the invention. The luminaire 10 of the preferred embodiment is a luminaire for being operated with a high lumen output and/or in environments having a high ambient temperature. The luminaire 10 has a main beam direction B.
The luminaire 10 comprises a heatsink 1. In the preferred embodiment of Figure 1, the heatsink 1 has a substantially round and symmetrical shape. The heatsink 1 is, however, not restricted to a particular shape. Preferably, the heatsink 1 has such a shape that its surface is increased for facilitating heat flow. Increasing the surface of the heatsink may be achieved by (integrally) providing cooling fins 1g with the heatsink 1, which are preferably evenly distributed over the circumference of the heatsink 1. The cooling fins 1g may extend radially and may be arranged annularly with respect to the main beam direction B. Preferably, the cooling fins 1g constitute a lattice-like heatsink 1, thus providing an increased surface of the heatsink 1 for facilitating cooling.
The luminaire 10 further comprises a light source 2 mounted to the heatsink 1. As can be seen from Figure 1, the light source 2 is preferably mounted to the heatsink 1 by means of a receiving groove 1d that extends in the heatsink 1 preferably around the main beam direction B and receives the light source 2. Preferably, the receiving groove 1d extends in the plurality of cooling fins 1g. The cooling fins 1g preferably receive the light source 2. It should be noted that also other means for mounting the light source 2 are possible, such as by means of fixing elements or the like. The light source 2 may have a substantially two-dimensional extension. The light source 2 may be an LED module. The LED-module may be in plane contact with the heatsink 1. The LED module may comprise at least one LED and/or printed circuit board (PCB). Preferably, the at least on LED is bonded to the printed circuit board.
Furthermore, the luminaire 10 comprises a driver 3 configured to drive the light source 2. As can be seen by way of example of Figure 1, the whole driver 3 is positioned on the side of the light source 2 being opposite to the heatsink 1. However, it is already sufficient that the driver 3 is at least partially positioned on the side of the light source 2 being opposite to the heatsink 1 in order to achieve the inventive effect. Preferably, the light source 2 defines a plane and/or extends in a plane sandwiched between the heatsink 1 and the light emitting side, wherein the side of the light source 2 being opposite to the heatsink 1 faces towards the light emitting side. Under consideration of this plane, the driver 3 protrudes at least partially from the plane to the light emitting side. Preferably, the majority of the driver 3 is positioned on the side of the light source 2 being opposite to the heatsink 1. The majority may relate to, e.g., the volume of the driver 3, the weight of the driver 3 or the number of (electronic and/or mechanical) components constituting the driver 3. The driver 3 may also be positioned with respect to the heatsink 1, such that (only) a part of the driver 3 being the most critical part of the driver 3 with respect to heat flow is positioned on the side of the light source 2 being opposite to the heatsink 1. Said part may be defined as the tc point. Even though not shown in Figures 1 and 2, further electric and/or electronic components such as an energy source, preferably a battery, and/or further means for controlling the light source 2, may be positioned with respect to the heatsink 1 in the same way as described previously for the driver 3. The further components may be positioned on a side of the driver 3 being opposite to the heatsink 1 and the light source 2, i.e. farther away from the heatsink 1 than the driver 3. In particular, the battery may be positioned farther away from the heatsink 1 than the driver 3, preferably below the driver 3. This ensures that the temperature of the battery is only influenced by the ambient temperature. Preferably, also the further components, respectively, may have a tc point, wherein said tc point is also positioned on the side of the light source 2 being opposite to the heatsink 1.
As can be seen in Figure 1, the driver 3 may extend longitudinally, preferably have an elongated shape, particularly preferably a cylindrical shape, with a longitudinal axis L, wherein the axis L is parallel or preferably flush with the main beam direction B of the luminaire 10. As can be seen in Figure 1, the axis L is substantially perpendicular to the plane defined by the light source 2. Alternatively the longitudinal axis L may also be angled and preferably orientated substantially perpendicular with respect to the main beam direction B, i.e. preferably substantially in parallel with respect to the plane defined by the light source 2. In addition, when viewed in the main beam direction B, i.e. from below in the direction of the light source 2 and heatsink 1 in Figure 1, the driver 3 may also be positioned at least partially within or outside the periphery of the heatsink 1.
The exemplary heatsink 1 of the luminaire 10 in Figure 10 further comprises a hole 1a having an opening on the side of the light source 2. Preferably, the hole 1a is positioned substantially in the center of the heatsink 1. The extending axis of the hole 1a may be parallel or preferably flush with the main beam direction B. In addition, the longitudinal axis L of the driver 3 may be parallel or preferably flush with the extending axis of the hole 1a. The driver 3 may extend in the hole 1a and may optionally be mounted to the heatsink 1 by means of the hole 1a. Preferably, the hole 1a has a tapering shape that tapers in a direction away from the light source 2 or the side of the light source 2 being opposite to the heatsink 1. As can be seen in Figure 1, tapering of the hole 1a may be constituted by a stepwise form of the hole 1a. The hole 1a may also be provided as a hole that tapers by gradually increasing its diameter or by partially increasing its diameter gradually and by partially increasing its diameter stepwisely. The latter option can be seen in Figure 1, where a first part of the hole 1a being on the side of the light source 2 increases gradually, wherein the other part of the hole 1a is connected to the first part of the hole 1a via a step 1c. However, it is to be noted that step 1c can also be provided without the aforementioned form of the hole 1a.
As can be seen from Figure 1, the luminaire may comprise a housing 5 for enclosing and preferably holding the driver 3. Holding the driver 3 may be carried out by holding elements (not shown) provided in the housing 5. Preferably, the housing 5 is designed for further enclosing and optionally holding the further components, i.e. the energy source, e.g. a battery, and/or the further electronic and/or electric components. The housing 5 may be mounted to the heatsink 1 my means of a corresponding connection between the hole 1a and the housing 5, such as an engagement of corresponding connection means, a transition fit, a snap fit or the like. In addition or alternatively, the housing may be mounted to the heatsink 1 by means of fixing elements, such as bolts, nuts or the like. Preferably, the housing 5 comprises an opening 5a facing towards the heatsink 1. The opening 5a may face the hole 1a of the heatsink 1. Furthermore, the driver 3 may extent through the opening 5a into the hole 1a. In the preferred embodiment according to Figure 1, the housing 5 has a substantially cylindrical shape that tapers in a direction away from the heatsink 1, i.e. a substantially cone-shaped form. However, the housing may also have a different shape, such as a rectangular shape or the like. The end of the housing 5 facing towards the heatsink 1 may be held by the hole 1a of the heatsink 1. Said end may comprise a rim 5b that is preferably received by a connection groove 1b extending in the step 1c of the hole 1a. The connection groove 1b may further comprise engaging elements for engagement of the housing 5.
Furthermore, the housing 5 in Figure 1 comprises a plurality of cooling fins 5c. The cooling fins 5c may be evenly distributed over the circumference of the housing 5. The cooling fins 5c may extend from the opening 5b of the housing 5 in the extending direction of the housing 5, preferably away from the heatsink 1, substantially in the direction of the main beam direction B. As viewed perpendicular to the extending direction of the housing 5, the longitudinal axis L, respectively, the cooling fins 5c may be wedge-shaped. However, the cooling-fins 5c may also have any different shape, such as a rectangular shape or the like, that increases the total surface of the housing 5 for facilitating cooling of the components enclosed in the housing 5. The plurality of cooling fins 5c may engage with the hole 1a of the heatsink 1 for mounting the housing 5 on the heatsink 1. This arrangement also provides a heat flow from the housing 5 by way of the cooling fins 5c to the heatsink 1. Preferably, the hole 1a of the heatsink 1 comprises recesses 1e, in particular slots, corresponding to the shape and preferably to the number of the plurality of cooling fins 5c for engagement of the cooling fins 5c with the hole 1a. Furthermore, as can be seen in Figure 1, the cooling fins 5b may abut the step 1c of the hole 1a on the face side of the cooling fins 5b. The cooling fins 1g of the heatsink 1 and the cooling fins 5c of the housing 5 may thermally cooperate with each other, e.g. by extending longitudinally from one another, to form a combined cooling body. As such, the housing 5 may also be integrally formed with the heatsink 1.
The material of the housing 5 and the cooling fins 5c, respectively, has a high thermal conductivity for facilitating cooling. Preferably, the material of the housing 5 is metal. The material of the heatsink 1 may also have a high thermal conductivity for facilitating cooling, such as metal or the like.
The luminaire 10 may further comprise an optical system 4 provided on the side of the light source 2 being opposite to the heatsink 1 for interacting with the light emitted by the light source 2. For instance, the optical system 2 may influence the emitted light to constitute the main beam direction B. For facilitating heat flow from the optical system 2 to the heatsink 1, the optical system 2 may be connected to, preferably mounted on, the heatsink 1. The optical system 4 may cover the receiving groove 1d, and thus preferably also covers the light source 2. As an alternative, the optical system 4 may also be provided/placed within the receiving groove 1d, i.e. the optical system 4 may be received by the receiving groove 1d and may cover the light source 2.
The heatsink 1 may comprise attaching elements 1f for attaching the luminaire, e.g. at a housing, a ceiling, a wall etc. The attaching elements 1f are preferably provided on a side of the heatsink 1 being opposite to the side of the heatsink 1, where the light source 2 is mounted.
Figure 2 shows the temperature on air while the luminaire 10 is operated. It is apparent that the heat plume H does not influence the temperature of the driver 3. The region inside the hole 1a constitutes a relatively hot region. Furthermore, it can be seen that heat generated by the light source 2 is flowing away from light source 2 by way of the heatsink 1 and further away from the heatsink 1.
It should be clear to a skilled person that the embodiment shown in the figures is only a preferred embodiment, but that, however, also other designs of a luminaire 10 having a heatsink 1, a light source 2 and a driver 3 can be used. In particular, the invention is not restricted to a particular form of the heatsink 1, the light source 2 and the driver 3.
1. A luminaire (10) having a main beam direction (B) comprising:
- a heatsink (1),
- a light source (2) mounted to the heatsink (1), and
- a driver (3) configured to drive the light source (2), wherein
the driver (3) is at least partially positioned on a side of the light source (2) being opposite to the heatsink (1).
2. The luminaire (10) according to claim 1, wherein
the whole driver (3) is positioned on the side of the light source (2) being opposite to the heatsink (1).
3. The luminaire (10) according to any one of the preceding claims further comprising further electric and/or electronic components like an energy source, preferably a battery, for operating the light source (2), wherein the further components are at least partially positioned on a side of the light source (2) being opposite to the heatsink (1) and more preferably also positioned on a side of the driver (3) being opposite to the heatsink (1) and the light source (2).
4. The luminaire (10) according to any one of the preceding claims, wherein
the driver (3) extends longitudinally with a longitudinal axis (L), wherein the longitudinal axis (L) is orientated substantially in parallel with respect to the main beam direction (B) of the luminaire (10), and wherein the longitudinal axis (L) of the driver (3) is preferably flush with the main beam direction (B) of the luminaire (10), or. the driver (3) extends longitudinally with a longitudinal axis (L), wherein the longitudinal axis (L) is angled and preferably orientated substantially perpendicular with respect to the main beam direction (B) of the luminaire (10).
5. The luminaire (10) according to any one of the preceding claims, wherein the driver (3) is positioned at least partially within or outside the periphery of the heatsink (1), when viewed in the main beam direction (B) of the luminaire (10).
6. The luminaire (10) according to any one of the preceding claims, wherein the heatsink (1) comprises a hole (1a) at least being open towards the light source (2), wherein the hole (1a) of the heatsink (1) preferably tapers, e.g. in a stepwise manner, in a direction away from the light source (2).
7. The luminaire (10) according to any one of the preceding claims further comprising a housing (5) for enclosing and preferably holding the driver (3) and preferably also the further components, wherein the housing (5) is mounted to the heatsink (1) preferably by means of a corresponding connection particularly preferably between the hole (1a) and the housing (5), wherein the corresponding connection is preferably a transition fit or provided by engagement of corresponding connection means of both the housing (5) and the heatsink (1).
8. The luminaire (10) according to claim 8, wherein the housing (5) comprises an opening (5a) facing towards the heatsink (1), preferably the hole (1a) of the heatsink (1).
9. The luminaire (10) according to claim 8 or 9, wherein the housing (5) has a substantially cylindrical shape and/or tapers in a direction away from the heatsink (1), such that the widened end of the housing (5) is preferably held within the hole (1a) of the heatsink (1), e.g. via the connection means, wherein a rim (5b) of the housing (5) is preferably engaged with a connection groove (1b) of the heatsink (1) preferably extending circumferentially in a step (1c) of the hole (1) tapering in a stepwise manner.
10. The luminaire (10) according to any one of claims 8 to 10, wherein the outer surface of the housing (5) comprises a plurality of cooling fins (5c), preferably evenly distributed over the circumference of the housing (5), wherein the plurality of cooling fins (5c) preferably engage with the hole (1a) of the heatsink (1), e.g. by the connection means, and particularly preferably abut a step (1c) of the hole (1a) tapering in a stepwise manner on the face side of the cooling fins.
11. The luminaire (10) according to any one of the preceding claims, wherein the heatsink comprises cooling fins which are preferably evenly distributed over the circumference of the heatsink, and wherein the cooling fins of the housing and the cooling fins of the heatsink preferably thermally cooperate with each other, e.g. by extending longitudinally from one another, to form a combined cooling body.
12. The luminaire (10) according to any one of the preceding claims, wherein the heatsink (1) comprises a receiving groove (1d), e.g. a circumferentially extending receiving groove, for receiving the light source (2),
13. The luminaire (10) according to any one of the preceding claims, wherein the light source (2) is an LED module preferably being in plane contact with the heatsink (1).
14. The luminaire (10) according to any one of the preceding claims further comprising an optical system (4) provided on the side of the light source (2) being opposite to the heatsink (1) for interacting with the light emitted by the light source (2), wherein the optical system (4) is preferably connected to the heatsink (1), e.g. to cover or within the receiving groove (1d).
15. The luminaire (10) according to any one of the preceding claims, wherein the heatsink (1) comprises attaching portions or elements (1f) for attaching the luminaire.
P49044/EP-Kiw/s
EP
16182513.8
ZG Lighting Benelux
1
DH
20161027
F21V
F21W
F21S
F21Y
US
2013044478
A1
STEEDLY JAMES [US]
20130221
X
1-15
* paragraph [0032] - paragraph [0048] *
* paragraph [0050] *
* paragraph [0053] - paragraph [0062] *
* paragraph [0069] *
* figures 6,7,12-21 *
US
2011316014
A1
HIROYUKI FUKUI [JP]
20111229
X
1,2,4,11,13
* paragraph [0048] - paragraph [0057] *
* paragraph [0071] *
* figures 1,9,10 *
US
2009147510
A1
PENG CHANG-HUNG [TW]
20090611
X
1-4,11,13-15
* paragraph [0023] - paragraph [0025] *
* figures 2,3 *
US
2011032696
A1
KIM MIN KONG [KR] ET AL
20110210
X
1,2,4,5,11-13,15
* paragraph [0025] - paragraph [0030] *
* figures 3,4 *
US
2014204562
A1
MORI TOSHIO [JP] ET AL
20140724
X
1,2,4,5,7-9,12-14
* paragraph [0034] - paragraph [0052] *
* figures 1-3 *
US
2011101861
A1
YOO YOUNG HO [KR]
20110505
A
1-15
* the whole document *
WO
2015031322
A1
DELTA T CORP [US]
20150305
A
1-15
* the whole document *
Soto Salvador, Jesús
The Hague
20161019
US
2013044478
A1
20130221
CN
202834855
U
20130327
US
2013044478
A1
20130221
US
2011316014
A1
20111229
JP
2012015148
A
20120119
US
2011316014
A1
20111229
US
2009147510
A1
20090611
DE
202008006328
U1
20080717
JP
3146695
U
20081127
TW
M334269
U
20080611
US
2009147510
A1
20090611
US
2011032696
A1
20110210
CN
201731369
U
20110202
JP
3155960
U
20091210
KR
20110001434
U
20110210
TW
M383073
U
20100621
US
2011032696
A1
20110210
US
2014204562
A1
20140724
CN
103939760
A
20140723
EP
2757315
A1
20140723
JP
6135908
B2
20170531
JP
2014143025
A
20140807
US
2014204562
A1
20140724
US
2011101861
A1
20110505
KR
100961840
B1
20100608
US
2011101861
A1
20110505
US
2011181183
A1
20110728
WO
2015031322
A1
20150305
AU
2014311369
A1
20160421
CA
2922481
A1
20150305
EP
3039334
A1
20160706
SG
11201602319T
A
20160530
US
2016208998
A1
20160721
US
2017016589
A1
20170119
WO
2015031322
A1
20150305