ATBECHDEDKESFRGBGRITLILUNLSEMCPTIESILTLVFIROMKCYALTRBGCZEEHUPLSKBAHRIS..MTNORSMESMMAKHTNMD..........
J
BDM Ver 2.0.14 (4th of August) - 1620000/0
3812524
EUROPEAN PATENT APPLICATION
A3
20211229
EP
20202822.1
20201020
en
en
en
201915545
20191025
GB
20211229
202152
20210428
202117
E04B 1/348 20060101AFI20211122BHEP
E04D 13/08 20060101ALI20211122BHEP
E04G 21/14 20060101ALI20211122BHEP
E04B 1/3483 20130101 LI20200331BHEP
E04B 1/34869 20130101 LA20210217BHEP
E04D 13/08 20130101 LI20200609BHEP
E04D2013/0826 20130101 LA20210217BHEP
E04D2013/0846 20130101 LA20210217BHEP
E04D2013/0893 20130101 LA20200609BHEP
E04G 21/142 20130101 LI20200331BHEP
de
STEIGROHRSYSTEM
en
RISER SYSTEM
fr
SYSTÈME DE COLONNE MONTANTE
20211126
3
Laing O'Rourke Plc
100163232
NO0572.00210
Bridge Place Anchor Boulevard Admirals Park Crossways
Dartford, Kent DA2 6SN
GB
BOWERMAN, Hugh
c/o Laing O'Rouke plc Bridge Place Anchor Boulevard, Admirals Park Crossways
Dartford, Kent DA2 6SN
GB
BALDOCK, Douglas
c/o Laing O'Rouke plc Bridge Place Anchor Boulevard, Admirals Park Crossways
Dartford, Kent DA2 6SN
GB
CMS Cameron McKenna Nabarro Olswang LLP
101670164
Cannon Place 78 Cannon Street
London EC4N 6AF
GB
AL
AT
BE
BG
CH
CY
CZ
DE
DK
EE
ES
FI
FR
GB
GR
HR
HU
IE
IS
IT
LI
LT
LU
LV
MC
MK
MT
NL
NO
PL
PT
RO
RS
SE
SI
SK
SM
TR
BA
ME
KH
MA
MD
TN
20211229
202152
Some examples of the stackable building module are manufactured with an integrated functionally operable riser system for transportation to its installation site. The integrated riser system functions at least as a drain which allows fluids to be passed through the riser system from the roof of the building module to a ground drainage system as soon as the building module is lowered in alignment either with a ground drainage system or a lower stackable building module so that a lower portion of the riser system is forced by the lowering of the building module to automatically engage with the ground drainage system or an upper portion of a lower building module.
NO0572.00210
EP
20202822.1
Laing O'Rourke Plc
1. claims: 1-9, 15
Stackable building module with a riser system
2. claims: 10-14
Coupling the pipework sections of stacked building modules to form a sealed coupling
3
DH
20211126
E04B
E04D
F16L
JP
2001132185
A
SEKISUI CHEMICAL CO LTD
20010515
X
1-11,15
A
12-14
* figures 1,4,7,8,9,10,13 *
JP
H1143999
A
SEKISUI CHEMICAL CO LTD
19990216
X
1-15
* figures 1-2 *
US
2037895
A
ERIC GUGLER
19360421
X
1-11
* figure 1 *
GB
2547514
A
STONE BATHWEAR S R L [IT]
20170823
X
1-11
* paragraph [0027]; figures 7-9 *
EP
1207238
A2
SUEBA BAU AG [DE]
20020522
X
1-15
* figure 11 *
KR
860011951
U
IM YONG TAEK [KR]
19861006
X
15
* the whole document *
Leroux, Corentine
The Hague
20210611
JP
2001132185
A
20010515
JP
4268291
B2
20090527
JP
2001132185
A
20010515
JP
H1143999
A
19990216
NONE
US
2037895
A
19360421
NONE
GB
2547514
A
20170823
NONE
EP
1207238
A2
20020522
AT
321920
T
20060415
CZ
20014064
A3
20020717
EP
1207238
A2
20020522
ES
2260143
T3
20061101
HU
0104880
A2
20021228
PL
350705
A1
20020520
PT
1207238
E
20060731
KR
860011951
U
19861006
NONE