ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIROMKCYALTRBGCZEEHUPLSKBAHRIS..MTNORSMESMMA....MD..........
J
BDM Ver 0.1.63 (23 May 2017) - 1100000/0
3441349
EUROPEAN PATENT APPLICATION
published in accordance with Art. 153(4) EPC
A1
20190213
EP
17779241.3
20170407
20181029
ja
en
en
2016078496
20160408
JP
20190213
201907
20190213
201907
B66C 23/88 20060101AFI20171013BHEP
de
KRAN
en
CRANE
fr
GRUE
7
Tadano Ltd.
101456712
180399EPP
Ko-34, Shindencho
Takamatsu-shi, Kagawa 761-0185
JP
FUKUMORI Yasuhiro
c/o TADANO Ltd. Ko-34 Shinden-cho
Takamatsu-shi Kagawa 761-0185
JP
KAWABUCHI Naoto
c/o TADANO LTD. Ko-34 Shinden-cho
Takamatsu-shi Kagawa 7610185
JP
YOSHIDA Naofumi
c/o TADANO LTD. Ko-34 Shinden-cho
Takamatsu-shi Kagawa 7610185
JP
MFG Patentanwälte Meyer-Wildhagen Meggle-Freund Gerhard PartG mbB
101278730
Amalienstraße 62
80799 München
DE
AL
AT
BE
BG
CH
CY
CZ
DE
DK
EE
ES
FI
FR
GB
GR
HR
HU
IE
IS
IT
LI
LT
LU
LV
MC
MK
MT
NL
NO
PL
PT
RO
RS
SE
SI
SK
SM
TR
BA
ME
MA
MD
JP2017014556
20170407
ja
WO2017175864
20171012
201741
A crane 1, the hook (main hook 24) of which is stored on the lower end of a boom 7, and the winch (main winch 9) of which can be moved by a hydraulic motor 37, said crane being provided with a pressure sensor 55 capable of detecting the pressure of hydraulic fluid being delivered to the hydraulic motor 37, and a controller 61 capable of recognizing changes in the pressure of the hydraulic fluid on the basis of a signal from the pressure sensor 55, and also being provided with an anomaly warning means Mi capable of providing warning of anomalies pertaining to the storage of at least the hook (24), the controller 61 activating the anomaly warning means Mi when it is determined that the pressure of the hydraulic fluid when the hook has been stored is below a minimum value.

Technical Field
The present invention relates to a crane. Specifically, the present invention relates to a crane that includes a hook storing apparatus.

Background Art
Conventionally, a crane that hoists and carries a load has been known (see PTL 1). The crane includes: a boom; a wire rope running from a proximal end to a distal end of the boom; a winch that winds up and releases the wire rope; and a hook that is lifted and lowered by winding up and releasing the wire rope in a state where the hook is hung by the wire rope.
There is a crane that includes a hook to be stored below a boom when a wire rope is further wound in a state where the hook is in contact with the boom (see PTL 2). Such a crane prevents the hook from swinging during traveling, which in turn prevents the hook from colliding with the boom and the like. However, in case an operator falsely recognizes that the hook has already been stored and finishes the operation even though winding up of the wire rope is insufficient, the hook sags again owing to vibrations during traveling, causing a possibility that the hook collides with the ground or the like. Accordingly, a crane has been required that prevents the operator from falsely recognizing that the hook has already been stored in case winding up of the wire rope is insufficient owing to any cause.

Citation List

Patent Literature
- PTL 1 Japanese Patent Application Laid-Open No. 2015-9939
- PTL 2 Japanese Patent Application Laid-Open No. 2011-98824

Summary of Invention

Technical Problem
A crane is provided that prevents the operator from falsely recognizing that the hook has already been stored in case winding up of the wire rope is insufficient owing to any cause.

Solution to Problem
A first invention is directed to a crane, including:
- a boom;
- a wire rope running from a proximal end to a distal end of the boom;
- a winch winding up and releasing the wire rope; and
- a hook being lifted and lowered by winding up and releasing the wire rope in a state where the hook is hung by the wire rope,
- the hook being stored below the boom when the wire rope is further wound up in a state where the hook is in contact with the boom,
- in which the winch is configured to be moved by a hydraulic motor,
- the crane further includes:
  - a pressure sensor capable of detecting a pressure of hydraulic fluid to be delivered to the hydraulic motor; and
  - a controller capable of recognizing change in pressure of the hydraulic fluid, based on a signal from the pressure sensor, and
- the crane further includes an abnormality notification section capable of issuing a notification of abnormality at least pertaining to storing of the hook, and
- the controller actuates the abnormality notification section in a case where it is determined that the pressure of the hydraulic fluid falls below a lower limit value when the hook is stored.
A second invention is directed to the crane according to the first invention, in which the controller actuates the abnormality notification section in a case where it is determined that the pressure of the hydraulic fluid exceeds an upper limit value when the hook is stored.
A third invention is directed to the crane according to the first invention, further including
a supply blocking section capable of blocking supply of the hydraulic fluid,
in which the controller actuates the supply blocking section in a case where it is determined that the pressure of the hydraulic fluid exceeds an upper limit value when the hook is stored.
A fourth invention is directed to the crane according to the third invention,
in which a direction switching valve is configured to switch a flow direction of the hydraulic fluid,
the crane includes, as the supply blocking section, an operation signal pressure unload valve capable of releasing a signal pressure of the direction switching valve, and
the controller actuates the operation signal pressure unload valve in a case where it is determined that the pressure of the hydraulic fluid exceeds an upper limit value when the hook is stored.

Advantageous Effects of Invention
This crane according to the first invention actuates the abnormality notification section in a case where the pressure of the hydraulic fluid falls below the lower limit value when the hook is stored. Such a crane actuates the abnormality notification section in case winding up of the wire rope is insufficient owing to any cause. This actuation can prevent an operator from falsely recognizing that storing of the hook has been completed.
The crane according to the second invention actuates the abnormality notification section in a case where the pressure of the hydraulic fluid exceeds the upper limit value when the hook is stored. Such a crane actuates the abnormality notification section in case the load applied to the hydraulic motor exceeds the predetermined value owing to any cause. Accordingly, the operator can recognize occurrence of the abnormality.
The crane according to the third invention actuates the supply blocking section if it is determined that the pressure of the hydraulic fluid exceeds the upper limit value when the hook is stored. Such a crane actuates the supply blocking section in case the load applied to the hydraulic motor exceeds the predetermined value owing to any cause. Accordingly, the operation of storing the hook can be automatically stopped.
The crane according to the fourth invention actuates the operation signal pressure unload valve in a case where it is determined that the pressure of the hydraulic fluid exceeds the upper limit value when the hook is stored. Such a crane actuates the operation signal pressure unload valve in case the load applied to the hydraulic motor exceeds the predetermined value owing to any cause. Accordingly, the operation of storing the hook can be automatically and securely stopped.

Brief Description of Drawings
- FIG. 1 illustrates a crane during traveling;
- FIG. 2 illustrates the crane during a hoisting operation;
- FIG. 3 illustrates the inside of a cabin;
- FIG. 4 illustrates a distal end of a boom;
- FIG. 5 illustrates a main hook storing operation;
- FIG. 6 illustrates a sub-hook storing operation;
- FIG. 7 illustrates a hydraulic circuit of the crane according to Embodiment 1;
- FIG. 8 illustrates a process of a controller when the main hook is stored;
- FIG. 9 illustrates the process of the controller when the main hook is stored;
- FIG. 10 illustrates a hydraulic circuit of a crane according to Embodiment 2; and
- FIG. 11 illustrates a hydraulic circuit of a crane according to Embodiment 3.

Description of Embodiments
The technical thought of the present invention is applicable not only to crane 1 described below but also to other cranes.
First, crane 1 is briefly described.
FIG. 1 illustrates crane 1 during traveling. FIG. 2 illustrates crane 1 during a hoisting operation. FIG. 3 illustrates the inside of cabin 8.
Crane 1 mainly includes traveling body 2, and swivel body 3.
Traveling body 2 includes a lateral pair of front tires 4, and a lateral pair of rear tires 5. Furthermore, traveling body 2 includes outriggers 6 that are brought in contact with the ground and facilitates stabilization during the hoisting operation. Moreover, traveling body 2 includes not only a hydraulic actuator for driving these elements but also an engine and a transmission.
Swivel body 3 includes boom 7 so as to protrude forward from the rear. Boom 7 can be freely derricked by the hydraulic actuator, and can freely expand and contract in a multistage manner. Swivel body 3 includes cabin 8 disposed to the right of boom 7. In cabin 8, not only steering wheel 8a and shift lever 8b that are required for a traveling operation, but also lifting and lowering levers 8c and 8d that are required for an operation of the hoisting operation are disposed. Swivel body 3 further includes main winch 9, and sub-winch 10.
Next, the structure of boom 7, and the storing operations of main hook 24 and sub-hook 27 are described.
FIG. 4 illustrates a distal end of boom 7. FIG. 5 illustrates the storing operation of main hook 24. FIG. 6 illustrates the storing operation of sub-hook 27.
The distal end of boom 7 mainly includes boom head 11, and multiple sheaves 12, 13, 14 and 15.
Boom head 11 has a structure that includes a lateral pair of head plates 11a disposed to face each other. One head plate 11a is welded to other head plate 11a in a state of being arranged in parallel, and their rear ends are attached to boom 7. Boom head 11 includes guide sheave shaft 11b, main sheave shaft 11c, and sub-sheave shaft 11d. These shafts 11b, 11c and 11d are configured in a state where their opposite ends are supported by the lateral pair of head plates 11a.
Guide sheave 12 is rotatably supported in a state where guide sheave shaft 11b is inserted in the center thereof. Guide sheave 12 is a substantially disk-shaped revolution body, and has a groove for guiding a wire rope (main wire 21) on its outer peripheral surface. A part of guide sheave 12 protrudes upward from an upper surface plate of boom 7. Main wire 21, which runs from the proximal end to the distal end of boom 7, runs around this sheave. Thus, main wire 21, which runs over boom 7, is guided downward around guide sheave 12.
Guide sheave 13 is rotatably supported in a state where guide sheave shaft 11b is inserted in the center thereof. Guide sheave 13 is a substantially disk-shaped revolution body, and has a groove for guiding a wire rope (sub-wire 25) on its outer peripheral surface. A part of guide sheave 13 protrudes upward from an upper surface plate of boom 7. Sub-wire 25, which runs from the proximal end to the distal end of boom 7, runs around this sheave. Thus, sub-wire 25, which runs over boom 7, is guided around guide sheave 13 and then forward and downward.
Main sheave 14 is rotatably supported in a state where main sheave shaft 11c is inserted in the center thereof. Main sheave 14 is a substantially disk-shaped revolution body, and has a groove for guiding main wire 21 on its outer peripheral surface. Main sheave 14 is disposed below the lower surface plate of boom 7. Main wire 21 runs around this sheave and hook sheave 23, which is described later. Thus, main wire 21 running around guide sheave 12 and then downward, runs around hook sheave 23 and upward, and then is guided around main sheave 14 and downward. Main wire 21 then runs around hook sheave 23 and main sheave 14, and is fixed to wire link 11e of boom head 11. The number of windings (the number of runnings) of main wire 21 may be selected from among two (four) and three (six).
Sub-sheave 15 is rotatably supported in a state where sub-sheave shaft 11d is inserted in the center thereof. Sub-sheave 15 is a substantially disk-shaped revolution body, and has a groove for guiding sub-wire 25 on its outer peripheral surface. Sub-sheave 15 is disposed below the lower surface plate of boom 7. Sub-wire 25 runs around this sheave. Thus, sub-wire 25, which runs around guide sheave 13 and forward and downward, is guided around sub-sheave 15 and downward. Sub-wire 25 is then fixed to wire link 26c of sub-hook block 26, which is described later. The number of windings (the number of runnings) of sub-wire 25 cannot be selected, and is defined as one (one).
Additionally, main bracket 16 is attached to the lower end of boom head 11.
Main bracket 16 has a structure that includes a lateral pair of bracket plates 16a disposed to face each other. One bracket plate 16a is welded to other bracket plate 16a in a state of being arranged in parallel, and their distal ends are attached to boom head 11 via pin 16b. Specifically, each bracket plate 16a has a substantially trapezoidal shape. A distal end of a side inclined obliquely downward from the upper base to the lower base is attached to boom head 11 via pin 16b. Accordingly, main bracket 16 is freely rotatable centered at pin 16b until the inclined side of bracket plate 16a comes into contact with boom head 11. Main wire 21 runs between the lateral pair of bracket plates 16a and then around hook sheave 23 of main hook block 22. Over-winding prevention switch 17 hangs below main bracket 16. Over-winding prevention switch 17 is turned "on" when coming into contact with main hook block 22, and transmits a signal to stop main winch 9. Main hook block 22 is thus prevented from colliding with main bracket 16 and boom 7.
Main hook block 22 has a structure that includes a lateral pair of block plates 22a disposed to face each other. One block plate 22a is coupled to other block plate 22a via multiple rods in a state of being arranged in parallel, and clamps main hook 24 at their lower ends. Main hook block 22 includes hook sheave shaft 22b. Hook sheave shaft 22b is configured in a state where its opposite ends are supported by the lateral pair of block plates 22a.
Hook sheave 23 is rotatably supported in a state where hook sheave shaft 22b is inserted in the center thereof. Hook sheave 23 is a substantially disk-shaped revolution body, and has a groove for guiding main wire 21 on its outer peripheral surface. Hook sheave 23 is disposed in main hook block 22. Main wire 21 runs around this sheave and main sheave 14 described above.
As described above, main wire 21 is guided by guide sheave 12, main sheave 14 and hook sheave 23, and is held so as to run along a predetermined route. According to crane 1, when main winch 9 winds up main wire 21, main hook block 22 hung by main wire 21 can be lifted. That is, main hook 24 can be lifted (see arrow Um in FIG. 4). On the contrary, according to crane 1, when main winch 9 releases main wire 21, main hook block 22 hung by main wire 21 can be lowered. That is, main hook 24 can be lowered (see arrow Dm in FIG. 4).
Furthermore, when crane 1 winds up main wire 21 in a state where the function of over-winding prevention switch 17 is invalidated, main hook block 22 can be brought into contact with main bracket 16. When main wire 21 is further wound up, main bracket 16 and main hook block 22 are allowed to turn in a direction approaching boom 7. Thus, crane 1 can store main hook 24 below boom 7 (see arrow Rm in FIG. 5).
Furthermore, sub-bracket 18 is attached to the front end of boom head 11.
Sub-bracket 18 has a structure that includes a lateral pair of bracket plates 18a disposed to face each other. One bracket plate 18a is welded to other bracket plate 18a in a state of being arranged in parallel, and their distal ends are attached to boom head 11 via pin 18b. Specifically, each bracket plate 18a has a substantially trapezoidal shape. A distal end of a side inclined obliquely downward from the upper base to the lower base is attached to boom head 11 via pin 18b. Accordingly, sub-bracket 18 is freely rotatable centered at pin 18b until the inclined side of bracket plate 18a comes into contact with boom head 11. Sub-wire 25 runs between the lateral pair of bracket plates 18a and is fixed to sub-hook block 26. Over-winding prevention switch 19 hangs below sub-bracket 18. Over-winding prevention switch 19 is turned "on" when coming into contact with sub-hook block 26, and transmits a signal to stop sub-winch 10. Sub-hook block 26 is thus prevented from colliding with sub-bracket 18.
Sub-hook block 26 has a structure where block cylinder 26b is welded to single block case 26a. The inside of block case 26a is hollow. A hole through which sub-wire 25 is to be pulled in is formed on an upper end of this case. Block cylinder 26b supports sub-hook 27 at the lower end of this cylinder. Sub-hook block 26 further includes wire link 26c. Wire link 26c is stored in block case 26a, and fixes sub-wire 25 drawn therein.
As described above, sub-wire 25 is guided by guide sheave 13 and sub-sheave 15, and is held so as to run along a predetermined route. According to crane 1, when sub-winch 10 winds up sub-wire 25, sub-hook block 26 hung by sub-wire 25 can be lifted. That is, sub-hook 27 can be lifted (see arrow Us in FIG. 4). On the contrary, according to crane 1, when sub-winch 10 releases sub-wire 25, sub-hook block 26 hung by sub-wire 25 can be lowered. That is, sub-hook 27 can be lowered (see arrow Ds in FIG. 4).
Furthermore, when crane 1 winds up sub-wire 25 in a state where the function of over-winding prevention switch 19 is invalidated, sub-hook block 26 can be brought into contact with sub-bracket 18. When sub-wire 25 is further wound up, sub-bracket 18 and sub-hook block 26 are allowed to turn in a direction approaching boom 7. Thus, crane 1 can store sub-hook 27 below boom 7 (see arrow Rs in FIG. 6).
Next, hydraulic circuits that allow the wire ropes to be wound up and released (main wire 21 and sub-wire 25) are described.
A hydraulic circuit that drives main winch 9 and a hydraulic circuit that drives sub-winch 10 have configurations substantially identical to each other. Accordingly, in the present application, the hydraulic circuit that drives main winch 9 is focused and described.
FIG. 7 illustrates the hydraulic circuit of crane 1 according to Embodiment 1. Solid lines in the diagram represent hydraulic circuits pertaining to driving of hydraulic motor 37. Broken lines in the diagram represent hydraulic circuits that transmit the pressure of hydraulic fluid as a signal. Chain double-dashed lines in the diagram represent electric circuits.
First, the hydraulic circuit pertaining to driving of hydraulic motor 37 is described. Hereinafter, such a hydraulic circuit is described as "drive circuit".
Hydraulic pump 31 is disposed in the drive circuit. Hydraulic fluid pipe 32 communicates with hydraulic pump 31.
Furthermore, direction switching valve 33 is disposed in the drive circuit. Hydraulic fluid pipe 32 communicates with direction switching valve 33. Accordingly, the hydraulic fluid pumped out from hydraulic pump 31 is supplied to direction switching valve 33 through hydraulic fluid pipe 32. Hydraulic pipes 34, 35 and 36 communicate with direction switching valve 33. Accordingly, actuation in one direction allows the hydraulic fluid to flow into hydraulic fluid pipe 34, while actuation in the other direction allows the hydraulic fluid to flow into hydraulic fluid pipe 35. In all the cases, the hydraulic fluid is discharged through hydraulic fluid pipe 36. Direction switching valve 33 constitutes supply blocking section Mb, described later.
Furthermore, hydraulic motor 37 is disposed in the drive circuit. Hydraulic fluid pipes 34 and 35 communicate with hydraulic motor 37. Accordingly, the hydraulic fluid pumped out from hydraulic pump 31 is supplied to hydraulic motor 37 through hydraulic fluid pipes 32 and 34 or hydraulic fluid pipes 32 and 35. When the hydraulic fluid is supplied through hydraulic fluid pipes 32 and 34, hydraulic motor 37 normally rotates. When the hydraulic fluid is supplied through hydraulic fluid pipes 32 and 35, this motor reversely rotates. Hydraulic motor 37 is coupled to wire drum 20. Accordingly, when hydraulic motor 37 normally rotates, wire drum 20 also normally rotates and winds up main wire 21. On the contrary, when hydraulic motor 37 reversely rotates, wire drum 20 also reversely rotates and releases main wire 21.
Furthermore, pilot-actuated relief valve 38 is disposed in the drive circuit. Hydraulic fluid pipe 39 communicates with pilot-actuated relief valve 38. Hydraulic fluid pipe 39 communicates with hydraulic fluid pipe 32. Accordingly, the hydraulic fluid pumped out from hydraulic pump 31 is supplied to pilot-actuated relief valve 38 through hydraulic fluid pipes 32 and 39. Hydraulic fluid pipe 40 communicates with pilot-actuated relief valve 38. Accordingly, when the pressures in hydraulic fluid pipes 32 and 39 are higher than a predetermined value, the hydraulic fluid is discharged through hydraulic fluid pipe 40. Specifically, this hydraulic circuit can achieve "high-pressure relief mode", "low-pressure relief mode", and "unload state" depending on the actuation state of relief pressure switching valve 50, described later. In "high-pressure relief mode", when the pressures of hydraulic fluid pipes 32 and 39 reach a set value (high-pressure value), pilot-actuated relief valve 38 is opened, and the hydraulic fluid is discharged through hydraulic fluid pipe 40. In "low-pressure relief mode", when the pressures of hydraulic fluid pipes 32 and 39 reach a set value (low-pressure value), pilot-actuated relief valve 38 is opened, and the hydraulic fluid is discharged through hydraulic fluid pipe 40. In "unload state", pilot-actuated relief valve 38 is kept open. Accordingly, the entire hydraulic fluid pumped out from hydraulic pump 31 is discharged through hydraulic fluid pipe 40.
Next, the hydraulic circuit that transmits the pressure of the hydraulic fluid as a signal is described. Hereinafter, such a hydraulic circuit is described as "signal circuit".
Hydraulic pressure source 41 resides in the signal circuit. Hydraulic fluid pipe 42 communicates with hydraulic pressure source 41.
Furthermore, operation signal pressure unload valve 43 is disposed in the signal circuit. Hydraulic fluid pipe 42 communicates with operation signal pressure unload valve 43. A signal pressure is applied to operation signal pressure unload valve 43 via hydraulic fluid pipe 42. Hydraulic fluid pipes 44 and 45 communicate with operation signal pressure unload valve 43. Accordingly, in a case of actuation in one direction, the signal pressure is transmitted to hydraulic fluid pipe 44. In a neutral state, the hydraulic fluid is discharged through hydraulic fluid pipe 45. Operation signal pressure unload valve 43 constitutes supply blocking section Mb, described later.
Furthermore, remote control valve 46 is disposed in the signal circuit. Hydraulic fluid pipe 44 communicates with remote control valve 46. The signal pressure is applied to remote control valve 46 via hydraulic fluid pipe 44. Hydraulic fluid pipes 47 and 48 communicate with remote control valve 46. Accordingly, actuation in one direction allows the signal pressure to be transmitted to hydraulic fluid pipe 47, while actuation in the other direction allows the signal pressure to be transmitted to hydraulic fluid pipe 48. In all the cases, the hydraulic fluid is discharged through hydraulic fluid pipe 49. When the signal pressure is transmitted to hydraulic fluid pipe 47, direction switching valve 33 is actuated in one direction. When the signal pressure is transmitted to hydraulic fluid pipe 48, direction switching valve 33 is actuated in the other direction.
Furthermore, relief pressure switching valve 50 is disposed in the signal circuit. As described above, relief pressure switching valve 50 allows switching among "high-pressure relief mode", "low-pressure relief mode" and "unload state". Specifically, in a case of actuation of relief pressure switching valve 50 in one direction, hydraulic fluid pipe 51 is blocked. Accordingly, when the pressures of hydraulic fluid pipes 32 and 39 become a set value (high-pressure value) or higher, pilot-actuated relief valve 38 is opened, and "high-pressure relief mode" that exerts a function serving as a safety valve is achieved. In a case of actuation of relief pressure switching valve 50 in the other direction, hydraulic fluid pipe 51 communicates with a hydraulic tank via hydraulic fluid pipe 52, low-pressure relief valve 53 and hydraulic fluid pipe 54. Accordingly, when the pressures of hydraulic fluid pipes 32 and 39 become a set value (low-pressure value) or higher, pilot-actuated relief valve 38 is opened, and "low-pressure relief mode" that exerts the function serving as the safety valve is achieved. That is, the actuation pressure of pilot-actuated relief valve 38 is regulated to a pressure set by low-pressure relief valve 53, thereby achieving "low-pressure relief mode" allowing opening at a value lower than the value in "high-pressure relief mode". In a case where relief pressure switching valve 50 is in the neutral state, hydraulic fluid pipe 51 communicates with the hydraulic tank via hydraulic fluid pipe 55, and pilot-actuated relief valve 38 is opened. Accordingly, "unload state" where the entire hydraulic fluid pumped out from hydraulic pump 31 is discharged is achieved.
When crane 1 performs the hoisting operation, crane 1 is in "high-pressure relief mode" so as to exert the hoisting capability. When the stability limit or strength limit of crane 1 is likely to be exceeded, the state is brought into "unload state", thereby stopping the hoisting operation (the actuation of main winch 9 is stopped). In a case where the mode is left in "high-pressure relief mode" when main hook 24 is stored below boom 7, the force of winding up main wire 21 is too strong. Accordingly, there is a possibility that a large load is applied to main bracket 16, boom 7 and the like, which are then damaged. To address this, the mode is brought into "low-pressure relief mode", which prevents main bracket 16, boom 7 and the like from being subjected to a large load.
Next, an electric circuit is described.
Pressure sensor 55 is disposed in the electric circuit. Electric wire 56 is connected to pressure sensor 55. Pressure sensor 55 is attached to hydraulic fluid pipe 34. Accordingly, pressure sensor 55 can detect the pressure in hydraulic fluid pipe 34.
Furthermore, position sensor 57 is disposed in the electric circuit. Electric wire 58 is connected to position sensor 57. Position sensor 57 is attached to operation lever 8c that actuates remote control valve 46. Accordingly, position sensor 57 can detect the inclined direction of operation lever 8c.
Furthermore, cancel switch 59 is disposed in the electric circuit. Electric wire 60 is connected to cancel switch 59. Cancel switch 59 is attached to cancel button (also called "over-winding button") 8e that invalidates the function of over-winding prevention switch 17. Accordingly, cancel switch 59 can issue an instruction of invalidating the function of over-winding prevention switch 17.
Furthermore, controller 61 is disposed in the electric circuit. Electric wires 56, 58 and 60 are connected to controller 61. Accordingly, controller 61 can recognize the pressure of hydraulic fluid to be delivered to hydraulic motor 37 and change in the pressure, the inclined direction of operation lever 8c, and the instruction for invalidating the function of over-winding prevention switch 17. Multiple electric wires are connected to controller 61. These electric wires are connected to operation signal pressure unload valve 43 and relief pressure switching valve 50. Accordingly, controller 61 can appropriately control these valves 43 and 50.
Hereinafter, a control mode pertaining to storing of main hook 24 is described.
FIGS. 8 and 9 illustrate the process of controller 61 when main hook 24 is stored.
In step S11, controller 61 determines whether or not the state is for storing main hook 24. Specifically, it is determined whether the state is for storing main hook 24 or not on the basis of the state of the engine, the attitude of boom 7 and the like. In a case where the state is for storing main hook 24, the processing transitions to step S12.
In step S12, controller 61 blinks icon 8f (see FIG. 3). Specifically, icon 8f representing that the state for storing main hook 24 is achieved is blinked.
In step S13, controller 61 determines whether cancel switch 59 is "on" or not. In a case where cancel switch 59 is "on", the processing transitions to step S14.
In step S14, controller 61 switches the mode to "low-pressure relief mode". Specifically, relief pressure switching valve 50 is actuated to the other direction to switch the mode to "low-pressure relief mode". Accordingly, the pressure of hydraulic fluid to be delivered to hydraulic motor 37 decreases. As described above, "high-pressure relief mode" is switched to "low-pressure relief mode" during storing of main hook 24 in order to prevent main bracket 16, boom 7 and the like from being subjected to a large load and from being damaged.
In step S15, controller 61 determines whether the operation of winding up main wire 21 is performed or not. Specifically, it is determined whether the operation of winding up main wire 21 is performed or not on the basis of the signal from position sensor 57. In a case where the operation of winding up main wire 21 is performed, the processing transitions to step S16. In a case where the operation of winding up main wire 21 is performed, main winch 9 is operated.
In step S16, controller 61 determines whether the pressure of hydraulic fluid does not exceed (falls below) the upper limit value or not. Specifically, it is determined whether the pressure of hydraulic fluid does not exceed (falls below) the setting value on the upper limit side in "low-pressure relief mode" (the value may be a value having a predetermined allowance from the setting value) or not on the basis of the signal from pressure sensor 55. In a case where the pressure of hydraulic fluid does not exceed the upper limit value, the processing transitions to step S17.
In step S17, controller 61 determines whether the operation of winding up main wire 21 has been completed or not. Specifically, it is determined whether the operation of winding up main wire 21 has been completed or not on the basis of the signal from position sensor 57. In a case where the operation of winding up main wire 21 has been completed, the processing transitions to step S18. In a case where the operation of winding up main wire 21 has been completed, main winch 9 is stopped. Completion of the operation of winding up main wire 21 means that an operator determines that storing of main hook 24 has been completed.
In step S18, controller 61 determines whether the pressure of hydraulic fluid does not fall below (exceeds) the lower limit value or not. Specifically, it is determined whether the pressure of hydraulic fluid does not fall below (exceeds) the setting value on the lower limit side in "low-pressure relief mode" (the value may be a value having a predetermined allowance from the setting value) or not on the basis of the signal from pressure sensor 55. In a case where the pressure of hydraulic fluid does not fall below the lower limit value, the processing transitions to step S19.
In step S19, controller 61 turns on icon 8f. Specifically, icon 8f blinking to represent that main hook 24 is stored is turned on.
As described above, controller 61 performs processes on the basis of signals from pressure sensor 55, position sensor 57 and the like. Appropriate instructions are issued to operation signal pressure unload valve 43, relief pressure switching valve 50 and the like, thereby allowing main hook 24 to be stored.
Note that, in step S16, controller 61 causes the processing to transition to step S20 in a case where the pressure of the hydraulic fluid exceeds the upper limit value. Various causes can be considered for the fact that the pressure of the hydraulic fluid exceeds the upper limit value. For example, the causes include a case where relief pressure switching valve 50 malfunctions and the mode is not switched to "low-pressure relief mode".
In step S20, controller 61 actuates abnormality notification section Mi. Specifically, a warning image is displayed on monitor 8g that constitutes abnormality notification section Mi (see FIG. 3). Alternatively, speaker 8h that constitutes abnormality notification section Mi may issue a warning sound. Further alternatively, lamp 8i that constitutes abnormality notification section Mi may be turned on. At the same time, controller 61 actuates supply blocking section Mb. Specifically, operation signal pressure unload valve 43 constituting supply blocking section Mb is actuated to the other direction to release the signal pressure applied to direction switching valve 33, thereby bringing direction switching valve 33 into the neutral state. Accordingly, winding up of main wire 21 is stopped. This, in turn, stops lifting of main hook 24. A method of stopping winding up main wire 21 may be a method of bringing relief pressure switching valve 50 into the neutral state and bringing hydraulic fluid pipes 32 and 39 into "unload state". However, a possible case where relief pressure switching valve 50 malfunctions and is not switched to "low-pressure relief mode" is assumed. Accordingly, a mode of bringing operation signal pressure unload valve 43 into the neutral state and bringing hydraulic fluid pipes 44, 47 and 48 into "unload state" is regarded to have higher reliability.
Additionally, in step S18, controller 61 causes the processing to transition to step S21 in a case where the pressure of the hydraulic fluid falls below the lower limit value. Various causes can be considered for the fact that the pressure of the hydraulic fluid falls below the lower limit value. The causes include, for example, a case of insufficient winding up of main wire 21 as a result of the operator's falsely recognizing that storing of main hook 24 has been completed and then finishing the operation.
In step S21, controller 61 actuates abnormality notification section Mi. Specifically, a warning image is displayed on monitor 8g that constitutes abnormality notification section Mi (see FIG. 3). Alternatively, speaker 8h that constitutes abnormality notification section Mi may issue a warning sound. Further alternatively, lamp 8i that constitutes abnormality notification section Mi may be turned on.
According to the above description, the characteristics and advantageous effects of this crane 1 are summarized as follows.

<Characteristic 1>
This crane 1 actuates abnormality notification section Mi in a case where it is determined that the pressure of the hydraulic fluid falls below the lower limit value when the hook (main hook 24) is stored. Such crane 1 actuates abnormality notification section Mi in case winding up of the wire rope (main wire 21) is insufficient owing to any cause. This actuation can prevent the operator from falsely recognizing that storing of hook (24) has been completed.

<Characteristic 2>
This crane 1 actuates abnormality notification section Mi in a case where it is determined that the pressure of the hydraulic fluid exceeds the upper limit value when the hook (main hook 24) is stored. Such crane 1 actuates abnormality notification section Mi in case the load applied to hydraulic motor 37 exceeds the predetermined value owing to any cause. Accordingly, the operator can recognize occurrence of the abnormality.

<Characteristic 3>
This crane 1 actuates supply blocking section Mb in a case where it is determined that the pressure of the hydraulic fluid exceeds the upper limit value when the hook (main hook 24) is stored. Such crane 1 actuates supply blocking section Mb in case the load applied to hydraulic motor 37 exceeds the predetermined value owing to any cause. Accordingly, the operation of storing hook (24) can be automatically stopped.

<Characteristic 4>
This crane 1 actuates operation signal pressure unload valve 43 in a case where it is determined that the pressure of the hydraulic fluid exceeds the upper limit value when the hook (main hook 24) is stored. Such crane 1 actuates operation signal pressure unload valve 43 in case the load applied to hydraulic motor 37 exceeds the predetermined value owing to any cause. Accordingly, the operation of storing hook (24) can be automatically and securely stopped.
These characteristics and their advantageous effects are also applicable to storing of sub-hook 27.
Next, hydraulic circuits of cranes 1 according to other embodiments are described.
FIG. 10 illustrates the hydraulic circuit of crane 1 according to embodiment 2. FIG. 11 illustrates the hydraulic circuit of crane 1 according to embodiment 3.
The hydraulic circuit of crane 1 according to Embodiment 2 has a configuration where relief pressure switching valve 50 is replaced with electromagnetic valve 62 that can switch between two alternatives, or opening and closing, and low-pressure relief valve 53 is removed.
Unlike crane 1 according to Embodiment 1, such a configuration cannot bring the mode to "low-pressure relief mode" when main hook 24 is stored. However, in a case where controller 61 appropriately actuates supply blocking section Mb, no problem occurs. That is, only in a case where operation signal pressure unload valve 43 can be brought into the neutral state to stop wiring up of main wire 21 when the pressure detected by pressure sensor 55 exceeds the setting value in "low-pressure relief mode", the hydraulic circuit of achieving "low-pressure relief mode" is not required to be configured from the beginning. Such a hydraulic circuit can reduce the cost.
The hydraulic circuit of crane 1 according to Embodiment 3 has a configuration where remote control valve 46 is replaced with electromagnetic proportional remote control valve 63 capable of flow rate control, and operation signal pressure unload valve 43, relief pressure switching valve 50 and low-pressure relief valve 53 are removed.
Unlike crane 1 according to Embodiment 1, such a configuration cannot bring the mode to "low-pressure relief mode" when main hook 24 is stored. Furthermore, operation signal pressure unload valve 43 cannot be brought into the neutral state to stop winding up of main wire 21. However, in a case where controller 61 controls electromagnetic proportional remote control valve 63 to adjust the signal pressure and controls the flow rate of the hydraulic fluid to be delivered to hydraulic motor 37, no problem occurs. That is, only in a case where, when the pressure detected by pressure sensor 55 exceeds the setting value in "low-pressure relief mode", electromagnetic proportional remote control valve 63 can be controlled to adjust the signal pressure, and the flow rate of the hydraulic fluid to be delivered to hydraulic motor 37 can be controlled to stop winding up of main wire 21 appropriately, the hydraulic circuit that achieves "low-pressure relief mode" and the hydraulic circuit that achieves blocking of the hydraulic fluid to be delivered to hydraulic motor 37 are not required to be configured. Such a hydraulic circuit can further reduce the cost.
The present invention can be used for a crane.

Reference Signs List
- 1 Crane
- 7 Boom
- 9 Main winch (winch)
- 16 Main bracket
- 17 Over-winding prevention switch
- 21 Main wire (wire rope)
- 24 Main hook (hook)
- 31 Hydraulic pump
- 33 Direction switching valve
- 37 Hydraulic motor
- 38 Pilot-actuated relief valve
- 41 Hydraulic pressure source
- 43 Operation signal pressure unload valve
- 46 Remote control valve
- 50 Relief pressure switching valve
- 53 Low-pressure relief valve
- 55 Pressure sensor
- 57 Position sensor
- 59 Cancel switch
- 61 Controller
- 62 Electromagnetic valve
- 63 Electromagnetic proportional remote control valve
- Mb Supply blocking section
- Mi Abnormality notification section
1. A crane, comprising:
a boom;
a wire rope that runs from a proximal end to a distal end of the boom;
a winch that winds up and releases the wire rope; and
a hook that is lifted and lowered by winding up and releasing the wire rope in a state where the hook is hung by the wire rope,
the hook that is stored below the boom when the wire rope is further wound up in a state where the hook is in contact with the boom,
wherein the winch is configured to be moved by a hydraulic motor,
the crane further comprises:
a pressure sensor that detects a pressure of hydraulic fluid to be delivered to the hydraulic motor; and
a controller that recognizes change in pressure of the hydraulic fluid, based on a signal from the pressure sensor, and
the crane further comprises an abnormality notification section that issues a notification of abnormality at least pertaining to storing of the hook, and
the controller actuates the abnormality notification section in a case where it is determined that the pressure of the hydraulic fluid falls below a lower limit value when the hook is stored.
2. The crane according to claim 1, wherein the controller actuates the abnormality notification section in a case where it is determined that the pressure of the hydraulic fluid exceeds an upper limit value when the hook is stored.
3. The crane according to claim 1, further comprising
a supply blocking section capable of blocking supply of the hydraulic fluid,
wherein the controller actuates the supply blocking section in a case where it is determined that the pressure of the hydraulic fluid exceeds an upper limit value when the hook is stored.
4. The crane according to claim 3,
wherein a direction switching valve is configured to switch a flow direction of the hydraulic fluid,
the crane comprises, as the supply blocking section, an operation signal pressure unload valve capable of releasing a signal pressure of the direction switching valve, and
the controller actuates the operation signal pressure unload valve in a case where it is determined that the pressure of the hydraulic fluid exceeds an upper limit value when the hook is stored.

REFERENCES CITED IN THE DESCRIPTION
This list of references cited by the applicant is for the reader's convenience only. It does not form part of the European patent document. Even though great care has been taken in compiling the references, errors or omissions cannot be excluded and the EPO disclaims all liability in this regard.

Patent documents cited in the description
- JP
2015009939
A
[0004]
- JP
2011098824
A
[0004]